130 0 1 11.6 83 1 1 7.62 59 2 1 5.48 37 3 1 3.85 28 4 1 3.07 17 5 1 2.30 10 6 1 1.76 1 7 1 1.52 0 8 1 1.30 0 9 1 1.15 0 10 1 1.04 0 11 1 0.821 0 12 1 0.752 0 13 1 0.625 0 14 1 0.848 0 15 1 0.652 0 16 1 0.778 0 17 1 0.532 0 18 1 0.675 0 19 1 0.739 0 20 1 0.370 0 21 1 0.288 100 0 2 9.30 74 1 2 7.22 59 2 2 5.54 34 3 2 4.07 30 4 2 3.19 23 5 2 2.77 14 6 2 2.16 6 7 2 1.77 2 8 2 1.67 0 9 2 1.28 4 10 2 1.32 2 11 2 1.16 0 12 2 1.21 0 13 2 1.25 0 14 2 0.935 0 15 2 1.18 0 16 2 1.21 0 17 2 0.982 0 18 2 0.976 0 19 2 0.847 0 20 2 0.490 0 21 2 0.495 73 0 3 6.73 60 1 3 5.88 48 2 3 4.82 35 3 3 3.64 24 4 3 2.96 14 5 3 2.16 10 6 3 1.67 5 7 3 1.35 0 8 3 1.26 0 9 3 1.18 0 10 3 1.14 0 11 3 1.18 0 12 3 1.23 0 13 3 1.13 0 14 3 0.911 0 15 3 1.02 0 16 3 0.857 0 17 3 0.849 0 18 3 0.694 0 19 3 0.826 0 20 3 0.340 0 21 3 0.199 50 0 4 5.06 44 1 4 4.82 40 2 4 3.92 25 3 4 3.30 18 4 4 2.57 13 5 4 2.09 9 6 4 1.79 5 7 4 1.60 4 8 4 1.31 0 9 4 1.25 0 10 4 1.04 0 11 4 1.10 0 12 4 1.05 0 13 4 1.15 0 14 4 1.06 0 15 4 1.05 0 16 4 1.06 0 17 4 0.997 0 18 4 0.940 0 19 4 0.682 0 20 4 0.423 0 21 4 0.267 37 0 5 3.71 34 1 5 3.77 32 2 5 3.36 24 3 5 2.94 15 4 5 2.10 11 5 5 1.78 0 6 5 1.33 1 7 5 1.33 1 8 5 1.18 0 9 5 1.13 2 10 5 1.22 0 11 5 1.06 0 12 5 1.07 0 13 5 1.01 0 14 5 0.844 0 15 5 0.826 0 16 5 1.04 0 17 5 0.641 0 18 5 0.822 0 19 5 0.419 0 20 5 0.278 0 21 5 0.246 26 0 6 3.16 28 1 6 3.05 30 2 6 3.22 14 3 6 2.53 14 4 6 1.81 5 5 6 1.64 11 6 6 1.66 3 7 6 1.27 0 8 6 1.20 0 9 6 1.13 0 10 6 1.07 0 11 6 1.21 3 12 6 1.02 0 13 6 1.15 4 14 6 1.14 0 15 6 1.02 0 16 6 1.00 0 17 6 0.980 0 18 6 0.965 0 19 6 0.250 0 20 6 0.399 0 21 6 0.263 23 0 7 2.45 23 1 7 2.63 20 2 7 2.33 20 3 7 2.30 12 4 7 1.93 7 5 7 1.58 4 6 7 1.15 2 7 7 1.09 0 8 7 0.949 2 9 7 1.14 4 10 7 1.16 5 11 7 1.28 5 12 7 1.41 6 13 7 1.33 3 14 7 1.27 4 15 7 1.41 6 16 7 1.24 0 17 7 1.07 0 18 7 0.790 0 19 7 0.499 0 20 7 0.344 0 21 7 0.311 23 0 8 2.22 22 1 8 2.52 17 2 8 2.34 19 3 8 1.92 16 4 8 1.85 6 5 8 1.51 5 6 8 1.38 3 7 8 1.33 2 8 8 1.39 2 9 8 1.51 9 10 8 1.57 15 11 8 1.86 9 12 8 1.76 7 13 8 1.76 18 14 8 1.82 13 15 8 1.73 10 16 8 1.38 2 17 8 1.33 0 18 8 0.949 0 19 8 0.522 0 20 8 0.524 0 21 8 0.342 19 0 9 2.36 12 1 9 2.20 19 2 9 2.33 13 3 9 1.93 8 4 9 2.08 7 5 9 1.57 5 6 9 1.63 4 7 9 1.51 4 8 9 1.37 18 9 9 2.15 25 10 9 2.62 23 11 9 2.35 26 12 9 2.33 19 13 9 2.12 21 14 9 2.15 14 15 9 1.90 17 16 9 1.94 4 17 9 1.48 0 18 9 0.845 0 19 9 0.711 0 20 9 0.356 0 21 9 0.386 15 0 10 2.00 11 1 10 2.11 15 2 10 1.90 5 3 10 1.68 5 4 10 1.46 1 5 10 1.36 6 6 10 1.64 1 7 10 1.53 30 8 10 3.53 55 9 10 4.83 39 10 10 3.32 24 11 10 2.66 20 12 10 2.61 19 13 10 2.39 15 14 10 2.13 13 15 10 2.18 8 16 10 1.90 8 17 10 1.54 0 18 10 0.924 0 19 10 0.677 0 20 10 0.521 0 21 10 0.433 10 0 11 1.61 6 1 11 1.61 11 2 11 1.52 2 3 11 1.61 0 4 11 1.18 1 5 11 1.07 3 6 11 1.30 0 7 11 1.20 30 8 11 2.64 54 9 11 4.26 35 10 11 3.22 25 11 11 2.72 26 12 11 2.47 26 13 11 2.50 24 14 11 2.46 21 15 11 2.47 15 16 11 1.97 3 17 11 1.25 0 18 11 0.580 0 19 11 0.612 0 20 11 0.529 0 21 11 0.442 6 0 12 1.57 6 1 12 1.45 7 2 12 1.68 4 3 12 1.28 3 4 12 1.40 5 5 12 1.31 0 6 12 1.22 4 7 12 1.32 24 8 12 2.50 38 9 12 3.27 31 10 12 3.13 38 11 12 3.63 44 12 12 3.38 39 13 12 3.46 36 14 12 2.99 28 15 12 2.58 21 16 12 2.10 9 17 12 1.64 0 18 12 0.663 0 19 12 0.588 0 20 12 0.388 0 21 12 0.570 4 0 13 1.47 5 1 13 1.21 2 2 13 1.17 1 3 13 1.25 4 4 13 1.29 0 5 13 0.857 0 6 13 0.776 2 7 13 0.868 9 8 13 1.47 15 9 13 2.22 26 10 13 2.60 51 11 13 4.26 64 12 13 5.04 52 13 13 4.06 41 14 13 3.34 27 15 13 2.37 20 16 13 1.87 1 17 13 1.23 0 18 13 0.435 0 19 13 0.434 0 20 13 0.0551 0 21 13 0.151 0 0 14 1.06 0 1 14 0.955 2 2 14 0.815 0 3 14 0.786 0 4 14 0.780 0 5 14 0.677 0 6 14 0.668 0 7 14 0.604 0 8 14 0.952 9 9 14 1.60 27 10 14 2.76 102 11 14 8.47 130 12 14 10.2 75 13 14 5.84 38 14 14 3.36 24 15 14 2.44 14 16 14 1.71 0 17 14 0.490 0 18 14 0.299 0 19 14 0.228 0 20 14 0.174 0 21 14 0.162 0 0 15 1.07 5 1 15 1.08 0 2 15 1.10 2 3 15 0.916 0 4 15 1.11 0 5 15 0.731 0 6 15 1.05 0 7 15 0.872 0 8 15 1.14 8 9 15 1.51 37 10 15 3.40 242 11 15 23.5 306 12 15 28.1 108 13 15 8.39 50 14 15 3.89 24 15 15 2.36 13 16 15 1.87 0 17 15 0.688 0 18 15 0.516 0 19 15 0.632 0 20 15 0.385 0 21 15 0.350 0 0 16 0.721 0 1 16 1.15 2 2 16 1.20 0 3 16 1.15 0 4 16 1.05 0 5 16 0.936 0 6 16 0.823 0 7 16 0.800 1 8 16 0.997 8 9 16 1.76 45 10 16 4.23 424 11 16 66.0 586 12 16 75.8 108 13 16 8.92 39 14 16 3.65 22 15 16 2.36 12 16 16 1.62 0 17 16 0.863 0 18 16 0.545 0 19 16 0.315 0 20 16 0.391 0 21 16 0.303 1 0 17 1.35 0 1 17 1.31 5 2 17 1.27 0 3 17 1.07 0 4 17 0.941 0 5 17 1.11 0 6 17 1.03 0 7 17 0.934 0 8 17 1.34 6 9 17 1.81 37 10 17 3.65 238 11 17 22.7 351 12 17 33.6 105 13 17 8.94 41 14 17 3.61 23 15 17 2.46 10 16 17 1.97 0 17 17 0.992 0 18 17 0.794 0 19 17 0.438 0 20 17 0.505 0 21 17 0.546 0 0 18 1.06 0 1 18 1.26 0 2 18 1.14 0 3 18 1.32 2 4 18 1.48 0 5 18 1.17 3 6 18 1.33 0 7 18 1.33 2 8 18 1.44 9 9 18 1.74 36 10 18 3.25 109 11 18 9.17 156 12 18 12.7 91 13 18 7.58 48 14 18 4.26 30 15 18 3.02 7 16 18 1.77 0 17 18 1.07 0 18 18 0.734 0 19 18 0.757 0 20 18 0.518 0 21 18 0.700 0 0 19 1.26 1 1 19 1.18 0 2 19 1.05 2 3 19 1.10 0 4 19 1.05 0 5 19 0.967 0 6 19 1.19 1 7 19 1.41 1 8 19 1.33 11 9 19 1.82 16 10 19 2.51 49 11 19 4.55 76 12 19 6.20 63 13 19 5.65 51 14 19 4.38 29 15 19 2.98 14 16 19 1.72 0 17 19 1.15 0 18 19 0.837 0 19 19 0.691 0 20 19 0.614 0 21 19 0.777 0 0 20 1.24 0 1 20 1.10 0 2 20 1.07 4 3 20 1.34 0 4 20 1.32 1 5 20 1.41 0 6 20 1.29 6 7 20 1.60 0 8 20 1.63 14 9 20 2.07 17 10 20 2.31 30 11 20 3.36 42 12 20 3.98 48 13 20 4.35 54 14 20 4.48 37 15 20 3.21 13 16 20 2.12 0 17 20 1.42 0 18 20 0.913 0 19 20 0.844 0 20 20 0.786 0 21 20 0.847 0 0 21 1.06 0 1 21 0.859 0 2 21 1.06 1 3 21 1.40 0 4 21 1.06 5 5 21 1.44 0 6 21 1.28 1 7 21 1.25 9 8 21 1.59 7 9 21 1.66 15 10 21 2.04 28 11 21 2.70 34 12 21 3.18 37 13 21 3.36 44 14 21 3.47 30 15 21 3.07 11 16 21 1.95 0 17 21 1.07 0 18 21 0.797 0 19 21 0.877 0 20 21 0.714 0 21 21 0.718 0 0 22 1.06 0 1 22 0.205 0 2 22 0.860 0 3 22 0.631 0 4 22 0.744 0 5 22 1.13 0 6 22 0.816 0 7 22 1.05 0 8 22 1.12 4 9 22 1.22 8 10 22 1.52 11 11 22 1.99 23 12 22 2.29 24 13 22 2.57 26 14 22 2.97 19 15 22 2.43 4 16 22 1.57 0 17 22 1.11 0 18 22 0.636 0 19 22 0.605 0 20 22 0.509 0 21 22 0.516 4 0 23 1.54 0 1 23 0.571 0 2 23 0.877 0 3 23 0.619 0 4 23 0.659 1 5 23 1.14 0 6 23 0.968 0 7 23 0.882 0 8 23 1.21 0 9 23 1.24 3 10 23 1.53 12 11 23 1.63 13 12 23 1.78 22 13 23 2.03 19 14 23 2.11 14 15 23 2.02 9 16 23 1.92 0 17 23 0.946 0 18 23 0.693 0 19 23 0.675 0 20 23 0.513 0 21 23 0.471 0 0 24 1.01 0 1 24 0.120 0 2 24 0.895 0 3 24 -0.0893 0 4 24 0.488 0 5 24 0.984 4 6 24 1.10 4 7 24 0.988 4 8 24 1.21 3 9 24 0.969 7 10 24 1.09 6 11 24 1.50 8 12 24 1.33 7 13 24 1.63 10 14 24 1.49 10 15 24 1.49 16 16 24 1.83 4 17 24 1.08 0 18 24 0.576 0 19 24 0.374 0 20 24 0.268 0 21 24 0.237 0 0 25 1.01 0 1 25 0.122 0 2 25 0.612 0 3 25 -0.00180 0 4 25 0.774 15 5 25 1.85 12 6 25 1.54 9 7 25 1.59 11 8 25 1.32 8 9 25 1.44 12 10 25 2.03 17 11 25 1.70 0 12 25 0.496 8 13 25 1.25 1 14 25 1.17 3 15 25 1.47 8 16 25 1.45 4 17 25 1.35 0 18 25 0.801 0 19 25 0.397 0 20 25 0.373 0 21 25 0.255 6 0 26 1.28 0 1 26 0.700 0 2 26 0.713 0 3 26 0.290 0 4 26 0.982 9 5 26 1.93 9 6 26 1.96 8 7 26 1.65 12 8 26 1.82 18 9 26 2.01 9 10 26 1.98 24 11 26 2.38 0 12 26 0.763 12 13 26 1.76 0 14 26 0.972 11 15 26 1.80 5 16 26 1.60 5 17 26 1.73 0 18 26 0.646 0 19 26 0.614 0 20 26 0.530 0 21 26 0.562 0 0 27 0.883 0 1 27 0.235 0 2 27 0.846 0 3 27 0.103 0 4 27 0.636 4 5 27 1.16 9 6 27 1.50 10 7 27 1.66 2 8 27 1.49 8 9 27 1.45 5 10 27 1.54 10 11 27 1.36 1 12 27 1.13 9 13 27 1.53 5 14 27 1.40 10 15 27 1.47 9 16 27 1.43 2 17 27 1.11 0 18 27 0.419 0 19 27 0.429 0 20 27 0.147 0 21 27 0.233 0 0 28 0.547 0 1 28 0.453 0 2 28 1.14 0 3 28 0.303 0 4 28 0.796 6 5 28 1.05 10 6 28 1.52 6 7 28 1.49 3 8 28 1.24 2 9 28 1.30 8 10 28 1.54 3 11 28 1.48 4 12 28 1.08 4 13 28 1.50 6 14 28 1.35 12 15 28 1.65 12 16 28 1.78 8 17 28 1.69 0 18 28 0.469 0 19 28 0.479 0 20 28 0.429 0 21 28 0.250 0 0 29 0.339 0 1 29 0.342 0 2 29 0.934 0 3 29 0.356 0 4 29 0.952 0 5 29 0.435 2 6 29 0.901 2 7 29 1.07 3 8 29 1.26 2 9 29 1.43 2 10 29 1.19 7 11 29 1.40 5 12 29 1.50 7 13 29 1.22 4 14 29 1.32 6 15 29 1.27 4 16 29 1.42 0 17 29 1.43 0 18 29 0.683 0 19 29 0.744 0 20 29 0.209 0 21 29 0.215 0 0 30 0.582 0 1 30 0.424 0 2 30 0.339 0 3 30 0.386 0 4 30 0.653 0 5 30 0.429 0 6 30 0.903 1 7 30 1.05 0 8 30 0.997 0 9 30 1.21 4 10 30 1.22 0 11 30 1.11 2 12 30 1.24 2 13 30 1.24 0 14 30 1.18 0 15 30 1.26 2 16 30 1.26 0 17 30 0.914 0 18 30 0.600 0 19 30 0.949 0 20 30 0.276 0 21 30 0.258 3 0 31 1.28 0 1 31 0.883 0 2 31 0.492 0 3 31 0.687 0 4 31 0.574 0 5 31 1.03 6 6 31 1.26 1 7 31 1.23 2 8 31 1.26 1 9 31 1.18 0 10 31 1.18 3 11 31 1.43 8 12 31 1.35 3 13 31 1.33 11 14 31 1.45 0 15 31 1.46 3 16 31 1.25 1 17 31 1.25 0 18 31 0.966 0 19 31 0.799 0 20 31 0.724 0 21 31 0.927 0 0 32 0.976 0 1 32 1.17 0 2 32 0.631 0 3 32 0.621 0 4 32 0.773 0 5 32 0.759 0 6 32 1.00 0 7 32 1.14 0 8 32 1.24 0 9 32 1.30 3 10 32 1.27 1 11 32 1.03 0 12 32 0.999 3 13 32 1.28 3 14 32 1.29 0 15 32 1.19 5 16 32 1.24 0 17 32 1.47 5 18 32 1.43 0 19 32 1.16 0 20 32 1.05 0 21 32 0.994 6 0 33 1.22 1 1 33 0.905 0 2 33 1.19 0 3 33 0.821 0 4 33 0.683 0 5 33 0.720 0 6 33 0.919 0 7 33 1.24 1 8 33 1.12 0 9 33 1.39 0 10 33 1.28 1 11 33 1.04 0 12 33 1.27 5 13 33 1.37 6 14 33 1.30 0 15 33 1.17 2 16 33 1.55 2 17 33 1.40 2 18 33 1.57 4 19 33 1.27 8 20 33 1.64 2 21 33 1.43