22 0 1 3.27 23 1 1 3.05 18 2 1 3.10 20 3 1 2.81 21 4 1 2.91 15 5 1 2.80 18 6 1 2.59 21 7 1 3.05 24 8 1 3.13 22 9 1 3.07 24 10 1 2.82 21 11 1 2.66 20 12 1 2.70 13 13 1 2.21 0 14 1 1.71 0 15 1 1.45 0 16 1 1.30 0 17 1 1.31 0 18 1 1.17 0 19 1 1.26 0 20 1 1.13 0 21 1 1.14 25 0 2 2.80 17 1 2 2.66 12 2 2 2.45 15 3 2 2.53 11 4 2 2.26 14 5 2 2.41 29 6 2 3.04 26 7 2 3.20 29 8 2 3.22 29 9 2 2.81 29 10 2 2.80 22 11 2 2.72 18 12 2 2.53 15 13 2 2.28 1 14 2 1.50 0 15 2 1.06 0 16 2 0.963 0 17 2 0.933 0 18 2 1.01 0 19 2 0.898 0 20 2 0.873 0 21 2 0.896 17 0 3 2.16 15 1 3 2.21 12 2 3 2.13 12 3 3 2.19 7 4 3 2.13 33 5 3 3.66 50 6 3 4.57 35 7 3 3.47 25 8 3 2.78 26 9 3 2.53 24 10 3 2.69 18 11 3 2.54 17 12 3 2.10 4 13 3 1.69 0 14 3 0.926 0 15 3 0.816 0 16 3 0.569 0 17 3 0.754 0 18 3 0.559 0 19 3 0.636 0 20 3 0.475 0 21 3 0.451 13 0 4 1.94 7 1 4 2.05 13 2 4 1.97 7 3 4 1.93 7 4 4 1.63 49 5 4 5.12 58 6 4 4.93 42 7 4 3.47 28 8 4 2.92 29 9 4 3.08 28 10 4 2.76 27 11 4 2.73 16 12 4 2.22 4 13 4 1.45 0 14 4 0.873 0 15 4 0.717 0 16 4 0.668 0 17 4 0.557 0 18 4 0.575 0 19 4 0.435 0 20 4 0.332 0 21 4 0.400 3 0 5 1.53 6 1 5 1.93 5 2 5 1.67 1 3 5 1.76 2 4 5 1.43 26 5 5 2.81 38 6 5 3.48 34 7 5 3.19 41 8 5 3.67 39 9 5 3.60 36 10 5 3.39 21 11 5 2.62 17 12 5 2.24 5 13 5 1.36 0 14 5 0.514 0 15 5 0.432 0 16 5 0.466 0 17 5 0.218 0 18 5 0.214 0 19 5 0.359 0 20 5 0.340 0 21 5 0.403 0 0 6 1.49 1 1 6 1.36 4 2 6 1.37 0 3 6 0.923 0 4 6 1.03 9 5 6 1.44 21 6 6 2.46 32 7 6 2.97 73 8 6 6.22 76 9 6 6.38 42 10 6 3.85 24 11 6 2.47 12 12 6 1.69 0 13 6 0.693 0 14 6 0.245 0 15 6 0.209 0 16 6 0.117 0 17 6 0.119 0 18 6 0.0721 0 19 6 -0.0293 0 20 6 0.118 0 21 6 0.121 0 0 7 1.07 0 1 7 1.05 3 2 7 1.11 0 3 7 1.15 0 4 7 0.799 0 5 7 0.936 10 6 7 1.57 40 7 7 3.17 204 8 7 18.7 179 9 7 15.3 54 10 7 4.37 23 11 7 2.23 11 12 7 1.55 0 13 7 0.800 0 14 7 0.0738 0 15 7 0.151 0 16 7 -0.0784 0 17 7 0.0547 0 18 7 -0.0742 0 19 7 0.201 0 20 7 0.125 0 21 7 0.111 5 0 8 1.29 4 1 8 1.41 0 2 8 1.16 4 3 8 1.20 4 4 8 1.15 0 5 8 1.19 4 6 8 1.55 35 7 8 3.54 463 8 8 74.3 271 9 8 27.6 61 10 8 4.86 25 11 8 2.56 14 12 8 1.94 3 13 8 1.17 0 14 8 0.777 0 15 8 0.524 0 16 8 0.305 0 17 8 0.345 0 18 8 0.434 0 19 8 0.430 0 20 8 0.374 0 21 8 0.383 8 0 9 1.47 7 1 9 1.48 9 2 9 1.41 4 3 9 1.21 2 4 9 1.45 5 5 9 1.34 12 6 9 1.60 33 7 9 3.52 219 8 9 21.4 201 9 9 19.2 61 10 9 5.39 27 11 9 3.06 18 12 9 2.10 0 13 9 1.08 0 14 9 0.816 0 15 9 0.674 0 16 9 0.567 0 17 9 0.467 0 18 9 0.358 0 19 9 0.517 0 20 9 0.374 0 21 9 0.205 0 0 10 1.14 4 1 10 1.36 0 2 10 1.32 0 3 10 0.986 0 4 10 0.969 0 5 10 1.31 7 6 10 1.42 23 7 10 2.54 71 8 10 6.72 86 9 10 7.56 58 10 10 4.55 37 11 10 3.28 9 12 10 2.00 0 13 10 0.856 0 14 10 0.473 0 15 10 0.677 0 16 10 0.357 0 17 10 0.376 0 18 10 0.349 0 19 10 0.443 0 20 10 0.347 0 21 10 0.210 1 0 11 1.58 0 1 11 1.33 0 2 11 1.30 0 3 11 1.43 0 4 11 1.19 0 5 11 1.23 6 6 11 1.67 11 7 11 2.04 29 8 11 3.27 40 9 11 3.92 40 10 11 3.79 40 11 11 3.53 19 12 11 2.31 1 13 11 1.16 0 14 11 0.927 0 15 11 0.743 0 16 11 0.588 0 17 11 0.565 0 18 11 0.388 0 19 11 0.729 0 20 11 0.434 0 21 11 0.536 0 0 12 1.06 1 1 12 1.12 0 2 12 0.872 0 3 12 0.775 0 4 12 1.04 0 5 12 1.02 4 6 12 1.13 4 7 12 1.56 17 8 12 2.19 20 9 12 2.54 23 10 12 2.79 26 11 12 2.93 20 12 12 2.06 0 13 12 1.02 0 14 12 0.576 0 15 12 0.463 0 16 12 0.456 0 17 12 0.356 0 18 12 0.293 0 19 12 0.370 0 20 12 0.413 0 21 12 0.432 0 0 13 1.13 0 1 13 0.963 4 2 13 1.11 0 3 13 1.03 0 4 13 1.04 0 5 13 0.980 1 6 13 1.27 8 7 13 1.50 10 8 13 1.77 15 9 13 2.02 23 10 13 2.20 17 11 13 2.14 24 12 13 2.18 6 13 13 1.23 0 14 13 0.801 0 15 13 0.579 0 16 13 0.453 0 17 13 0.553 0 18 13 0.308 0 19 13 0.444 0 20 13 0.227 0 21 13 0.304 0 0 14 1.00 0 1 14 0.820 0 2 14 0.845 0 3 14 0.682 0 4 14 0.982 0 5 14 0.699 2 6 14 1.02 6 7 14 1.21 8 8 14 1.52 17 9 14 1.66 14 10 14 1.84 13 11 14 1.79 13 12 14 1.94 17 13 14 1.71 0 14 14 0.969 0 15 14 0.454 0 16 14 0.584 0 17 14 0.156 0 18 14 0.287 0 19 14 0.242 0 20 14 0.276 0 21 14 0.292 0 0 15 0.958 0 1 15 0.668 0 2 15 0.941 1 3 15 1.01 3 4 15 1.05 1 5 15 1.01 4 6 15 1.22 4 7 15 1.07 8 8 15 1.47 12 9 15 1.72 12 10 15 1.68 17 11 15 1.91 10 12 15 1.71 12 13 15 1.83 10 14 15 1.32 0 15 15 0.690 0 16 15 0.637 0 17 15 0.328 0 18 15 0.377 0 19 15 0.557 0 20 15 0.314 0 21 15 0.278 0 0 16 0.540 0 1 16 0.898 0 2 16 0.741 3 3 16 1.25 4 4 16 1.15 4 5 16 1.30 11 6 16 1.26 8 7 16 1.50 13 8 16 1.71 14 9 16 1.80 2 10 16 1.25 12 11 16 1.71 9 12 16 1.55 12 13 16 1.71 10 14 16 1.55 0 15 16 0.737 0 16 16 0.328 0 17 16 0.305 0 18 16 0.247 0 19 16 0.249 0 20 16 0.361 0 21 16 0.289 0 0 17 0.556 0 1 17 1.06 0 2 17 0.721 3 3 17 1.05 13 4 17 1.56 14 5 17 1.62 18 6 17 1.67 20 7 17 1.95 21 8 17 2.35 19 9 17 2.09 3 10 17 1.12 20 11 17 2.03 14 12 17 2.00 12 13 17 1.77 2 14 17 1.23 0 15 17 0.432 0 16 17 0.727 0 17 17 0.509 0 18 17 0.565 0 19 17 0.311 0 20 17 0.476 0 21 17 0.420 0 0 18 1.10 0 1 18 1.50 0 2 18 0.615 1 3 18 1.51 23 4 18 2.69 21 5 18 2.49 15 6 18 2.33 16 7 18 2.49 16 8 18 2.36 18 9 18 2.36 4 10 18 1.59 19 11 18 2.13 15 12 18 2.29 7 13 18 2.13 11 14 18 2.08 0 15 18 0.998 0 16 18 1.25 0 17 18 0.557 0 18 18 0.471 0 19 18 0.661 0 20 18 0.524 0 21 18 0.563 0 0 19 1.23 0 1 19 0.997 0 2 19 0.162 0 3 19 0.998 11 4 19 2.12 14 5 19 2.22 14 6 19 2.17 18 7 19 2.20 18 8 19 1.95 10 9 19 1.76 0 10 19 1.30 10 11 19 1.84 10 12 19 1.90 6 13 19 1.63 7 14 19 1.72 0 15 19 1.01 7 16 19 1.26 0 17 19 0.671 0 18 19 0.504 0 19 19 1.08 0 20 19 0.692 0 21 19 1.18 2 0 20 1.47 0 1 20 1.19 0 2 20 0.519 0 3 20 0.947 14 4 20 2.25 15 5 20 2.15 14 6 20 2.09 19 7 20 2.14 16 8 20 1.92 13 9 20 2.12 14 10 20 1.83 1 11 20 1.60 5 12 20 1.84 8 13 20 1.82 14 14 20 1.85 0 15 20 1.47 10 16 20 1.71 0 17 20 0.897 0 18 20 1.03 0 19 20 1.31 0 20 20 1.08 0 21 20 1.36 6 0 21 1.42 0 1 21 1.35 0 2 21 0.766 0 3 21 0.714 10 4 21 1.77 11 5 21 1.91 12 6 21 1.91 16 7 21 2.07 12 8 21 1.95 9 9 21 1.85 11 10 21 1.87 10 11 21 1.90 9 12 21 1.80 6 13 21 1.81 12 14 21 1.85 5 15 21 1.71 7 16 21 1.51 0 17 21 0.783 0 18 21 1.07 0 19 21 1.24 0 20 21 1.17 0 21 21 1.18 0 0 22 1.36 0 1 22 1.02 6 2 22 1.30 0 3 22 0.866 0 4 22 1.14 6 5 22 1.44 5 6 22 1.55 10 7 22 1.65 10 8 22 1.51 1 9 22 1.53 9 10 22 1.45 7 11 22 1.46 10 12 22 1.51 11 13 22 1.61 10 14 22 1.72 0 15 22 1.46 7 16 22 1.64 0 17 22 1.45 5 18 22 1.50 0 19 22 1.33 0 20 22 1.19 0 21 22 1.24 0 0 23 1.19 0 1 23 0.667 0 2 23 0.876 0 3 23 0.914 7 4 23 1.27 0 5 23 1.19 10 6 23 1.51 10 7 23 1.43 7 8 23 1.65 0 9 23 1.40 7 10 23 1.64 0 11 23 1.17 2 12 23 1.21 10 13 23 1.33 6 14 23 1.52 6 15 23 1.38 9 16 23 1.57 8 17 23 1.64 10 18 23 1.65 7 19 23 1.67 0 20 23 1.29 2 21 23 1.29 0 0 24 0.706 0 1 24 0.518 0 2 24 0.933 0 3 24 0.434 0 4 24 0.920 0 5 24 1.07 6 6 24 1.42 2 7 24 1.36 2 8 24 1.44 0 9 24 1.04 0 10 24 1.18 3 11 24 1.29 5 12 24 1.47 3 13 24 1.33 3 14 24 1.47 1 15 24 1.33 6 16 24 1.65 10 17 24 1.78 4 18 24 1.90 7 19 24 1.82 8 20 24 1.62 0 21 24 1.39 0 0 25 1.09 0 1 25 1.08 0 2 25 0.247 0 3 25 0.368 0 4 25 0.318 0 5 25 1.03 1 6 25 0.894 0 7 25 1.11 0 8 25 0.995 0 9 25 1.23 0 10 25 1.26 0 11 25 1.14 0 12 25 0.925 0 13 25 1.01 4 14 25 1.33 0 15 25 1.38 8 16 25 1.50 8 17 25 1.59 12 18 25 1.99 20 19 25 2.39 12 20 25 2.54 17 21 25 2.46 0 0 26 1.22 4 1 26 1.48 0 2 26 0.759 0 3 26 0.572 0 4 26 0.500 0 5 26 0.602 0 6 26 0.883 0 7 26 1.06 0 8 26 1.07 3 9 26 1.39 0 10 26 0.967 0 11 26 1.13 0 12 26 0.925 0 13 26 1.06 0 14 26 0.981 0 15 26 1.30 8 16 26 1.45 6 17 26 1.70 14 18 26 1.79 21 19 26 2.25 22 20 26 2.75 26 21 26 3.19 0 0 27 1.05 0 1 27 0.892 0 2 27 0.750 0 3 27 0.611 0 4 27 0.431 0 5 27 0.220 0 6 27 0.546 0 7 27 0.917 0 8 27 0.919 0 9 27 0.685 0 10 27 0.807 0 11 27 0.808 0 12 27 1.15 0 13 27 0.732 0 14 27 1.12 0 15 27 0.923 0 16 27 1.10 2 17 27 1.36 17 18 27 1.78 22 19 27 2.38 27 20 27 2.73 35 21 27 3.27 0 0 28 1.28 0 1 28 1.38 0 2 28 1.38 0 3 28 1.30 0 4 28 1.12 0 5 28 0.775 0 6 28 0.743 0 7 28 1.10 0 8 28 1.10 0 9 28 1.09 0 10 28 1.31 0 11 28 1.09 0 12 28 0.984 0 13 28 1.18 0 14 28 1.30 0 15 28 1.11 1 16 28 1.31 4 17 28 1.56 9 18 28 2.07 13 19 28 2.47 28 20 28 3.36 38 21 28 3.97 0 0 29 0.665 0 1 29 0.813 0 2 29 0.795 0 3 29 0.754 0 4 29 0.675 0 5 29 0.633 0 6 29 0.614 0 7 29 0.521 0 8 29 0.665 0 9 29 0.602 0 10 29 0.695 0 11 29 0.647 0 12 29 0.714 0 13 29 0.650 0 14 29 0.761 0 15 29 0.827 0 16 29 0.738 0 17 29 0.890 8 18 29 1.46 13 19 29 2.19 34 20 29 3.19 46 21 29 3.85 0 0 30 1.16 0 1 30 1.15 0 2 30 1.07 0 3 30 1.16 0 4 30 1.16 0 5 30 1.15 0 6 30 1.03 0 7 30 1.22 5 8 30 1.03 0 9 30 0.907 0 10 30 1.05 0 11 30 0.749 0 12 30 0.964 0 13 30 1.08 0 14 30 1.13 0 15 30 1.04 0 16 30 1.05 2 17 30 1.31 0 18 30 1.59 16 19 30 2.33 27 20 30 3.23 48 21 30 4.75 2 0 31 1.76 5 1 31 1.84 8 2 31 1.54 5 3 31 1.57 10 4 31 1.51 8 5 31 1.47 9 6 31 1.58 5 7 31 1.37 0 8 31 1.40 0 9 31 1.20 0 10 31 1.27 2 11 31 1.34 0 12 31 1.19 0 13 31 1.26 1 14 31 1.29 3 15 31 1.21 1 16 31 1.40 9 17 31 1.44 11 18 31 1.77 13 19 31 2.04 37 20 31 3.52 41 21 31 4.42 6 0 32 1.52 0 1 32 1.40 0 2 32 1.49 0 3 32 1.41 2 4 32 1.22 2 5 32 1.34 4 6 32 1.39 3 7 32 1.58 0 8 32 1.36 0 9 32 1.20 0 10 32 1.09 1 11 32 0.845 3 12 32 1.26 0 13 32 1.18 0 14 32 1.18 0 15 32 1.01 0 16 32 1.01 0 17 32 1.50 9 18 32 1.71 13 19 32 1.95 27 20 32 2.74 37 21 32 3.64 1 0 33 1.33 0 1 33 1.10 0 2 33 1.34 0 3 33 1.10 0 4 33 1.01 0 5 33 1.16 3 6 33 1.21 0 7 33 0.721 0 8 33 0.963 0 9 33 0.928 0 10 33 0.903 0 11 33 0.745 0 12 33 0.855 0 13 33 0.991 0 14 33 0.925 0 15 33 0.840 0 16 33 1.14 0 17 33 1.10 0 18 33 1.22 1 19 33 1.37 16 20 33 2.12 20 21 33 2.72