7 0 1 7.02 2 1 1 5.92 1 2 1 6.17 0 3 1 5.03 0 4 1 4.06 0 5 1 3.77 0 6 1 2.74 0 7 1 2.05 0 8 1 2.68 0 9 1 2.86 0 10 1 1.87 0 11 1 2.06 0 12 1 1.04 0 13 1 1.59 0 14 1 1.14 0 15 1 0.638 0 16 1 2.03 0 17 1 2.04 0 18 1 1.07 0 19 1 1.55 0 20 1 1.43 0 21 1 1.58 11 0 2 7.55 13 1 2 6.22 3 2 2 5.43 3 3 2 4.87 0 4 2 2.94 0 5 2 2.43 0 6 2 1.88 0 7 2 2.02 0 8 2 1.54 0 9 2 1.21 0 10 2 1.12 0 11 2 0.494 0 12 2 0.520 0 13 2 0.302 0 14 2 -0.0340 0 15 2 0.844 0 16 2 0.717 0 17 2 0.699 0 18 2 0.655 0 19 2 0.648 0 20 2 0.512 0 21 2 0.0344 20 0 3 9.58 14 1 3 7.91 8 2 3 6.06 5 3 3 4.90 0 4 3 4.26 0 5 3 3.64 0 6 3 2.99 0 7 3 2.29 0 8 3 1.99 0 9 3 1.57 0 10 3 1.42 0 11 3 1.22 0 12 3 0.547 0 13 3 0.650 0 14 3 1.30 0 15 3 0.858 0 16 3 0.299 0 17 3 0.580 0 18 3 0.280 0 19 3 0.825 0 20 3 0.487 0 21 3 0.530 24 0 4 10.0 6 1 4 7.86 6 2 4 6.97 0 3 4 4.51 0 4 4 2.33 0 5 4 2.40 0 6 4 1.69 0 7 4 1.64 0 8 4 1.23 0 9 4 0.741 0 10 4 0.863 0 11 4 1.81 0 12 4 0.681 0 13 4 0.0899 0 14 4 -0.380 0 15 4 0.875 0 16 4 0.595 0 17 4 0.671 0 18 4 0.0110 0 19 4 0.365 0 20 4 0.507 0 21 4 0.636 26 0 5 11.0 10 1 5 7.98 0 2 5 5.92 0 3 5 5.38 0 4 5 3.48 0 5 5 2.58 0 6 5 2.14 0 7 5 1.39 0 8 5 1.46 0 9 5 1.20 0 10 5 1.33 0 11 5 0.659 0 12 5 1.51 0 13 5 0.832 0 14 5 0.319 0 15 5 0.993 0 16 5 0.384 0 17 5 -0.0949 0 18 5 0.0315 0 19 5 0.557 0 20 5 0.430 0 21 5 0.819 29 0 6 12.8 15 1 6 9.19 9 2 6 7.65 2 3 6 5.39 7 4 6 3.92 0 5 6 2.57 0 6 6 2.87 0 7 6 2.44 0 8 6 0.992 0 9 6 1.61 0 10 6 1.84 0 11 6 0.979 0 12 6 0.989 0 13 6 1.25 0 14 6 1.54 0 15 6 1.33 0 16 6 1.71 0 17 6 0.775 0 18 6 1.32 0 19 6 0.992 0 20 6 1.58 0 21 6 2.01 26 0 7 11.7 21 1 7 9.02 12 2 7 7.52 0 3 7 5.85 2 4 7 4.07 0 5 7 3.02 0 6 7 2.35 0 7 7 2.59 0 8 7 1.86 0 9 7 2.18 0 10 7 1.76 0 11 7 1.93 0 12 7 1.43 0 13 7 1.51 0 14 7 1.52 0 15 7 1.57 0 16 7 0.955 0 17 7 1.06 0 18 7 0.959 0 19 7 0.848 0 20 7 0.241 0 21 7 1.09 21 0 8 10.1 11 1 8 7.73 6 2 8 5.59 1 3 8 4.36 0 4 8 3.37 0 5 8 2.21 0 6 8 1.80 0 7 8 1.57 0 8 8 1.34 0 9 8 0.596 0 10 8 0.663 0 11 8 0.750 0 12 8 0.929 0 13 8 1.10 0 14 8 0.603 0 15 8 0.629 0 16 8 0.0774 0 17 8 -0.357 0 18 8 0.0536 0 19 8 0.0453 0 20 8 0.390 0 21 8 0.317 15 0 9 8.32 5 1 9 5.79 2 2 9 4.54 0 3 9 3.38 0 4 9 2.31 0 5 9 2.25 0 6 9 1.42 0 7 9 0.744 0 8 9 0.317 0 9 9 0.698 0 10 9 0.467 0 11 9 0.290 0 12 9 0.659 0 13 9 0.620 0 14 9 -0.118 0 15 9 0.517 0 16 9 0.535 0 17 9 0.598 0 18 9 -0.554 0 19 9 -0.230 0 20 9 0.377 0 21 9 0.302 13 0 10 7.86 2 1 10 5.32 0 2 10 4.56 0 3 10 3.30 0 4 10 2.67 0 5 10 2.34 0 6 10 1.93 0 7 10 1.42 0 8 10 1.49 0 9 10 1.86 0 10 10 1.29 0 11 10 1.25 0 12 10 2.48 0 13 10 1.56 0 14 10 1.04 0 15 10 0.253 0 16 10 0.124 0 17 10 0.133 0 18 10 0.547 0 19 10 0.252 0 20 10 0.568 0 21 10 0.688 7 0 11 5.75 5 1 11 5.51 0 2 11 3.99 0 3 11 3.39 0 4 11 2.41 0 5 11 1.95 0 6 11 0.872 0 7 11 0.965 0 8 11 1.14 0 9 11 1.26 0 10 11 0.805 0 11 11 0.824 0 12 11 0.341 0 13 11 0.511 0 14 11 0.256 0 15 11 -0.249 0 16 11 -0.469 0 17 11 -0.487 0 18 11 -0.794 0 19 11 -0.302 0 20 11 0.604 0 21 11 0.816 2 0 12 6.42 0 1 12 3.79 0 2 12 3.60 0 3 12 2.52 0 4 12 1.44 0 5 12 1.14 0 6 12 1.23 0 7 12 1.10 0 8 12 0.596 0 9 12 1.25 0 10 12 0.900 0 11 12 0.403 0 12 12 0.351 0 13 12 -0.0176 0 14 12 -0.0728 0 15 12 -0.271 0 16 12 -1.27 0 17 12 -0.661 0 18 12 0.157 0 19 12 -0.423 0 20 12 -0.398 0 21 12 -0.0822 1 0 13 4.52 0 1 13 3.82 2 2 13 3.35 0 3 13 2.38 0 4 13 2.61 0 5 13 1.26 0 6 13 0.511 0 7 13 2.75 0 8 13 1.96 0 9 13 2.33 0 10 13 1.26 0 11 13 1.36 0 12 13 2.00 0 13 13 1.18 0 14 13 1.11 0 15 13 0.693 0 16 13 0.467 0 17 13 0.176 0 18 13 0.318 0 19 13 0.00530 0 20 13 0.672 0 21 13 -0.221 0 0 14 4.30 0 1 14 3.95 0 2 14 3.43 0 3 14 2.64 0 4 14 2.32 0 5 14 1.85 0 6 14 4.11 0 7 14 3.62 0 8 14 2.80 0 9 14 2.43 0 10 14 1.75 0 11 14 2.00 0 12 14 1.93 0 13 14 1.95 0 14 14 0.884 0 15 14 0.631 0 16 14 0.928 0 17 14 0.377 0 18 14 -0.620 0 19 14 0.0701 0 20 14 0.777 0 21 14 1.07 0 0 15 3.88 0 1 15 3.71 0 2 15 3.07 0 3 15 2.10 0 4 15 2.35 0 5 15 1.85 0 6 15 2.78 0 7 15 3.91 0 8 15 2.87 0 9 15 2.24 0 10 15 1.90 0 11 15 2.38 0 12 15 1.59 0 13 15 1.77 0 14 15 0.182 0 15 15 0.0847 0 16 15 0.308 0 17 15 0.409 0 18 15 -0.144 0 19 15 0.0885 0 20 15 -0.103 0 21 15 0.786 0 0 16 3.55 0 1 16 3.06 0 2 16 2.19 0 3 16 2.47 0 4 16 2.01 0 5 16 2.17 0 6 16 3.34 0 7 16 1.75 0 8 16 1.72 0 9 16 2.96 0 10 16 2.62 0 11 16 1.73 0 12 16 2.32 0 13 16 1.34 0 14 16 0.474 0 15 16 0.617 0 16 16 0.454 0 17 16 -0.108 0 18 16 0.410 0 19 16 0.351 0 20 16 0.233 0 21 16 0.565 0 0 17 2.45 0 1 17 2.34 0 2 17 1.55 0 3 17 0.980 0 4 17 2.04 0 5 17 1.36 0 6 17 1.41 0 7 17 1.02 0 8 17 2.27 0 9 17 5.59 0 10 17 4.75 0 11 17 2.99 0 12 17 2.12 0 13 17 1.01 0 14 17 0.118 0 15 17 -0.239 0 16 17 0.0168 0 17 17 0.518 0 18 17 0.139 0 19 17 -0.153 0 20 17 0.00725 0 21 17 -0.156 0 0 18 1.93 0 1 18 1.50 0 2 18 0.890 0 3 18 -0.396 0 4 18 -0.174 0 5 18 0.368 0 6 18 0.0129 0 7 18 0.752 0 8 18 2.58 47 9 18 22.2 0 10 18 5.26 0 11 18 1.70 0 12 18 0.0787 0 13 18 -0.185 0 14 18 -0.969 0 15 18 -1.09 0 16 18 -0.850 0 17 18 -1.09 0 18 18 -0.925 0 19 18 -1.01 0 20 18 -0.510 0 21 18 -0.568 0 0 19 0.467 0 1 19 1.10 0 2 19 0.831 0 3 19 0.247 0 4 19 -0.235 0 5 19 0.125 0 6 19 -0.282 0 7 19 0.773 0 8 19 2.84 84 9 19 92.0 7 10 19 5.95 0 11 19 2.03 0 12 19 0.317 0 13 19 -0.207 0 14 19 -1.16 0 15 19 -0.931 0 16 19 -0.971 0 17 19 -0.876 0 18 19 -0.842 0 19 19 -0.950 0 20 19 -0.721 0 21 19 -0.980 0 0 20 0.835 0 1 20 1.54 0 2 20 0.540 0 3 20 0.318 0 4 20 -0.334 0 5 20 -0.0869 0 6 20 0.485 0 7 20 0.656 0 8 20 1.96 10 9 20 7.30 0 10 20 4.65 0 11 20 1.35 0 12 20 0.816 0 13 20 -0.223 0 14 20 -0.743 0 15 20 -0.912 0 16 20 -1.04 0 17 20 -1.06 0 18 20 -0.0681 0 19 20 -0.592 0 20 20 -0.683 0 21 20 -0.0791 0 0 21 1.65 0 1 21 0.685 0 2 21 0.456 0 3 21 0.598 0 4 21 0.606 0 5 21 0.668 0 6 21 0.366 0 7 21 0.468 0 8 21 1.14 0 9 21 2.97 0 10 21 1.76 0 11 21 1.10 0 12 21 1.33 0 13 21 0.664 0 14 21 -0.145 0 15 21 -0.177 0 16 21 -0.0428 0 17 21 -0.756 0 18 21 -0.788 0 19 21 0.185 0 20 21 -0.339 0 21 21 0.273 0 0 22 1.07 0 1 22 0.100 0 2 22 0.426 0 3 22 0.199 0 4 22 -0.287 0 5 22 -0.402 0 6 22 0.325 0 7 22 -0.305 0 8 22 -0.349 0 9 22 0.284 0 10 22 0.410 0 11 22 0.842 0 12 22 0.963 0 13 22 0.133 0 14 22 -0.320 0 15 22 -0.511 0 16 22 -0.450 0 17 22 -0.797 0 18 22 -1.45 0 19 22 -1.19 0 20 22 -1.11 0 21 22 -0.770 0 0 23 1.01 0 1 23 -0.466 0 2 23 0.197 0 3 23 -0.454 0 4 23 0.864 0 5 23 0.00528 0 6 23 0.337 0 7 23 0.483 0 8 23 0.118 0 9 23 0.384 0 10 23 0.900 0 11 23 -0.0155 0 12 23 0.523 0 13 23 -0.0142 0 14 23 -0.542 0 15 23 -1.25 0 16 23 -0.983 0 17 23 -0.675 0 18 23 -0.474 0 19 23 0.410 0 20 23 -1.29 0 21 23 -0.204 0 0 24 0.856 0 1 24 1.05 0 2 24 0.869 0 3 24 0.396 0 4 24 1.26 0 5 24 0.110 0 6 24 0.358 0 7 24 1.24 0 8 24 0.882 0 9 24 0.934 0 10 24 1.39 0 11 24 0.285 0 12 24 1.01 0 13 24 1.32 0 14 24 0.674 0 15 24 0.0505 0 16 24 -0.400 0 17 24 0.443 0 18 24 -0.175 0 19 24 0.175 0 20 24 0.309 0 21 24 0.710 0 0 25 -0.287 0 1 25 0.950 0 2 25 -0.854 0 3 25 -0.449 0 4 25 0.811 0 5 25 -0.290 0 6 25 -0.350 0 7 25 0.688 0 8 25 0.497 0 9 25 0.759 0 10 25 0.615 0 11 25 0.362 0 12 25 0.396 0 13 25 0.643 0 14 25 0.354 0 15 25 -0.0513 0 16 25 -0.968 0 17 25 -0.235 0 18 25 -0.173 0 19 25 -0.342 0 20 25 -0.774 0 21 25 0.256 0 0 26 0.212 0 1 26 0.0560 0 2 26 -0.803 0 3 26 -0.0861 0 4 26 0.0929 0 5 26 0.131 0 6 26 -0.107 0 7 26 -0.175 0 8 26 -0.628 0 9 26 -0.113 0 10 26 0.0121 0 11 26 -0.313 0 12 26 0.370 0 13 26 0.384 0 14 26 -0.236 0 15 26 -0.539 0 16 26 -0.734 0 17 26 -1.36 0 18 26 -0.249 0 19 26 -1.20 0 20 26 -0.780 0 21 26 -0.684 0 0 27 1.72 0 1 27 0.760 0 2 27 0.541 0 3 27 2.38 0 4 27 2.91 0 5 27 2.17 0 6 27 0.661 0 7 27 0.426 0 8 27 0.873 0 9 27 1.41 0 10 27 2.02 0 11 27 1.19 0 12 27 0.675 0 13 27 0.901 0 14 27 1.33 0 15 27 0.420 0 16 27 0.239 0 17 27 -0.261 0 18 27 0.870 0 19 27 0.136 0 20 27 -0.323 0 21 27 0.775 0 0 28 1.67 0 1 28 0.562 0 2 28 0.530 0 3 28 2.48 0 4 28 2.83 0 5 28 1.57 0 6 28 2.01 0 7 28 0.897 0 8 28 2.06 0 9 28 1.85 0 10 28 2.61 0 11 28 1.18 0 12 28 1.53 0 13 28 1.78 0 14 28 0.0141 0 15 28 -0.367 0 16 28 -0.257 0 17 28 -0.302 0 18 28 -0.470 0 19 28 -0.427 0 20 28 0.116 0 21 28 0.0933 0 0 29 1.24 0 1 29 0.929 0 2 29 0.141 0 3 29 1.46 0 4 29 2.66 0 5 29 2.60 0 6 29 1.65 0 7 29 1.60 0 8 29 1.87 0 9 29 1.79 0 10 29 1.84 0 11 29 1.83 0 12 29 1.42 0 13 29 1.36 0 14 29 0.194 0 15 29 -0.373 0 16 29 0.297 0 17 29 0.219 0 18 29 -0.130 0 19 29 -0.0512 0 20 29 -0.130 0 21 29 0.153 0 0 30 1.54 0 1 30 1.67 0 2 30 0.378 0 3 30 2.38 0 4 30 1.94 0 5 30 3.17 0 6 30 2.19 0 7 30 2.13 0 8 30 1.43 0 9 30 2.19 0 10 30 1.27 0 11 30 1.77 0 12 30 1.53 0 13 30 1.52 0 14 30 1.86 0 15 30 0.340 0 16 30 1.31 0 17 30 0.615 0 18 30 1.56 0 19 30 0.525 0 20 30 0.990 0 21 30 1.34 0 0 31 2.05 0 1 31 1.50 0 2 31 0.487 0 3 31 2.02 0 4 31 0.596 0 5 31 2.13 0 6 31 1.66 0 7 31 2.40 0 8 31 2.35 0 9 31 1.20 0 10 31 1.42 0 11 31 1.91 0 12 31 1.45 0 13 31 1.15 0 14 31 1.49 0 15 31 -0.464 0 16 31 1.13 0 17 31 1.11 0 18 31 1.01 0 19 31 1.56 0 20 31 1.28 0 21 31 1.63 0 0 32 0.850 0 1 32 0.498 0 2 32 -0.0865 0 3 32 1.68 0 4 32 1.13 0 5 32 1.47 0 6 32 2.09 0 7 32 1.41 0 8 32 1.06 0 9 32 1.32 0 10 32 1.59 0 11 32 0.958 0 12 32 1.45 0 13 32 1.94 0 14 32 1.44 0 15 32 0.976 0 16 32 1.37 0 17 32 0.853 0 18 32 1.87 0 19 32 1.46 0 20 32 1.56 0 21 32 1.60 0 0 33 0.772 0 1 33 0.270 0 2 33 0.519 0 3 33 0.319 0 4 33 0.0628 0 5 33 1.00 0 6 33 1.41 0 7 33 0.696 0 8 33 -0.101 0 9 33 0.0283 0 10 33 0.600 0 11 33 1.01 0 12 33 0.909 0 13 33 0.835 0 14 33 0.771 0 15 33 0.530 0 16 33 -0.00835 0 17 33 1.30 0 18 33 0.938 0 19 33 0.954 0 20 33 1.00 0 21 33 1.67