0 0 1 -0.101 0 1 1 0.0519 0 2 1 0.194 0 3 1 0.496 0 4 1 0.920 8 5 1 1.68 12 6 1 1.83 15 7 1 2.15 12 8 1 2.08 3 9 1 1.56 0 0 2 0.188 0 1 2 0.336 0 2 2 0.599 0 3 2 0.973 17 4 2 2.24 31 5 2 3.13 29 6 2 2.92 35 7 2 3.36 39 8 2 3.71 25 9 2 3.02 0 0 3 0.205 0 1 3 0.350 0 2 3 0.541 3 3 3 1.17 83 4 3 7.46 64 5 3 5.20 41 6 3 3.60 60 7 3 4.85 73 8 3 5.97 44 9 3 4.05 0 0 4 0.459 0 1 4 0.648 0 2 4 0.701 9 3 4 1.61 264 4 4 44.4 80 5 4 6.85 57 6 4 4.76 100 7 4 8.14 148 8 4 12.1 82 9 4 6.84 0 0 5 0.549 0 1 5 0.639 0 2 5 0.778 0 3 5 1.12 60 4 5 5.79 64 5 5 6.38 77 6 5 6.47 196 7 5 18.8 334 8 5 37.6 143 9 5 13.9 0 0 6 0.581 0 1 6 0.581 0 2 6 0.587 0 3 6 0.816 16 4 6 2.07 51 5 6 4.27 111 6 6 9.15 345 7 6 49.9 437 8 6 80.5 144 9 6 16.6 8 0 7 1.49 0 1 7 0.802 0 2 7 0.703 0 3 7 0.966 13 4 7 2.15 35 5 7 3.14 135 6 7 12.7 326 7 7 49.3 235 8 7 20.1 119 9 7 10.7 21 0 8 2.45 16 1 8 2.20 7 2 8 1.33 2 3 8 1.10 16 4 8 2.05 32 5 8 3.01 85 6 8 7.09 141 7 8 11.6 103 8 8 8.14 78 9 8 6.67 24 0 9 3.33 30 1 9 3.32 31 2 9 3.49 36 3 9 3.55 38 4 9 3.57 37 5 9 3.59 70 6 9 5.96 83 7 9 6.69 64 8 9 5.42 47 9 9 4.28 24 0 10 2.95 19 1 10 2.74 44 2 10 13.0 64 3 10 5.54 92 4 10 7.93 114 5 10 9.76 120 6 10 11.0 106 7 10 9.00 53 8 10 4.76 26 9 10 2.91 24 0 11 4.34 23 1 11 2.38 34 2 11 3.09 34 3 11 3.29 28 4 11 3.20 114 5 11 9.66 86 6 11 9.96 54 7 11 5.51 21 8 11 2.44 7 9 11 1.47 13 0 12 2.18 48 1 12 6.22 11 2 12 1.89 16 3 12 2.20 18 4 12 2.48 8 5 12 1.78 19 6 12 2.52 12 7 12 2.33 32 8 12 4.04 27 9 12 3.26 47 0 13 6.59 77 1 13 12.5 2 2 13 1.10 4 3 13 1.16 8 4 13 1.47 12 5 13 1.79 11 6 13 1.61 2 7 13 1.18 9 8 13 1.82 8 9 13 1.68 51 0 14 4.61 28 1 14 3.23 0 2 14 1.15 0 3 14 0.872 0 4 14 0.887 0 5 14 0.958 0 6 14 0.863 0 7 14 0.936 5 8 14 1.73 0 9 14 1.05