24 0 1 0.571 26 1 1 0.592 29 2 1 0.626 31 3 1 0.617 36 4 1 0.628 37 5 1 0.637 37 6 1 0.626 39 7 1 0.620 39 8 1 0.624 38 9 1 0.616 38 10 1 0.603 40 11 1 0.606 38 12 1 0.615 43 13 1 0.599 46 14 1 0.607 42 15 1 0.622 44 16 1 0.619 39 17 1 0.599 39 18 1 0.567 28 19 1 0.522 25 20 1 0.484 13 21 1 0.442 18 0 2 0.534 27 1 2 0.577 33 2 2 0.607 31 3 2 0.615 38 4 2 0.645 37 5 2 0.646 34 6 2 0.618 38 7 2 0.631 42 8 2 0.617 43 9 2 0.611 40 10 2 0.629 47 11 2 0.638 47 12 2 0.649 44 13 2 0.630 45 14 2 0.637 44 15 2 0.647 48 16 2 0.623 43 17 2 0.614 40 18 2 0.597 39 19 2 0.559 28 20 2 0.511 19 21 2 0.457 21 0 3 0.538 26 1 3 0.593 35 2 3 0.616 39 3 3 0.635 38 4 3 0.646 40 5 3 0.675 41 6 3 0.629 45 7 3 0.642 44 8 3 0.636 47 9 3 0.631 47 10 3 0.615 47 11 3 0.624 47 12 3 0.647 48 13 3 0.663 49 14 3 0.661 55 15 3 0.665 45 16 3 0.656 48 17 3 0.656 53 18 3 0.660 41 19 3 0.600 36 20 3 0.542 20 21 3 0.482 22 0 4 0.519 30 1 4 0.601 40 2 4 0.641 39 3 4 0.645 47 4 4 0.657 46 5 4 0.640 44 6 4 0.647 46 7 4 0.643 47 8 4 0.643 49 9 4 0.624 53 10 4 0.642 45 11 4 0.654 51 12 4 0.634 46 13 4 0.647 49 14 4 0.661 50 15 4 0.668 55 16 4 0.681 55 17 4 0.674 55 18 4 0.666 48 19 4 0.621 39 20 4 0.581 33 21 4 0.489 14 0 5 0.493 37 1 5 0.631 47 2 5 0.659 47 3 5 0.671 43 4 5 0.668 45 5 5 0.665 50 6 5 0.676 44 7 5 0.656 48 8 5 0.652 45 9 5 0.656 49 10 5 0.663 52 11 5 0.665 48 12 5 0.652 56 13 5 0.677 49 14 5 0.656 59 15 5 0.694 56 16 5 0.691 60 17 5 0.688 59 18 5 0.704 57 19 5 0.696 47 20 5 0.606 33 21 5 0.536 13 0 6 0.457 39 1 6 0.607 37 2 6 0.653 40 3 6 0.664 42 4 6 0.651 42 5 6 0.656 48 6 6 0.651 47 7 6 0.660 48 8 6 0.663 44 9 6 0.644 42 10 6 0.663 49 11 6 0.667 52 12 6 0.663 50 13 6 0.646 55 14 6 0.669 52 15 6 0.657 58 16 6 0.673 57 17 6 0.687 57 18 6 0.693 53 19 6 0.675 43 20 6 0.621 38 21 6 0.531 8 0 7 0.413 26 1 7 0.593 43 2 7 0.659 41 3 7 0.645 42 4 7 0.644 45 5 7 0.641 48 6 7 0.679 44 7 7 0.689 48 8 7 0.670 45 9 7 0.654 45 10 7 0.667 46 11 7 0.661 53 12 7 0.671 46 13 7 0.661 59 14 7 0.698 53 15 7 0.682 57 16 7 0.682 52 17 7 0.679 54 18 7 0.672 47 19 7 0.668 48 20 7 0.634 33 21 7 0.537 8 0 8 0.413 27 1 8 0.566 44 2 8 0.643 40 3 8 0.652 42 4 8 0.646 46 5 8 0.661 52 6 8 0.695 47 7 8 0.675 52 8 8 0.689 54 9 8 0.673 54 10 8 0.687 49 11 8 0.669 47 12 8 0.658 48 13 8 0.664 58 14 8 0.687 53 15 8 0.683 57 16 8 0.713 59 17 8 0.707 62 18 8 0.717 52 19 8 0.694 52 20 8 0.655 32 21 8 0.528 8 0 9 0.438 16 1 9 0.498 48 2 9 0.695 44 3 9 0.684 45 4 9 0.655 45 5 9 0.690 51 6 9 0.703 49 7 9 0.706 51 8 9 0.696 51 9 9 0.693 55 10 9 0.693 51 11 9 0.691 54 12 9 0.684 56 13 9 0.701 58 14 9 0.712 57 15 9 0.713 63 16 9 0.735 63 17 9 0.764 63 18 9 0.782 62 19 9 0.742 52 20 9 0.668 38 21 9 0.535 13 0 10 0.456 11 1 10 0.490 43 2 10 0.700 49 3 10 0.716 50 4 10 0.707 50 5 10 0.715 52 6 10 0.729 51 7 10 0.745 65 8 10 0.774 55 9 10 0.743 56 10 10 0.731 57 11 10 0.739 60 12 10 0.753 58 13 10 0.749 65 14 10 0.763 65 15 10 0.752 69 16 10 0.790 71 17 10 0.818 77 18 10 0.879 71 19 10 0.817 57 20 10 0.703 38 21 10 0.580 10 0 11 0.451 4 1 11 0.431 42 2 11 0.652 42 3 11 0.670 51 4 11 0.690 54 5 11 0.720 52 6 11 0.726 52 7 11 0.731 57 8 11 0.746 58 9 11 0.719 58 10 11 0.736 62 11 11 0.733 59 12 11 0.741 61 13 11 0.766 62 14 11 0.742 59 15 11 0.753 66 16 11 0.805 76 17 11 0.860 85 18 11 0.920 68 19 11 0.815 53 20 11 0.664 30 21 11 0.487 11 0 12 0.460 12 1 12 0.437 41 2 12 0.648 40 3 12 0.668 51 4 12 0.694 44 5 12 0.687 50 6 12 0.726 49 7 12 0.695 59 8 12 0.709 50 9 12 0.717 56 10 12 0.702 55 11 12 0.723 57 12 12 0.716 59 13 12 0.761 63 14 12 0.780 66 15 12 0.796 80 16 12 0.879 85 17 12 0.957 94 18 12 0.988 77 19 12 0.848 33 20 12 0.565 20 21 12 0.448 22 0 13 0.497 14 1 13 0.468 32 2 13 0.594 44 3 13 0.688 46 4 13 0.702 51 5 13 0.722 56 6 13 0.735 57 7 13 0.751 56 8 13 0.752 54 9 13 0.745 60 10 13 0.738 61 11 13 0.754 60 12 13 0.746 62 13 13 0.763 71 14 13 0.825 73 15 13 0.884 93 16 13 1.03 95 17 13 1.08 65 18 13 0.807 35 19 13 0.571 21 20 13 0.431 14 21 13 0.392 20 0 14 0.481 17 1 14 0.468 19 2 14 0.502 43 3 14 0.663 50 4 14 0.696 51 5 14 0.695 61 6 14 0.744 59 7 14 0.721 59 8 14 0.731 54 9 14 0.724 63 10 14 0.731 58 11 14 0.715 53 12 14 0.667 51 13 14 0.653 58 14 14 0.702 80 15 14 0.902 143 16 14 1.55 70 17 14 0.854 31 18 14 0.482 9 19 14 0.363 8 20 14 0.365 5 21 14 0.349 11 0 15 0.445 13 1 15 0.435 20 2 15 0.462 38 3 15 0.605 43 4 15 0.626 47 5 15 0.656 50 6 15 0.674 49 7 15 0.678 55 8 15 0.706 56 9 15 0.716 54 10 15 0.702 57 11 15 0.719 59 12 15 0.680 67 13 15 0.763 144 14 15 2.05 222 15 15 2.26 322 16 15 5.53 101 17 15 2.07 23 18 15 0.437 5 19 15 0.345 4 20 15 0.353 2 21 15 0.318 15 0 16 0.484 12 1 16 0.479 13 2 16 0.449 33 3 16 0.603 31 4 16 0.555 50 5 16 0.684 51 6 16 0.725 52 7 16 0.704 53 8 16 0.703 55 9 16 0.709 64 10 16 0.828 99 11 16 1.09 82 12 16 0.934 107 13 16 1.13 680 14 16 13.7 285 15 16 2.93 177 16 16 1.96 40 17 16 0.745 9 18 16 0.375 4 19 16 0.345 2 20 16 0.347 2 21 16 0.311 14 0 17 0.474 15 1 17 0.471 18 2 17 0.456 29 3 17 0.559 22 4 17 0.505 46 5 17 0.663 53 6 17 0.711 46 7 17 0.681 47 8 17 0.641 59 9 17 0.758 110 10 17 1.22 251 11 17 2.66 155 12 17 1.66 156 13 17 1.69 451 14 17 5.20 150 15 17 2.80 48 16 17 0.664 11 17 17 0.409 6 18 17 0.354 2 19 17 0.334 6 20 17 0.341 2 21 17 0.324 19 0 18 0.458 14 1 18 0.459 15 2 18 0.448 26 3 18 0.524 23 4 18 0.494 46 5 18 0.659 43 6 18 0.638 44 7 18 0.636 56 8 18 0.711 78 9 18 0.926 162 10 18 1.76 475 11 18 8.56 245 12 18 2.52 147 13 18 1.56 133 14 18 1.83 51 15 18 0.780 24 16 18 0.481 11 17 18 0.375 5 18 18 0.345 6 19 18 0.334 3 20 18 0.328 3 21 18 0.323 7 0 19 0.444 7 1 19 0.441 10 2 19 0.452 15 3 19 0.474 19 4 19 0.484 44 5 19 0.685 43 6 19 0.680 55 7 19 0.738 72 8 19 0.845 100 9 19 1.12 232 10 19 2.43 643 11 19 7.25 495 12 19 5.03 74 13 19 0.982 18 14 19 0.471 14 15 19 0.427 17 16 19 0.399 2 17 19 0.352 2 18 19 0.326 2 19 19 0.317 2 20 19 0.398 2 21 19 0.298 7 0 20 0.463 9 1 20 0.449 10 2 20 0.445 20 3 20 0.474 27 4 20 0.541 70 5 20 0.870 75 6 20 0.925 67 7 20 0.848 83 8 20 0.995 107 9 20 1.22 256 10 20 2.69 495 11 20 5.61 351 12 20 7.21 26 13 20 0.505 21 14 20 0.445 16 15 20 0.426 11 16 20 0.390 4 17 20 0.334 2 18 20 0.318 2 19 20 0.334 2 20 20 0.331 2 21 20 0.310 11 0 21 0.483 11 1 21 0.458 9 2 21 0.443 20 3 21 0.479 30 4 21 0.552 81 5 21 1.01 102 6 21 1.14 77 7 21 0.941 84 8 21 0.964 90 9 21 1.07 323 10 21 3.34 192 11 21 2.26 87 12 21 1.59 20 13 21 0.443 16 14 21 0.430 17 15 21 0.427 9 16 21 0.390 5 17 21 0.325 2 18 21 0.328 2 19 21 0.316 2 20 21 0.323 2 21 21 0.296 13 0 22 0.468 6 1 22 0.433 7 2 22 0.452 17 3 22 0.493 40 4 22 0.659 118 5 22 1.40 123 6 22 1.36 80 7 22 0.965 88 8 22 1.06 101 9 22 1.21 413 10 22 4.51 108 11 22 1.45 32 12 22 0.576 6 13 22 0.373 4 14 22 0.371 22 15 22 0.712 25 16 22 1.17 2 17 22 0.306 2 18 22 0.296 2 19 22 0.299 2 20 22 0.315 2 21 22 0.274 12 0 23 0.459 16 1 23 0.483 8 2 23 0.444 16 3 23 0.462 93 4 23 2.21 298 5 23 6.61 139 6 23 1.49 93 7 23 1.15 143 8 23 1.53 106 9 23 1.29 331 10 23 3.85 85 11 23 1.14 27 12 23 0.492 7 13 23 0.373 8 14 23 0.350 25 15 23 0.928 42 16 23 2.62 2 17 23 0.299 2 18 23 0.319 2 19 23 0.339 2 20 23 0.409 2 21 23 0.295 12 0 24 0.460 11 1 24 0.439 14 2 24 0.462 18 3 24 0.501 85 4 24 2.09 255 5 24 6.05 169 6 24 3.57 182 7 24 1.90 37 8 24 0.695 24 9 24 0.555 36 10 24 0.723 28 11 24 0.523 26 12 24 0.470 15 13 24 0.396 13 14 24 0.401 16 15 24 0.415 29 16 24 0.462 6 17 24 0.351 3 18 24 0.313 2 19 24 0.329 3 20 24 0.332 2 21 24 0.318 14 0 25 0.449 14 1 25 0.462 16 2 25 0.476 22 3 25 0.496 38 4 25 0.598 46 5 25 0.664 55 6 25 0.901 23 7 25 0.488 16 8 25 0.422 14 9 25 0.418 16 10 25 0.404 12 11 25 0.390 12 12 25 0.393 15 13 25 0.394 10 14 25 0.367 11 15 25 0.387 5 16 25 0.348 2 17 25 0.328 4 18 25 0.336 2 19 25 0.298 2 20 25 0.313 5 21 25 0.343 13 0 26 0.459 15 1 26 0.429 15 2 26 0.457 12 3 26 0.440 22 4 26 0.468 19 5 26 0.467 17 6 26 0.449 10 7 26 0.418 7 8 26 0.378 6 9 26 0.363 7 10 26 0.374 2 11 26 0.349 8 12 26 0.360 9 13 26 0.359 7 14 26 0.357 6 15 26 0.345 2 16 26 0.324 4 17 26 0.328 2 18 26 0.313 2 19 26 0.305 2 20 26 0.296 7 21 26 0.339 14 0 27 0.449 12 1 27 0.458 10 2 27 0.445 10 3 27 0.459 17 4 27 0.452 14 5 27 0.435 16 6 27 0.440 14 7 27 0.453 14 8 27 0.431 14 9 27 0.413 15 10 27 0.410 10 11 27 0.400 14 12 27 0.396 12 13 27 0.387 14 14 27 0.406 15 15 27 0.414 9 16 27 0.385 10 17 27 0.367 13 18 27 0.364 8 19 27 0.348 9 20 27 0.366 2 21 27 0.331 15 0 28 0.470 12 1 28 0.470 19 2 28 0.471 22 3 28 0.499 20 4 28 0.482 14 5 28 0.467 22 6 28 0.458 17 7 28 0.451 15 8 28 0.430 14 9 28 0.424 12 10 28 0.409 17 11 28 0.399 16 12 28 0.422 18 13 28 0.425 22 14 28 0.454 15 15 28 0.418 17 16 28 0.396 10 17 28 0.362 14 18 28 0.392 12 19 28 0.393 14 20 28 0.387 9 21 28 0.382 20 0 29 0.483 22 1 29 0.499 28 2 29 0.529 25 3 29 0.519 22 4 29 0.502 18 5 29 0.463 20 6 29 0.465 17 7 29 0.440 17 8 29 0.446 14 9 29 0.445 22 10 29 0.422 25 11 29 0.466 28 12 29 0.470 22 13 29 0.446 20 14 29 0.429 16 15 29 0.427 21 16 29 0.418 19 17 29 0.416 18 18 29 0.404 13 19 29 0.387 15 20 29 0.397 5 21 29 0.347 23 0 30 0.504 22 1 30 0.527 21 2 30 0.494 27 3 30 0.513 26 4 30 0.503 17 5 30 0.483 22 6 30 0.484 19 7 30 0.463 20 8 30 0.450 18 9 30 0.456 21 10 30 0.455 19 11 30 0.439 23 12 30 0.440 19 13 30 0.423 17 14 30 0.417 20 15 30 0.434 26 16 30 0.428 21 17 30 0.439 17 18 30 0.424 16 19 30 0.401 18 20 30 0.442 26 21 30 0.492 14 0 31 0.511 22 1 31 0.525 22 2 31 0.513 24 3 31 0.528 24 4 31 0.530 22 5 31 0.517 25 6 31 0.487 21 7 31 0.468 19 8 31 0.436 12 9 31 0.431 17 10 31 0.426 15 11 31 0.418 13 12 31 0.436 14 13 31 0.422 13 14 31 0.405 11 15 31 0.409 17 16 31 0.403 21 17 31 0.425 23 18 31 0.430 11 19 31 0.410 38 20 31 0.639 58 21 31 0.725 15 0 32 0.464 13 1 32 0.495 19 2 32 0.499 22 3 32 0.495 25 4 32 0.499 16 5 32 0.472 15 6 32 0.448 12 7 32 0.442 17 8 32 0.440 14 9 32 0.400 16 10 32 0.416 13 11 32 0.408 10 12 32 0.380 11 13 32 0.379 9 14 32 0.369 10 15 32 0.350 11 16 32 0.366 7 17 32 0.367 7 18 32 0.357 23 19 32 0.498 56 20 32 0.749 52 21 32 0.714 20 0 33 0.490 15 1 33 0.520 23 2 33 0.540 22 3 33 0.492 21 4 33 0.508 22 5 33 0.488 20 6 33 0.471 16 7 33 0.449 17 8 33 0.440 14 9 33 0.418 16 10 33 0.411 11 11 33 0.406 9 12 33 0.384 6 13 33 0.383 10 14 33 0.367 4 15 33 0.365 7 16 33 0.362 26 17 33 0.579 38 18 33 0.625 55 19 33 0.761 67 20 33 0.815 62 21 33 0.788