24 0 1 4.37E-4 27 1 1 4.81E-4 30 2 1 5.31E-4 29 3 1 5.17E-4 26 4 1 4.75E-4 26 5 1 4.79E-4 27 6 1 4.98E-4 27 7 1 4.77E-4 2 0 2 5.54E-5 22 1 2 3.89E-4 34 2 2 6.03E-4 33 3 2 5.83E-4 31 4 2 5.99E-4 31 5 2 5.42E-4 32 6 2 5.65E-4 31 7 2 5.52E-4 8 0 3 1.65E-4 29 1 3 5.20E-4 32 2 3 5.71E-4 32 3 3 5.84E-4 33 4 3 6.01E-4 34 5 3 6.34E-4 36 6 3 6.36E-4 35 7 3 6.40E-4 5 0 4 8.64E-5 28 1 4 5.17E-4 32 2 4 6.06E-4 35 3 4 6.35E-4 37 4 4 6.71E-4 37 5 4 6.74E-4 38 6 4 6.93E-4 22 7 4 4.02E-4 3 0 5 6.13E-5 5 1 5 9.43E-5 13 2 5 2.30E-4 26 3 5 4.51E-4 34 4 5 6.13E-4 45 5 5 8.29E-4 23 6 5 4.15E-4 4 7 5 5.59E-5 4 0 6 8.04E-5 2 1 6 3.81E-5 9 2 6 1.55E-4 7 3 6 1.28E-4 4 4 6 7.95E-5 6 5 6 1.14E-4 6 6 6 1.08E-4 9 7 6 1.55E-4