-3 0 1 1.98E-6 -4 1 1 -5.60E-7 31 2 1 2.06E-4 64 3 1 3.30E-4 53 4 1 2.84E-4 12 5 1 1.03E-4 -7 6 1 -1.49E-5 -6 7 1 -1.55E-5 -1 0 2 1.01E-5 59 1 2 4.12E-4 121 2 2 6.56E-4 101 3 2 5.38E-4 87 4 2 4.62E-4 103 5 2 5.57E-4 27 6 2 2.33E-4 -3 7 2 1.19E-6 -2 0 3 1.07E-6 60 1 3 5.64E-4 44 2 3 3.23E-4 107 3 3 5.57E-4 105 4 3 5.59E-4 133 5 3 6.98E-4 26 6 3 2.50E-4 -3 7 3 -4.42E-6 -2 0 4 3.81E-6 4 1 4 3.80E-5 7 2 4 7.56E-5 64 3 4 3.56E-4 114 4 4 5.40E-4 25 5 4 2.12E-4 32 6 4 2.02E-4 -2 7 4 4.01E-6 0 0 5 1.90E-5 15 1 5 9.71E-5 31 2 5 1.86E-4 56 3 5 3.00E-4 56 4 5 3.15E-4 60 5 5 3.16E-4 30 6 5 1.78E-4 -1 7 5 1.27E-5 -1 0 6 1.52E-5 1 1 6 2.79E-5 41 2 6 2.33E-4 68 3 6 3.71E-4 71 4 6 3.84E-4 39 5 6 2.25E-4 2 6 6 2.21E-5 0 7 6 1.61E-5