79 0 1 0.0158 76 1 1 0.0152 55 2 1 0.0111 57 3 1 0.0116 90 4 1 0.0186 136 5 1 0.0273 63 6 1 0.0152 32 7 1 0.00676 93 0 2 0.0185 97 1 2 0.0196 80 2 2 0.0162 41 3 2 0.00862 32 4 2 0.00649 30 5 2 0.00607 32 6 2 0.00649 34 7 2 0.00687 90 0 3 0.0181 107 1 3 0.0215 106 2 3 0.0212 98 3 3 0.0196 81 4 3 0.0163 37 5 3 0.00762 51 6 3 0.0105 55 7 3 0.0114 68 0 4 0.0135 79 1 4 0.0158 131 2 4 0.0259 117 3 4 0.0229 65 4 4 0.0128 47 5 4 0.00947 58 6 4 0.0119 45 7 4 0.00923 47 0 5 0.00982 61 1 5 0.0121 99 2 5 0.0189 117 3 5 0.0228 121 4 5 0.0237 107 5 5 0.0210 84 6 5 0.0169 78 7 5 0.0158 107 0 6 0.0293 76 1 6 0.0153 61 2 6 0.0122 63 3 6 0.0127 62 4 6 0.0123 54 5 6 0.0114 48 6 6 0.0100 97 7 6 0.0283