78 0 1 0.0159 65 1 1 0.0134 64 2 1 0.0129 67 3 1 0.0131 67 4 1 0.0132 75 5 1 0.0152 71 6 1 0.0142 61 7 1 0.0124 61 8 1 0.0121 58 9 1 0.0119 57 10 1 0.0111 57 11 1 0.0117 60 12 1 0.0122 71 13 1 0.0142 79 14 1 0.0159 88 15 1 0.0175 107 16 1 0.0214 132 17 1 0.0263 148 18 1 0.0297 164 19 1 0.0331 176 20 1 0.0354 195 21 1 0.0394 206 22 1 0.0417 212 23 1 0.0430 203 24 1 0.0411 160 25 1 0.0321 111 26 1 0.0222 82 27 1 0.0164 71 28 1 0.0145 56 29 1 0.0114 42 30 1 0.00857 45 31 1 0.0114 84 0 2 0.0168 77 1 2 0.0156 73 2 2 0.0145 72 3 2 0.0144 77 4 2 0.0154 78 5 2 0.0158 77 6 2 0.0152 65 7 2 0.0132 53 8 2 0.0108 45 9 2 0.00921 38 10 2 0.00785 37 11 2 0.00767 45 12 2 0.00917 57 13 2 0.0117 63 14 2 0.0129 72 15 2 0.0147 83 16 2 0.0167 95 17 2 0.0194 112 18 2 0.0223 127 19 2 0.0251 146 20 2 0.0297 161 21 2 0.0327 164 22 2 0.0329 162 23 2 0.0326 147 24 2 0.0295 89 25 2 0.0181 48 26 2 0.00969 36 27 2 0.00734 35 28 2 0.00701 36 29 2 0.00734 32 30 2 0.00638 27 31 2 0.00541 90 0 3 0.0180 84 1 3 0.0165 78 2 3 0.0154 77 3 3 0.0154 81 4 3 0.0161 81 5 3 0.0164 74 6 3 0.0149 60 7 3 0.0119 49 8 3 0.00981 50 9 3 0.00987 49 10 3 0.00950 44 11 3 0.00864 52 12 3 0.0104 63 13 3 0.0127 58 14 3 0.0120 55 15 3 0.0110 62 16 3 0.0124 72 17 3 0.0143 81 18 3 0.0160 96 19 3 0.0192 112 20 3 0.0230 125 21 3 0.0245 120 22 3 0.0238 110 23 3 0.0219 84 24 3 0.0169 52 25 3 0.0101 29 26 3 0.00571 22 27 3 0.00446 19 28 3 0.00407 22 29 3 0.00407 24 30 3 0.00461 25 31 3 0.00487 90 0 4 0.0179 91 1 4 0.0180 84 2 4 0.0172 84 3 4 0.0171 91 4 4 0.0181 90 5 4 0.0180 83 6 4 0.0168 81 7 4 0.0164 80 8 4 0.0162 79 9 4 0.0157 70 10 4 0.0140 59 11 4 0.0122 51 12 4 0.0103 44 13 4 0.00897 35 14 4 0.00680 27 15 4 0.00557 39 16 4 0.00800 51 17 4 0.00994 53 18 4 0.0110 63 19 4 0.0127 72 20 4 0.0145 75 21 4 0.0150 73 22 4 0.0146 59 23 4 0.0120 50 24 4 0.0100 41 25 4 0.00849 32 26 4 0.00649 23 27 4 0.00456 22 28 4 0.00456 21 29 4 0.00415 23 30 4 0.00477 24 31 4 0.00500 93 0 5 0.0183 94 1 5 0.0190 91 2 5 0.0181 85 3 5 0.0166 90 4 5 0.0179 88 5 5 0.0177 93 6 5 0.0185 98 7 5 0.0193 98 8 5 0.0194 94 9 5 0.0191 70 10 5 0.0141 48 11 5 0.00992 39 12 5 0.00786 29 13 5 0.00574 23 14 5 0.00454 20 15 5 0.00411 25 16 5 0.00467 32 17 5 0.00683 41 18 5 0.00850 48 19 5 0.00939 48 20 5 0.00986 42 21 5 0.00849 46 22 5 0.00895 42 23 5 0.00873 38 24 5 0.00767 29 25 5 0.00558 22 26 5 0.00468 21 27 5 0.00430 22 28 5 0.00404 22 29 5 0.00408 23 30 5 0.00444 26 31 5 0.00522 91 0 6 0.0183 96 1 6 0.0191 98 2 6 0.0195 83 3 6 0.0168 87 4 6 0.0177 94 5 6 0.0188 98 6 6 0.0201 98 7 6 0.0198 104 8 6 0.0207 103 9 6 0.0206 89 10 6 0.0177 53 11 6 0.0109 35 12 6 0.00733 32 13 6 0.00639 26 14 6 0.00549 21 15 6 0.00426 21 16 6 0.00412 25 17 6 0.00495 32 18 6 0.00627 31 19 6 0.00632 29 20 6 0.00592 25 21 6 0.00513 26 22 6 0.00516 31 23 6 0.00607 37 24 6 0.00763 27 25 6 0.00542 23 26 6 0.00457 23 27 6 0.00443 23 28 6 0.00468 27 29 6 0.00521 25 30 6 0.00490 28 31 6 0.00589 93 0 7 0.0186 101 1 7 0.0199 92 2 7 0.0188 88 3 7 0.0178 91 4 7 0.0183 98 5 7 0.0199 104 6 7 0.0208 102 7 7 0.0204 88 8 7 0.0177 74 9 7 0.0150 73 10 7 0.0148 69 11 7 0.0137 58 12 7 0.0118 48 13 7 0.00983 43 14 7 0.00936 34 15 7 0.00684 27 16 7 0.00583 27 17 7 0.00552 24 18 7 0.00481 20 19 7 0.00403 19 20 7 0.00394 20 21 7 0.00395 26 22 7 0.00522 34 23 7 0.00700 43 24 7 0.00886 40 25 7 0.00826 27 26 7 0.00537 29 27 7 0.00602 38 28 7 0.00759 41 29 7 0.00814 35 30 7 0.00729 38 31 7 0.00788 91 0 8 0.0184 96 1 8 0.0196 94 2 8 0.0187 95 3 8 0.0193 96 4 8 0.0195 103 5 8 0.0206 109 6 8 0.0223 107 7 8 0.0213 87 8 8 0.0177 78 9 8 0.0157 79 10 8 0.0161 76 11 8 0.0154 71 12 8 0.0145 70 13 8 0.0145 68 14 8 0.0140 56 15 8 0.0113 51 16 8 0.0107 48 17 8 0.00955 35 18 8 0.00746 23 19 8 0.00493 20 20 8 0.00410 20 21 8 0.00386 23 22 8 0.00476 28 23 8 0.00594 37 24 8 0.00738 43 25 8 0.00868 36 26 8 0.00742 38 27 8 0.00761 47 28 8 0.00931 56 29 8 0.0117 52 30 8 0.0110 43 31 8 0.00859 92 0 9 0.0188 94 1 9 0.0186 95 2 9 0.0190 98 3 9 0.0196 104 4 9 0.0207 106 5 9 0.0213 112 6 9 0.0226 111 7 9 0.0223 101 8 9 0.0201 81 9 9 0.0164 70 10 9 0.0138 72 11 9 0.0148 80 12 9 0.0163 84 13 9 0.0167 82 14 9 0.0165 71 15 9 0.0144 64 16 9 0.0129 65 17 9 0.0133 48 18 9 0.00957 36 19 9 0.00744 37 20 9 0.00761 37 21 9 0.00739 33 22 9 0.00662 33 23 9 0.00718 40 24 9 0.00812 49 25 9 0.0101 53 26 9 0.0104 45 27 9 0.00911 54 28 9 0.0111 67 29 9 0.0139 70 30 9 0.0165 44 31 9 0.00860 87 0 10 0.0177 90 1 10 0.0179 100 2 10 0.0197 105 3 10 0.0207 101 4 10 0.0202 102 5 10 0.0204 109 6 10 0.0217 114 7 10 0.0228 121 8 10 0.0242 111 9 10 0.0222 90 10 10 0.0181 81 11 10 0.0163 80 12 10 0.0158 84 13 10 0.0167 89 14 10 0.0179 82 15 10 0.0162 80 16 10 0.0160 82 17 10 0.0164 68 18 10 0.0135 61 19 10 0.0119 56 20 10 0.0112 49 21 10 0.00961 38 22 10 0.00769 28 23 10 0.00560 35 24 10 0.00703 52 25 10 0.0105 52 26 10 0.0109 50 27 10 0.0104 55 28 10 0.0109 76 29 10 0.0156 72 30 10 0.0143 51 31 10 0.0108 80 0 11 0.0159 84 1 11 0.0169 91 2 11 0.0179 99 3 11 0.0197 103 4 11 0.0205 103 5 11 0.0210 104 6 11 0.0211 115 7 11 0.0230 121 8 11 0.0244 123 9 11 0.0244 111 10 11 0.0220 99 11 11 0.0197 112 12 11 0.0224 119 13 11 0.0233 119 14 11 0.0233 117 15 11 0.0227 122 16 11 0.0237 130 17 11 0.0253 115 18 11 0.0224 75 19 11 0.0154 44 20 11 0.00909 33 21 11 0.00663 26 22 11 0.00514 26 23 11 0.00538 40 24 11 0.00807 55 25 11 0.0114 61 26 11 0.0125 59 27 11 0.0121 61 28 11 0.0127 59 29 11 0.0118 57 30 11 0.0117 47 31 11 0.00963 74 0 12 0.0148 79 1 12 0.0158 86 2 12 0.0169 94 3 12 0.0188 102 4 12 0.0205 108 5 12 0.0220 107 6 12 0.0214 112 7 12 0.0226 116 8 12 0.0229 127 9 12 0.0255 134 10 12 0.0263 143 11 12 0.0284 152 12 12 0.0292 121 13 12 0.0236 106 14 12 0.0210 89 15 12 0.0174 93 16 12 0.0179 95 17 12 0.0187 90 18 12 0.0177 95 19 12 0.0186 69 20 12 0.0139 34 21 12 0.00692 24 22 12 0.00503 34 23 12 0.00698 54 24 12 0.0110 59 25 12 0.0124 56 26 12 0.0114 59 27 12 0.0122 55 28 12 0.0114 43 29 12 0.00859 38 30 12 0.00765 37 31 12 0.00742 68 0 13 0.0137 71 1 13 0.0141 79 2 13 0.0156 88 3 13 0.0178 95 4 13 0.0191 101 5 13 0.0202 110 6 13 0.0219 114 7 13 0.0228 115 8 13 0.0230 142 9 13 0.0285 180 10 13 0.0344 179 11 13 0.0346 137 12 13 0.0270 121 13 13 0.0237 120 14 13 0.0236 113 15 13 0.0220 95 16 13 0.0185 72 17 13 0.0145 61 18 13 0.0125 71 19 13 0.0139 80 20 13 0.0156 47 21 13 0.00938 36 22 13 0.00716 29 23 13 0.00584 33 24 13 0.00667 41 25 13 0.00944 40 26 13 0.00803 52 27 13 0.0105 51 28 13 0.0101 43 29 13 0.00861 41 30 13 0.00807 32 31 13 0.00637 69 0 14 0.0137 66 1 14 0.0132 70 2 14 0.0139 75 3 14 0.0152 85 4 14 0.0169 87 5 14 0.0173 94 6 14 0.0186 94 7 14 0.0186 106 8 14 0.0211 146 9 14 0.0289 195 10 14 0.0371 145 11 14 0.0281 130 12 14 0.0256 176 13 14 0.0337 154 14 14 0.0294 87 15 14 0.0167 65 16 14 0.0123 74 17 14 0.0140 57 18 14 0.0113 48 19 14 0.00920 42 20 14 0.00831 45 21 14 0.00894 41 22 14 0.00798 34 23 14 0.00658 46 24 14 0.00960 59 25 14 0.0123 54 26 14 0.0111 39 27 14 0.00796 34 28 14 0.00718 34 29 14 0.00671 35 30 14 0.00692 38 31 14 0.00758 70 0 15 0.0136 63 1 15 0.0126 65 2 15 0.0131 69 3 15 0.0136 64 4 15 0.0131 61 5 15 0.0120 65 6 15 0.0124 65 7 15 0.0130 86 8 15 0.0166 146 9 15 0.0277 151 10 15 0.0290 123 11 15 0.0239 160 12 15 0.0306 155 13 15 0.0300 82 14 15 0.0160 47 15 15 0.00863 35 16 15 0.00690 41 17 15 0.00789 64 18 15 0.0118 60 19 15 0.0113 50 20 15 0.0101 50 21 15 0.00967 43 22 15 0.00842 38 23 15 0.00687 54 24 15 0.0106 77 25 15 0.0154 90 26 15 0.0180 81 27 15 0.0162 58 28 15 0.0117 46 29 15 0.00910 38 30 15 0.00773 33 31 15 0.00660 62 0 16 0.0123 56 1 16 0.0112 56 2 16 0.0112 53 3 16 0.0110 52 4 16 0.0107 57 5 16 0.0114 63 6 16 0.0129 61 7 16 0.0120 80 8 16 0.0154 121 9 16 0.0233 107 10 16 0.0209 113 11 16 0.0219 154 12 16 0.0294 103 13 16 0.0195 85 14 16 0.0164 72 15 16 0.0139 61 16 16 0.0120 65 17 16 0.0131 78 18 16 0.0153 103 19 16 0.0197 71 20 16 0.0144 59 21 16 0.0117 60 22 16 0.0118 44 23 16 0.00885 53 24 16 0.0107 64 25 16 0.0129 73 26 16 0.0143 81 27 16 0.0162 73 28 16 0.0144 70 29 16 0.0142 63 30 16 0.0129 47 31 16 0.00971 47 0 17 0.00925 42 1 17 0.00830 44 2 17 0.00873 43 3 17 0.00837 47 4 17 0.00956 54 5 17 0.0111 62 6 17 0.0123 68 7 17 0.0133 95 8 17 0.0181 111 9 17 0.0211 104 10 17 0.0195 108 11 17 0.0206 141 12 17 0.0270 106 13 17 0.0207 97 14 17 0.0188 99 15 17 0.0197 102 16 17 0.0200 102 17 17 0.0203 118 18 17 0.0230 140 19 17 0.0270 99 20 17 0.0195 76 21 17 0.0152 77 22 17 0.0154 66 23 17 0.0134 60 24 17 0.0122 55 25 17 0.0111 61 26 17 0.0122 68 27 17 0.0137 71 28 17 0.0144 69 29 17 0.0140 66 30 17 0.0133 44 31 17 0.00859 46 0 18 0.00908 43 1 18 0.00881 48 2 18 0.00969 51 3 18 0.0102 46 4 18 0.00965 53 5 18 0.0110 59 6 18 0.0118 80 7 18 0.0156 85 8 18 0.0158 117 9 18 0.0219 114 10 18 0.0218 104 11 18 0.0197 131 12 18 0.0251 135 13 18 0.0259 116 14 18 0.0226 114 15 18 0.0224 119 16 18 0.0228 119 17 18 0.0232 140 18 18 0.0269 135 19 18 0.0264 113 20 18 0.0223 113 21 18 0.0218 124 22 18 0.0240 97 23 18 0.0188 77 24 18 0.0155 78 25 18 0.0157 82 26 18 0.0165 84 27 18 0.0166 82 28 18 0.0165 71 29 18 0.0142 71 30 18 0.0143 59 31 18 0.0118 43 0 19 0.00863 42 1 19 0.00888 49 2 19 0.0104 54 3 19 0.0108 53 4 19 0.0107 54 5 19 0.0110 66 6 19 0.0133 78 7 19 0.0150 92 8 19 0.0179 110 9 19 0.0205 103 10 19 0.0201 99 11 19 0.0194 107 12 19 0.0212 146 13 19 0.0282 129 14 19 0.0251 120 15 19 0.0235 119 16 19 0.0234 136 17 19 0.0263 145 18 19 0.0282 120 19 19 0.0238 117 20 19 0.0234 123 21 19 0.0243 122 22 19 0.0241 107 23 19 0.0216 98 24 19 0.0195 93 25 19 0.0185 93 26 19 0.0188 99 27 19 0.0200 98 28 19 0.0200 91 29 19 0.0179 82 30 19 0.0166 73 31 19 0.0146 68 0 20 0.0151 46 1 20 0.00976 50 2 20 0.0106 51 3 20 0.0106 51 4 20 0.0102 51 5 20 0.0107 75 6 20 0.0145 77 7 20 0.0146 83 8 20 0.0161 81 9 20 0.0155 96 10 20 0.0183 84 11 20 0.0160 88 12 20 0.0171 99 13 20 0.0191 121 14 20 0.0233 134 15 20 0.0256 129 16 20 0.0246 112 17 20 0.0220 105 18 20 0.0205 105 19 20 0.0206 115 20 20 0.0230 135 21 20 0.0261 113 22 20 0.0226 106 23 20 0.0214 105 24 20 0.0210 99 25 20 0.0199 98 26 20 0.0195 98 27 20 0.0198 100 28 20 0.0200 101 29 20 0.0205 97 30 20 0.0194 80 31 20 0.0165 97 0 21 0.0191 104 1 21 0.0214 85 2 21 0.0168 57 3 21 0.0117 45 4 21 0.00917 59 5 21 0.0115 82 6 21 0.0153 75 7 21 0.0142 65 8 21 0.0124 64 9 21 0.0126 70 10 21 0.0137 75 11 21 0.0146 67 12 21 0.0132 66 13 21 0.0128 67 14 21 0.0137 71 15 21 0.0145 80 16 21 0.0158 78 17 21 0.0152 80 18 21 0.0162 86 19 21 0.0172 102 20 21 0.0201 101 21 21 0.0201 86 22 21 0.0177 83 23 21 0.0169 79 24 21 0.0162 80 25 21 0.0161 77 26 21 0.0159 76 27 21 0.0153 79 28 21 0.0165 83 29 21 0.0167 83 30 21 0.0171 92 31 21 0.0187 95 0 22 0.0204 124 1 22 0.0255 113 2 22 0.0227 91 3 22 0.0182 78 4 22 0.0159 80 5 22 0.0158 83 6 22 0.0162 77 7 22 0.0146 64 8 22 0.0124 57 9 22 0.0110 59 10 22 0.0116 65 11 22 0.0127 62 12 22 0.0123 57 13 22 0.0114 59 14 22 0.0120 61 15 22 0.0125 66 16 22 0.0132 65 17 22 0.0126 61 18 22 0.0125 63 19 22 0.0124 56 20 22 0.0116 53 21 22 0.0108 47 22 22 0.0101 46 23 22 0.00968 48 24 22 0.00966 47 25 22 0.00991 48 26 22 0.0101 50 27 22 0.00997 62 28 22 0.0125 82 29 22 0.0170 108 30 22 0.0220 156 31 22 0.0336 106 0 23 0.0237 119 1 23 0.0242 117 2 23 0.0234 62 3 23 0.0125 60 4 23 0.0124 93 5 23 0.0185 94 6 23 0.0191 66 7 23 0.0138 47 8 23 0.00922 52 9 23 0.0108 54 10 23 0.0115 75 11 23 0.0151 71 12 23 0.0146 62 13 23 0.0122 68 14 23 0.0132 69 15 23 0.0135 66 16 23 0.0132 66 17 23 0.0133 60 18 23 0.0120 55 19 23 0.0112 45 20 23 0.00895 39 21 23 0.00777 36 22 23 0.00685 31 23 23 0.00621 32 24 23 0.00633 30 25 23 0.00624 33 26 23 0.00657 40 27 23 0.00805 52 28 23 0.0105 77 29 23 0.0156 142 30 23 0.0293 335 31 23 0.0870 301 0 24 0.127 175 1 24 0.0420 133 2 24 0.0351 74 3 24 0.0243 98 4 24 0.0230 90 5 24 0.0192 87 6 24 0.0174 38 7 24 0.00852 37 8 24 0.00790 53 9 24 0.0110 55 10 24 0.0115 87 11 24 0.0170 90 12 24 0.0180 59 13 24 0.0121 43 14 24 0.00852 37 15 24 0.00796 41 16 24 0.00828 37 17 24 0.00800 37 18 24 0.00783 40 19 24 0.00818 42 20 24 0.00897 44 21 24 0.00919 45 22 24 0.00938 39 23 24 0.00825 35 24 24 0.00713 35 25 24 0.00745 34 26 24 0.00713 41 27 24 0.00846 54 28 24 0.0111 77 29 24 0.0156 133 30 24 0.0278 346 31 24 0.102