0 0 1 1.38E-5 8 1 1 4.35E-5 88 2 1 0.00150 968 3 1 0.00260 144 4 1 0.00147 40 5 1 1.77E-4 0 6 1 1.26E-5 0 7 1 6.45E-6 4 0 2 2.24E-5 228 1 2 0.00174

1180 2 2 0.00430

1192 3 2 0.00436

1072 4 2 0.00379 188 5 2 0.00149 64 6 2 6.87E-4 0 7 2 8.27E-6 8 0 3 3.08E-5 872 1 3 0.00259

1112 2 3 0.00349

1140 3 3 0.00418

1072 4 3 0.00395 928 5 3 0.00342 592 6 3 0.00200 4 7 3 2.16E-5 4 0 4 2.50E-5 368 1 4 0.00182 984 2 4 0.00345

1060 3 4 0.00393

1020 4 4 0.00378 908 5 4 0.00337 608 6 4 0.00211 4 7 4 1.81E-5 0 0 5 1.05E-5 128 1 5 4.84E-4 784 2 5 0.00265 948 3 5 0.00355 940 4 5 0.00343 816 5 5 0.00292 452 6 5 0.00134 4 7 5 1.34E-5 0 0 6 5.41E-6 8 1 6 4.96E-5 224 2 6 0.00107 732 3 6 0.00246 708 4 6 0.00242 420 5 6 0.00138 8 6 6 9.57E-5 0 7 6 7.78E-6