189 0 1 0.00300 206 1 1 0.00328 215 2 1 0.00343 222 3 1 0.00354 220 4 1 0.00351 214 5 1 0.00341 201 6 1 0.00321 182 7 1 0.00286 191 0 2 0.00303 210 1 2 0.00335 223 2 2 0.00356 232 3 2 0.00371 230 4 2 0.00369 223 5 2 0.00357 212 6 2 0.00339 192 7 2 0.00307 180 0 3 0.00287 203 1 3 0.00326 221 2 3 0.00355 234 3 3 0.00376 235 4 3 0.00378 226 5 3 0.00362 214 6 3 0.00342 194 7 3 0.00310 128 0 4 0.00200 147 1 4 0.00232 207 2 4 0.00332 228 3 4 0.00367 229 4 4 0.00370 218 5 4 0.00351 204 6 4 0.00327 174 7 4 0.00277 44 0 5 6.69E-4 59 1 5 9.21E-4 172 2 5 0.00267 213 3 5 0.00346 202 4 5 0.00320 186 5 5 0.00296 167 6 5 0.00266 142 7 5 0.00226 36 0 6 5.42E-4 47 1 6 7.30E-4 106 2 6 0.00176 172 3 6 0.00273 82 4 6 0.00136 85 5 6 0.00141 109 6 6 0.00184 150 7 6 0.00235