4 0 1 0.00425 9 1 1 0.00447 8 2 1 0.00429 10 3 1 0.00490 14 4 1 0.00531 9 5 1 0.00443 0 6 1 0.00260 0 7 1 0.00195 0 8 1 0.00167 0 9 1 0.00140 10 0 2 0.00498 18 1 2 0.00572 18 2 2 0.00604 22 3 2 0.00683 23 4 2 0.00694 19 5 2 0.00614 12 6 2 0.00464 2 7 2 0.00274 1 8 2 0.00281 0 9 2 0.00242 15 0 3 0.00576 21 1 3 0.00658 26 2 3 0.00781 18 3 3 0.00634 16 4 3 0.00580 18 5 3 0.00637 18 6 3 0.00577 5 7 3 0.00380 0 8 3 0.00242 0 9 3 0.00215 15 0 4 0.00585 23 1 4 0.00676 25 2 4 0.00742 16 3 4 0.00562 12 4 4 0.00477 8 5 4 0.00397 6 6 4 0.00401 4 7 4 0.00376 0 8 4 0.00239 0 9 4 0.00212 14 0 5 0.00529 20 1 5 0.00666 28 2 5 0.00805 33 3 5 0.00933 26 4 5 0.00756 17 5 5 0.00591 9 6 5 0.00438 5 7 5 0.00339 1 8 5 0.00274 0 9 5 0.00199 15 0 6 0.00512 17 1 6 0.00561 26 2 6 0.00750 32 3 6 0.00929 32 4 6 0.00907 24 5 6 0.00736 14 6 6 0.00518 7 7 6 0.00403 6 8 6 0.00369 1 9 6 0.00285 15 0 7 0.00529 15 1 7 0.00524 16 2 7 0.00542 17 3 7 0.00581 16 4 7 0.00561 15 5 7 0.00530 10 6 7 0.00437 8 7 7 0.00407 7 8 7 0.00386 0 9 7 0.00257 12 0 8 0.00461 16 1 8 0.00530 17 2 8 0.00568 25 3 8 0.00725 32 4 8 0.00875 24 5 8 0.00713 10 6 8 0.00447 0 7 8 0.00216 0 8 8 7.14E-4 0 9 8 4.39E-5 10 0 9 0.00459 13 1 9 0.00523 23 2 9 0.00750 31 3 9 0.00878 27 4 9 0.00961 0 5 9 0.00259 0 6 9 2.48E-4 0 7 9 1.00E-4 0 8 9 3.19E-4 0 9 9 2.97E-4 0 0 10 0.00173 0 1 10 0.00165 4 2 10 0.00663 0 3 10 0.00162 0 4 10 0.00119 0 5 10 0.00129 0 6 10 0.00133 0 7 10 0.00138 0 8 10 0.00163 0 9 10 0.00168 0 0 11 0.00163 0 1 11 0.00164 0 2 11 0.00183 0 3 11 0.00194 0 4 11 0.00172 0 5 11 0.00186 0 6 11 0.00177 0 7 11 0.00154 0 8 11 0.00140 0 9 11 0.00163 0 0 12 0.00169 0 1 12 0.00180 0 2 12 0.00170 0 3 12 0.00163 0 4 12 0.00178 0 5 12 0.00178 0 6 12 0.00175 0 7 12 0.00160 0 8 12 0.00139 0 9 12 0.00158 1 0 13 0.00191 0 1 13 0.00182 0 2 13 0.00182 0 3 13 0.00176 0 4 13 0.00192 0 5 13 0.00168 0 6 13 0.00165 0 7 13 0.00168 0 8 13 0.00158 0 9 13 0.00158 0 0 14 0.00120 0 1 14 0.00125 0 2 14 0.00118 0 3 14 0.00121 0 4 14 0.00124 0 5 14 0.00132 0 6 14 0.00126 0 7 14 0.00119 0 8 14 0.00118 0 9 14 0.00121