0 0 1 7.50E-4 0 1 1 9.22E-4 0 2 1 9.24E-4 0 3 1 8.98E-4 0 4 1 0.00104 0 5 1 0.00105 0 6 1 0.00107 0 7 1 0.00109 0 8 1 0.00113 0 9 1 0.00131 0 0 2 0.00113 0 1 2 0.00113 0 2 2 0.00108 0 3 2 0.00120 0 4 2 0.00133 0 5 2 0.00122 0 6 2 0.00135 0 7 2 0.00136 0 8 2 0.00153 0 9 2 0.00164 0 0 3 0.00100 0 1 3 0.00127 0 2 3 0.00124 0 3 3 0.00146 0 4 3 0.00122 0 5 3 0.00151 0 6 3 0.00147 0 7 3 0.00141 0 8 3 0.00172 0 9 3 0.00165 0 0 4 0.00106 0 1 4 0.00128 0 2 4 0.00152 0 3 4 0.00163 0 4 4 0.00150 0 5 4 0.00164 0 6 4 0.00173 0 7 4 0.00173 0 8 4 0.00176 0 9 4 0.00210 0 0 5 0.00105 0 1 5 0.00113 0 2 5 0.00127 0 3 5 0.00167 0 4 5 0.00186 0 5 5 0.00165 0 6 5 0.00171 0 7 5 0.00159 0 8 5 0.00175 0 9 5 0.00198 0 0 6 8.40E-4 0 1 6 0.00102 0 2 6 0.00128 0 3 6 0.00157 0 4 6 0.00162 0 5 6 0.00164 0 6 6 0.00192 0 7 6 0.00199 0 8 6 0.00200 0 9 6 0.00199 0 0 7 0.00221 0 1 7 0.00141 0 2 7 0.00174 0 3 7 0.00192 4 4 7 0.00290 4 5 7 0.00293 4 6 7 0.00314 3 7 7 0.00298 2 8 7 0.00291 2 9 7 0.00294 0 0 8 4.17E-4 0 1 8 1.52E-4 0 2 8 1.27E-4 0 3 8 1.89E-4 0 4 8 5.84E-4 0 5 8 0.00157 0 6 8 0.00196 0 7 8 0.00184 0 8 8 0.00229 0 9 8 0.00177 0 0 9 2.24E-4 0 1 9 2.72E-5 0 2 9 1.61E-4 0 3 9 3.76E-5 0 4 9 1.98E-4 0 5 9 2.16E-4 0 6 9 5.71E-4 0 7 9 1.83E-4 0 8 9 3.96E-4 0 9 9 2.15E-4 0 0 10 4.58E-4 0 1 10 3.52E-4 0 2 10 2.88E-4 0 3 10 2.26E-4 0 4 10 8.22E-5 0 5 10 2.44E-4 0 6 10 1.79E-4 0 7 10 2.57E-4 0 8 10 2.77E-4 0 9 10 2.54E-4 0 0 11 4.51E-4 0 1 11 2.77E-4 0 2 11 2.11E-4 0 3 11 1.52E-4 0 4 11 1.15E-4 0 5 11 3.51E-4 0 6 11 4.31E-4 0 7 11 3.96E-4 0 8 11 3.21E-4 0 9 11 5.28E-4 0 0 12 0.00120 0 1 12 0.00137 0 2 12 0.00123 0 3 12 0.00102 0 4 12 0.00131 0 5 12 0.00103 0 6 12 0.00136 0 7 12 0.00119 0 8 12 0.00110 0 9 12 0.00128 0 0 13 0.00146 0 1 13 0.00127 0 2 13 0.00119 0 3 13 0.00119 0 4 13 0.00136 0 5 13 0.00128 0 6 13 0.00102 0 7 13 0.00114 0 8 13 0.00127 0 9 13 0.00132 0 0 14 0.00128 0 1 14 0.00138 0 2 14 0.00131 0 3 14 0.00137 0 4 14 0.00138 0 5 14 0.00128 0 6 14 0.00139 0 7 14 0.00133 0 8 14 0.00137 0 9 14 0.00140