36 0 1 0.0125 42 1 1 0.0107 35 2 1 0.00856 28 3 1 0.00721 21 4 1 0.00603 13 5 1 0.00473 0 6 1 0.00183 0 7 1 0.00155 0 8 1 0.00225 0 9 1 0.00148 57 0 2 0.0157 55 1 2 0.0124 41 2 2 0.00925 32 3 2 0.00772 28 4 2 0.00711 18 5 2 0.00561 0 6 2 0.00235 0 7 2 0.00187 0 8 2 0.00211 0 9 2 0.00223 96 0 3 0.0229 73 1 3 0.0160 50 2 3 0.0111 40 3 3 0.00916 35 4 3 0.00846 26 5 3 0.00671 1 6 3 0.00279 2 7 3 0.00324 0 8 3 0.00242 0 9 3 0.00245 132 0 4 0.0279 93 1 4 0.0192 59 2 4 0.0131 44 3 4 0.0102 42 4 4 0.00972 30 5 4 0.00798 3 6 4 0.00337 5 7 4 0.00348 0 8 4 0.00235 0 9 4 0.00176 168 0 5 0.0325 115 1 5 0.0233 70 2 5 0.0152 52 3 5 0.0115 51 4 5 0.0114 36 5 5 0.00880 5 6 5 0.00398 0 7 5 0.00238 0 8 5 0.00195 0 9 5 0.00231 74 0 6 0.0206 117 1 6 0.0235 79 2 6 0.0173 62 3 6 0.0136 77 4 6 0.0164 57 5 6 0.0130 12 6 6 0.00603 0 7 6 8.23E-4 0 8 6 0.00236 0 9 6 0.00242 24 0 7 0.0117 94 1 7 0.0203 80 2 7 0.0176 67 3 7 0.0152 114 4 7 0.0248 123 5 7 0.0265 31 6 7 0.00990 0 7 7 4.77E-4 0 8 7 0.00213 0 9 7 0.00164 0 0 8 0.00279 29 1 8 0.0112 46 2 8 0.0123 67 3 8 0.0151 202 4 8 0.0882 273 5 8 0.195 40 6 8 0.0113 0 7 8 3.01E-4 0 8 8 0.00190 0 9 8 8.45E-4 0 0 9 -4.10E-5 0 1 9 0.00142 1 2 9 0.00235 19 3 9 0.0142 119 4 9 0.169 64 5 9 0.0581 16 6 9 0.00632 0 7 9 1.04E-4 0 8 9 5.82E-4 0 9 9 2.06E-4 0 0 10 6.86E-5 0 1 10 2.00E-4 0 2 10 4.94E-4 0 3 10 8.09E-4 2 4 10 0.00293 0 5 10 0.00233 0 6 10 8.76E-4 0 7 10 3.92E-4 0 8 10 8.02E-5 0 9 10 6.88E-5 0 0 11 1.26E-4 0 1 11 1.81E-4 0 2 11 3.50E-4 0 3 11 4.49E-4 0 4 11 6.20E-4 0 5 11 6.65E-4 0 6 11 5.12E-4 0 7 11 3.83E-4 0 8 11 7.43E-5 0 9 11 2.74E-4 0 0 12 7.51E-5 0 1 12 6.13E-5 0 2 12 4.83E-5 0 3 12 2.54E-4 0 4 12 2.56E-4 0 5 12 3.06E-4 0 6 12 1.52E-4 0 7 12 2.76E-4 0 8 12 1.18E-5 0 9 12 2.14E-4 0 0 13 1.30E-4 0 1 13 4.15E-6 0 2 13 6.32E-5 0 3 13 2.74E-4 0 4 13 4.60E-5 0 5 13 1.45E-4 0 6 13 7.95E-5 0 7 13 3.65E-4 0 8 13 2.05E-4 0 9 13 4.48E-5 0 0 14 3.81E-4 0 1 14 6.58E-4 0 2 14 6.85E-4 0 3 14 8.26E-4 0 4 14 8.56E-4 0 5 14 6.67E-4 0 6 14 4.36E-4 0 7 14 6.85E-4 0 8 14 4.15E-4 0 9 14 5.14E-4