46 0 1 0.0158 52 1 1 0.0131 43 2 1 0.0103 33 3 1 0.00839 28 4 1 0.00743 19 5 1 0.00603 0 6 1 0.00215 1 7 1 0.00276 0 8 1 0.00278 0 9 1 0.00185 68 0 2 0.0181 68 1 2 0.0151 56 2 2 0.0122 45 3 2 0.0101 41 4 2 0.00973 28 5 2 0.00685 0 6 2 0.00255 0 7 2 0.00205 2 8 2 0.00291 0 9 2 0.00216 96 0 3 0.0227 88 1 3 0.0184 69 2 3 0.0146 56 3 3 0.0123 54 4 3 0.0118 36 5 3 0.00841 1 6 3 0.00305 0 7 3 0.00258 0 8 3 0.00252 0 9 3 0.00270 150 0 4 0.0314 117 1 4 0.0234 84 2 4 0.0176 71 3 4 0.0152 70 4 4 0.0148 46 5 4 0.0108 3 6 4 0.00344 6 7 4 0.00375 0 8 4 0.00251 0 9 4 0.00228 196 0 5 0.0377 150 1 5 0.0295 99 2 5 0.0203 86 3 5 0.0182 91 4 5 0.0189 59 5 5 0.0134 6 6 5 0.00471 4 7 5 0.00352 0 8 5 0.00211 0 9 5 0.00155 161 0 6 0.0310 156 1 6 0.0300 119 2 6 0.0242 109 3 6 0.0223 133 4 6 0.0265 101 5 6 0.0210 10 6 6 0.00611 0 7 6 0.00199 0 8 6 0.00257 0 9 6 0.00260 31 0 7 0.0136 130 1 7 0.0256 121 2 7 0.0247 135 3 7 0.0268 198 4 7 0.0383 177 5 7 0.0342 36 6 7 0.0139 0 7 7 7.05E-4 1 8 7 0.00303 0 9 7 0.00252 11 0 8 0.00741 68 1 8 0.0174 104 2 8 0.0217 151 3 8 0.0298 337 4 8 0.0750 355 5 8 0.106 58 6 8 0.0158 0 7 8 3.88E-4 0 8 8 0.00256 0 9 8 0.00134 0 0 9 5.25E-4 10 1 9 0.00636 22 2 9 0.00799 97 3 9 0.0220 568 4 9 0.300 285 5 9 0.309 42 6 9 0.0127 0 7 9 2.38E-4 0 8 9 0.00156 0 9 9 9.22E-4 0 0 10 3.49E-4 0 1 10 7.76E-4 0 2 10 0.00115 3 3 10 0.0112 37 4 10 0.0481 21 5 10 0.0317 6 6 10 0.00431 0 7 10 6.92E-4 0 8 10 7.32E-4 0 9 10 4.67E-4 0 0 11 2.11E-4 0 1 11 3.45E-4 0 2 11 3.31E-4 0 3 11 5.47E-4 0 4 11 0.00141 0 5 11 0.00123 0 6 11 6.29E-4 0 7 11 3.24E-4 0 8 11 2.63E-4 0 9 11 3.92E-4 0 0 12 -1.70E-5 0 1 12 -6.67E-5 0 2 12 4.78E-5 0 3 12 2.55E-4 0 4 12 4.08E-4 0 5 12 3.17E-4 0 6 12 2.40E-4 0 7 12 2.43E-4 0 8 12 5.33E-5 0 9 12 -3.50E-5 0 0 13 1.81E-4 0 1 13 -2.05E-5 0 2 13 2.73E-4 0 3 13 2.76E-4 0 4 13 3.24E-4 0 5 13 3.50E-4 0 6 13 2.13E-4 0 7 13 3.66E-4 0 8 13 1.65E-4 0 9 13 2.43E-4 0 0 14 4.15E-4 0 1 14 4.73E-4 0 2 14 4.54E-4 0 3 14 5.36E-4 0 4 14 5.88E-4 0 5 14 5.66E-4 0 6 14 4.53E-4 0 7 14 7.11E-4 0 8 14 3.19E-4 0 9 14 3.87E-4