14 0 1 0.00647 22 1 1 0.00756 35 2 1 0.0101 81 3 1 0.0170 107 4 1 0.0213 119 5 1 0.0228 93 6 1 0.0188 48 7 1 0.0122 10 8 1 0.00576 7 9 1 0.00485 16 0 2 0.00627 32 1 2 0.00891 48 2 2 0.0122 105 3 2 0.0209 169 4 2 0.0310 147 5 2 0.0278 111 6 2 0.0219 54 7 2 0.0135 18 8 2 0.00721 10 9 2 0.00554 15 0 3 0.00630 42 1 3 0.0110 40 2 3 0.0122 130 3 3 0.0251 233 4 3 0.0413 205 5 3 0.0372 135 6 3 0.0257 66 7 3 0.0155 14 8 3 0.00698 0 9 3 0.00220 17 0 4 0.00682 48 1 4 0.0129 29 2 4 0.0120 148 3 4 0.0289 317 4 4 0.0559 266 5 4 0.0471 153 6 4 0.0283 7 7 4 0.00671 0 8 4 0.00103 0 9 4 5.12E-4 7 0 5 0.00551 35 1 5 0.0119 20 2 5 0.0124 192 3 5 0.0367 499 4 5 0.0895 364 5 5 0.0673 166 6 5 0.0312 1 7 5 0.00514 0 8 5 7.57E-4 0 9 5 9.45E-4 0 0 6 0.00270 9 1 6 0.00759 15 2 6 0.0121 250 3 6 0.0488 978 4 6 0.217 519 5 6 0.115 196 6 6 0.0374 19 7 6 0.0133 1 8 6 0.00372 0 9 6 0.00245 0 0 7 3.91E-4 0 1 7 0.00114 8 2 7 0.00774 192 3 7 0.0403

1309 4 7 0.470 531 5 7 0.150 175 6 7 0.0342 49 7 7 0.0159 17 8 7 0.00724 15 9 7 0.00854 0 0 8 3.52E-4 0 1 8 5.22E-4 0 2 8 0.00113 16 3 8 0.00943 153 4 8 0.212 170 5 8 0.0813 27 6 8 0.0144 32 7 8 0.0123 21 8 8 0.00876 24 9 8 0.00956 0 0 9 5.63E-4 0 1 9 5.48E-4 0 2 9 6.42E-4 0 3 9 0.00107 7 4 9 0.00699 19 5 9 0.0192 5 6 9 0.00583 8 7 9 0.0104 8 8 9 0.0152 6 9 9 0.00728 0 0 10 7.82E-5 0 1 10 1.90E-4 0 2 10 4.81E-4 0 3 10 4.88E-4 0 4 10 0.00105 0 5 10 0.00182 0 6 10 0.00423 0 7 10 9.84E-4 0 8 10 9.27E-4 0 9 10 3.41E-4 0 0 11 2.61E-4 0 1 11 8.48E-5 0 2 11 3.48E-4 0 3 11 2.92E-5 0 4 11 1.32E-4 0 5 11 2.69E-4 0 6 11 2.03E-4 0 7 11 2.23E-5 0 8 11 -1.05E-4 0 9 11 -2.47E-4 0 0 12 0.00108 0 1 12 8.54E-4 0 2 12 0.00116 0 3 12 0.00158 0 4 12 9.72E-4 0 5 12 5.66E-4 0 6 12 3.24E-4 0 7 12 4.13E-4 0 8 12 3.19E-4 0 9 12 3.14E-4 0 0 13 8.57E-4 0 1 13 9.08E-4 1 2 13 0.00202 3 3 13 0.00243 0 4 13 0.00205 0 5 13 8.88E-4 0 6 13 3.11E-4 0 7 13 3.58E-4 0 8 13 3.50E-4 0 9 13 3.47E-4 0 0 14 0.00204 4 1 14 0.00259 2 2 14 0.00229 0 3 14 0.00207 0 4 14 0.00206 0 5 14 0.00105 0 6 14 7.22E-4 0 7 14 6.15E-4 0 8 14 5.63E-4 0 9 14 3.77E-4