30 4 6 1.03E-5 224 4 7 3.92E-4 49 5 7 6.80E-5 17 3 8 4.19E-7 19 4 8 7.05E-6 66 5 8 6.29E-5 61 6 8 9.90E-5 183 3 9 0.00107 25 4 9 1.40E-5 13 6 9 1.55E-5 27 7 9 2.74E-5 8 8 9 2.79E-5 14 3 10 7.51E-5 0 8 10 2.04E-5