10 4 7 8.25E-4 0 5 7 4.48E-4 0 5 8 1.04E-5 0 6 8 6.73E-4 16 3 9 8.50E-4 0 7 9 9.83E-6 0 8 9 7.06E-5 0 8 10 4.55E-5