4 1 6 1.59E-5 6 1 7 1.03E-4 30 2 7 1.74E-4 41 3 7 1.21E-4 25 3 8 1.22E-4 22 4 8 6.38E-5 20 5 8 3.53E-6 20 5 9 8.74E-5 55 6 9 8.36E-5 63 6 10 0.00127