45 0 1 6.79E-6 75 1 1 8.41E-6 95 2 1 1.01E-5 123 3 1 1.26E-5 146 4 1 1.44E-5 157 5 1 1.53E-5 160 6 1 1.55E-5 152 7 1 1.49E-5 143 8 1 1.40E-5 111 9 1 1.29E-5 52 0 2 6.66E-6 86 1 2 9.12E-6 109 2 2 1.13E-5 134 3 2 1.35E-5 156 4 2 1.54E-5 179 5 2 1.73E-5 187 6 2 1.80E-5 175 7 2 1.70E-5 160 8 2 1.56E-5 136 9 2 1.40E-5 57 0 3 6.76E-6 93 1 3 9.83E-6 126 2 3 1.29E-5 155 3 3 1.52E-5 178 4 3 1.73E-5 198 5 3 1.91E-5 208 6 3 1.98E-5 197 7 3 1.88E-5 175 8 3 1.69E-5 153 9 3 1.51E-5 60 0 4 6.95E-6 97 1 4 1.02E-5 140 2 4 1.41E-5 188 3 4 1.82E-5 213 4 4 2.02E-5 230 5 4 2.17E-5 230 6 4 2.17E-5 215 7 4 2.04E-5 190 8 4 1.82E-5 169 9 4 1.64E-5 57 0 5 6.73E-6 112 1 5 1.18E-5 164 2 5 1.63E-5 218 3 5 2.10E-5 246 4 5 2.33E-5 257 5 5 2.42E-5 254 6 5 2.39E-5 229 7 5 2.17E-5 202 8 5 1.93E-5 180 9 5 1.75E-5 41 0 6 5.01E-6 162 1 6 2.02E-5 229 2 6 2.32E-5 289 3 6 2.73E-5 288 4 6 2.68E-5 283 5 6 2.63E-5 283 6 6 2.62E-5 240 7 6 2.25E-5 193 8 6 1.81E-5 186 9 6 1.78E-5 26 0 7 3.48E-6 59 1 7 1.16E-5 461 2 7 2.71E-5 665 3 7 3.60E-5 338 4 7 2.94E-5 314 5 7 2.88E-5 322 6 7 2.96E-5 238 7 7 2.15E-5 162 8 7 1.50E-5 166 9 7 1.59E-5 9 0 8 1.80E-6 9 1 8 1.83E-6 42 2 8 5.60E-6 167 3 8 3.00E-5 332 4 8 2.22E-5 437 5 8 3.22E-5 419 6 8 3.87E-5 140 7 8 1.70E-5 67 8 8 1.00E-5 114 9 8 1.19E-5 2 0 9 1.06E-6 1 1 9 8.98E-7 14 2 9 2.63E-6 24 3 9 3.65E-6 37 4 9 5.55E-6 161 5 9 2.09E-5

1282 6 9 2.45E-5 34 7 9 1.47E-5 6 8 9 2.81E-6 71 9 9 8.41E-6 0 0 10 6.13E-7 0 1 10 7.45E-7 1 2 10 1.11E-6 2 3 10 1.36E-6 5 4 10 1.55E-6 30 5 10 6.77E-6 751 6 10 4.56E-5 24 7 10 7.02E-6 0 8 10 1.40E-6 5 9 10 2.86E-6 0 0 11 3.86E-7 0 1 11 6.66E-7 0 2 11 6.84E-7 0 3 11 8.05E-7 0 4 11 1.10E-6 9 5 11 1.94E-6 50 6 11 7.60E-6 7 7 11 2.05E-6 0 8 11 5.78E-7 0 9 11 4.98E-7 0 0 12 2.58E-7 0 1 12 2.63E-7 0 2 12 4.09E-7 0 3 12 5.39E-7 0 4 12 7.52E-7 0 5 12 1.02E-6 4 6 12 1.46E-6 0 7 12 7.94E-7 0 8 12 3.73E-7 0 9 12 3.20E-7 0 0 13 2.89E-7 0 1 13 2.92E-7 0 2 13 3.98E-7 0 3 13 5.37E-7 0 4 13 4.72E-7 0 5 13 5.98E-7 0 6 13 6.60E-7 0 7 13 5.09E-7 0 8 13 3.48E-7 0 9 13 2.27E-7 0 0 14 4.41E-7 0 1 14 4.59E-7 0 2 14 5.04E-7 0 3 14 8.87E-7 0 4 14 1.06E-6 1 5 14 1.32E-6 3 6 14 1.56E-6 4 7 14 1.65E-6 4 8 14 1.68E-6 4 9 14 1.75E-6