7 2 7 7.01E-5 5 3 7 2.08E-5 33 3 8 1.05E-4 55 4 8 1.73E-4 9 4 9 3.48E-5 15 5 9 2.40E-5 40 7 10 5.82E-5 0 6 11 4.79E-7 32 7 11 0.00100