1 0 1 0.00255 3 1 1 0.00242 4 2 1 0.00285 6 3 1 0.00320 8 4 1 0.00371 12 5 1 0.00444 14 6 1 0.00485 21 7 1 0.00595 20 8 1 0.00625 12 9 1 0.00608 1 0 2 0.00187 3 1 2 0.00234 4 2 2 0.00274 6 3 2 0.00308 10 4 2 0.00375 14 5 2 0.00450 18 6 2 0.00553 28 7 2 0.00697 31 8 2 0.00756 25 9 2 0.00753 3 0 3 0.00259 6 1 3 0.00286 5 2 3 0.00275 8 3 3 0.00335 11 4 3 0.00403 17 5 3 0.00495 24 6 3 0.00623 33 7 3 0.00773 37 8 3 0.00862 36 9 3 0.00892 8 0 4 0.00355 8 1 4 0.00337 9 2 4 0.00369 11 3 4 0.00420 15 4 4 0.00491 23 5 4 0.00628 36 6 4 0.00825 44 7 4 0.00966 52 8 4 0.0111 53 9 4 0.0116 7 0 5 0.00295 7 1 5 0.00288 9 2 5 0.00348 13 3 5 0.00399 19 4 5 0.00509 33 5 5 0.00741 52 6 5 0.0109 59 7 5 0.0122 68 8 5 0.0139 68 9 5 0.0140 5 0 6 0.00264 12 1 6 0.00389 10 2 6 0.00358 11 3 6 0.00388 20 4 6 0.00523 39 5 6 0.00877 72 6 6 0.0145 84 7 6 0.0166 89 8 6 0.0172 79 9 6 0.0157 4 0 7 0.00277 9 1 7 0.00353 12 2 7 0.00418 13 3 7 0.00425 18 4 7 0.00553 52 5 7 0.0116 107 6 7 0.0204 132 7 7 0.0247 116 8 7 0.0222 100 9 7 0.0197 0 0 8 0.00237 0 1 8 0.00117 5 2 8 0.00839 4 3 8 0.00272 12 4 8 0.00426 39 5 8 0.0118 208 6 8 0.0380 208 7 8 0.0375 154 8 8 0.0285 131 9 8 0.0250 0 0 9 4.03E-4 0 1 9 6.42E-4 0 2 9 0.00102 0 3 9 0.00151 0 4 9 0.00146 11 5 9 0.0310 284 6 9 0.132 310 7 9 0.0626 107 8 9 0.0236 100 9 9 0.0210 0 0 10 3.99E-4 0 1 10 5.05E-4 0 2 10 7.22E-4 0 3 10 7.83E-4 0 4 10 6.66E-4 0 5 10 0.00101 0 6 10 0.00281 33 7 10 0.0912 0 8 10 0.00458 0 9 10 7.08E-4 0 0 11 6.90E-4 0 1 11 6.46E-4 0 2 11 4.75E-4 0 3 11 4.05E-4 0 4 11 3.94E-4 0 5 11 4.81E-4 0 6 11 5.81E-4 0 7 11 0.00136 0 8 11 7.57E-4 0 9 11 7.17E-4 6 0 12 0.00311 5 1 12 0.00300 5 2 12 0.00292 7 3 12 0.00318 8 4 12 0.00341 9 5 12 0.00364 12 6 12 0.00431 13 7 12 0.00466 10 8 12 0.00416 9 9 12 0.00397 4 0 13 0.00298 6 1 13 0.00293 6 2 13 0.00313 6 3 13 0.00324 7 4 13 0.00341 8 5 13 0.00367 12 6 13 0.00433 11 7 13 0.00441 9 8 13 0.00392 6 9 13 0.00376 4 0 14 0.00315 5 1 14 0.00316 5 2 14 0.00318 7 3 14 0.00346 6 4 14 0.00339 8 5 14 0.00374 8 6 14 0.00368 8 7 14 0.00387 6 8 14 0.00364 5 9 14 0.00372