0 0 1 0.00203 2 1 1 0.00232 3 2 1 0.00267 5 3 1 0.00300 6 4 1 0.00333 8 5 1 0.00359 8 6 1 0.00373 9 7 1 0.00415 8 8 1 0.00415 1 9 1 0.00379 3 0 2 0.00308 7 1 2 0.00322 9 2 2 0.00365 12 3 2 0.00398 12 4 2 0.00449 13 5 2 0.00471 14 6 2 0.00486 14 7 2 0.00511 15 8 2 0.00503 10 9 2 0.00472 4 0 3 0.00255 7 1 3 0.00294 10 2 3 0.00360 12 3 3 0.00396 13 4 3 0.00443 15 5 3 0.00472 15 6 3 0.00469 16 7 3 0.00485 17 8 3 0.00498 14 9 3 0.00510 7 0 4 0.00290 12 1 4 0.00370 13 2 4 0.00408 17 3 4 0.00475 20 4 4 0.00521 20 5 4 0.00543 20 6 4 0.00533 21 7 4 0.00566 21 8 4 0.00566 19 9 4 0.00561 7 0 5 0.00312 14 1 5 0.00395 18 2 5 0.00466 21 3 5 0.00534 24 4 5 0.00599 25 5 5 0.00623 26 6 5 0.00648 25 7 5 0.00630 23 8 5 0.00619 23 9 5 0.00607 7 0 6 0.00322 14 1 6 0.00450 22 2 6 0.00543 26 3 6 0.00642 28 4 6 0.00698 33 5 6 0.00754 33 6 6 0.00779 33 7 6 0.00772 29 8 6 0.00725 26 9 6 0.00686 9 0 7 0.00347 18 1 7 0.00510 27 2 7 0.00655 34 3 7 0.00784 38 4 7 0.00862 41 5 7 0.00916 41 6 7 0.00916 42 7 7 0.00926 38 8 7 0.00895 36 9 7 0.00851 9 0 8 0.00371 21 1 8 0.00549 35 2 8 0.00788 47 3 8 0.0101 53 4 8 0.0111 55 5 8 0.0116 56 6 8 0.0118 57 7 8 0.0118 54 8 8 0.0117 49 9 8 0.0111 8 0 9 0.00316 18 1 9 0.00473 39 2 9 0.00846 56 3 9 0.0115 69 4 9 0.0138 73 5 9 0.0145 70 6 9 0.0139 70 7 9 0.0141 68 8 9 0.0139 62 9 9 0.0130 5 0 10 0.00311 17 1 10 0.00520 49 2 10 0.0106 56 3 10 0.0121 90 4 10 0.0175 91 5 10 0.0178 88 6 10 0.0174 87 7 10 0.0174 88 8 10 0.0175 84 9 10 0.0173 1 0 11 0.00227 17 1 11 0.00526 69 2 11 0.0141 84 3 11 0.0172 143 4 11 0.0264 127 5 11 0.0240 112 6 11 0.0216 108 7 11 0.0212 111 8 11 0.0223 112 9 11 0.0226 0 0 12 0.00101 15 1 12 0.00464 146 2 12 0.0376 166 3 12 0.0311 201 4 12 0.0362 171 5 12 0.0310 143 6 12 0.0267 142 7 12 0.0268 154 8 12 0.0293 148 9 12 0.0294 0 0 13 8.59E-4 3 1 13 0.00227 58 2 13 0.0600 160 3 13 0.0764 250 4 13 0.0467 173 5 13 0.0314 139 6 13 0.0258 152 7 13 0.0283 148 8 13 0.0276 142 9 13 0.0285 0 0 14 4.73E-4 0 1 14 6.87E-4 4 2 14 0.00271 6 3 14 0.00301 18 4 14 0.0257 19 5 14 0.0146 30 6 14 0.0127 23 7 14 0.0132 17 8 14 0.0115 0 9 14 0.00363