6 1 7 4.85E-5 26 2 7 1.33E-4 23 3 7 1.06E-4 22 4 7 3.31E-5 25 4 8 9.81E-5 13 5 8 5.56E-5

0 7 10 1.35E-6 0 8 10 1.52E-5