0 0 1 -0.0451 0 1 1 0.0243 0 2 1 0.0136 0 3 1 0.0259 0 4 1 0.00545 0 5 1 0.0159 0 6 1 0.00260 0 7 1 -0.00967 0 8 1 0.0205 0 9 1 0.0311 0 0 2 -0.0388 0 1 2 0.0347 0 2 2 0.0422 0 3 2 0.0462 0 4 2 0.0496 0 5 2 0.0205 0 6 2 0.0597 0 7 2 0.0528 0 8 2 0.0484 0 9 2 0.0872 0 0 3 -0.0147 0 1 3 0.0105 0 2 3 0.00607 0 3 3 0.0215 0 4 3 0.00543 0 5 3 0.0137 0 6 3 0.0175 0 7 3 0.00347 0 8 3 0.00948 0 9 3 0.00191 0 0 4 -0.0349 0 1 4 -0.0163 0 2 4 -0.0280 0 3 4 -0.0142 0 4 4 -0.00827 0 5 4 1.94E-4 0 6 4 -0.00865 0 7 4 -0.00413 0 8 4 -0.00244 0 9 4 6.10E-4 0 0 5 -0.0116 0 1 5 -0.0378 0 2 5 -0.0179 0 3 5 -0.0440 0 4 5 -0.0236 0 5 5 -0.0194 0 6 5 -0.00579 0 7 5 -0.0237 0 8 5 -0.0252 0 9 5 -0.00842 0 0 6 0.0739 0 1 6 0.0475 0 2 6 0.0597 0 3 6 0.0497 0 4 6 0.0522 0 5 6 0.0474 7 6 6 3.55 0 7 6 0.0614 0 8 6 0.0490 0 9 6 0.0152 0 0 7 0.0590 0 1 7 0.153 4 2 7 0.531 0 3 7 0.0415 0 4 7 0.0753 0 5 7 0.0752 154 6 7 8.43 0 7 7 0.825 0 8 7 0.0672 0 9 7 0.0975 0 0 8 0.226 15 1 8 1.34 32 2 8 2.74 28 3 8 1.30 17 4 8 0.884 21 5 8 1.06 23 6 8 1.29 23 7 8 1.21 20 8 8 1.04 33 9 8 1.84 10 0 9 0.658 46 1 9 4.86 20 2 9 1.16 35 3 9 2.27 42 4 9 6.05 43 5 9 5.06 19 6 9 1.13 17 7 9 1.57 22 8 9 1.40 64 9 9 8.23 12 0 10 2.11 81 1 10 6.17 50 2 10 2.58 79 3 10 4.26 78 4 10 5.61 79 5 10 4.75 36 6 10 3.76 44 7 10 5.18 20 8 10 0.978 39 9 10 1.84 8 0 11 0.611 59 1 11 2.91 47 2 11 8.44 122 3 11 10.3 36 4 11 4.36 68 5 11 2.91 60 6 11 2.71 85 7 11 3.85 52 8 11 2.28 37 9 11 1.58 27 0 12 1.51 28 1 12 1.56 43 2 12 2.63 57 3 12 2.67 21 4 12 1.41 33 5 12 1.44 34 6 12 1.56 35 7 12 1.96 16 8 12 1.01 12 9 12 0.751 20 0 13 1.16 22 1 13 1.26 78 2 13 3.78 61 3 13 2.90 52 4 13 2.41 22 5 13 1.15 13 6 13 0.839 1 7 13 0.369 0 8 13 0.288 0 9 13 0.357 17 0 14 1.28 26 1 14 1.56 64 2 14 3.40 28 3 14 1.53 22 4 14 1.35 14 5 14 0.875 4 6 14 0.509 0 7 14 0.293 0 8 14 0.211 0 9 14 0.168