0 0 1 0.00185 0 1 1 0.00196 1 2 1 0.00208 1 3 1 0.00250 1 4 1 0.00222 0 5 1 0.00199 0 6 1 0.00189 0 7 1 0.00176 0 8 1 0.00189 0 9 1 6.86E-4 2 0 2 0.00268 6 1 2 0.00293 4 2 2 0.00259 5 3 2 0.00252 4 4 2 0.00285 2 5 2 0.00269 1 6 2 0.00246 0 7 2 0.00249 0 8 2 0.00225 0 9 2 7.50E-4 6 0 3 0.00313 8 1 3 0.00327 8 2 3 0.00320 8 3 3 0.00331 7 4 3 0.00327 5 5 3 0.00295 2 6 3 0.00283 0 7 3 0.00252 0 8 3 0.00257 0 9 3 5.14E-4 9 0 4 0.00372 16 1 4 0.00412 15 2 4 0.00423 12 3 4 0.00397 14 4 4 0.00435 13 5 4 0.00401 11 6 4 0.00379 7 7 4 0.00351 4 8 4 0.00298 0 9 4 5.91E-4 11 0 5 0.00398 16 1 5 0.00459 18 2 5 0.00500 18 3 5 0.00494 20 4 5 0.00529 19 5 5 0.00538 17 6 5 0.00515 15 7 5 0.00486 9 8 5 0.00404 0 9 5 5.26E-4 11 0 6 0.00366 14 1 6 0.00418 18 2 6 0.00493 20 3 6 0.00539 22 4 6 0.00552 24 5 6 0.00618 22 6 6 0.00574 20 7 6 0.00554 3 8 6 0.00318 0 9 6 -4.88E-5 13 0 7 0.00393 17 1 7 0.00473 20 2 7 0.00556 27 3 7 0.00645 29 4 7 0.00672 30 5 7 0.00715 32 6 7 0.00719 30 7 7 0.00732 2 8 7 0.00314 0 9 7 2.86E-4 12 0 8 0.00402 20 1 8 0.00518 29 2 8 0.00668 36 3 8 0.00791 36 4 8 0.00804 35 5 8 0.00797 36 6 8 0.00813 38 7 8 0.00843 0 8 8 0.00196 0 9 8 2.94E-4 11 0 9 0.00394 27 1 9 0.00652 48 2 9 0.0103 51 3 9 0.0107 51 4 9 0.0107 44 5 9 0.00966 43 6 9 0.00961 38 7 9 0.00866 0 8 9 0.00124 0 9 9 4.61E-4 0 0 10 0.00170 11 1 10 0.00479 57 2 10 0.0149 97 3 10 0.0224 104 4 10 0.0206 86 5 10 0.0210 60 6 10 0.0132 0 7 10 0.00315 0 8 10 3.95E-4 0 9 10 3.32E-4 0 0 11 6.54E-4 0 1 11 0.00117 7 2 11 0.0125 108 3 11 0.0372 298 4 11 0.0646 781 5 11 0.133 240 6 11 0.0600 0 7 11 0.00132 0 8 11 5.12E-4 0 9 11 7.65E-4 0 0 12 4.94E-4 0 1 12 5.21E-4 0 2 12 0.00108 0 3 12 0.00324 44 4 12 0.0781

1947 5 12 0.333 344 6 12 0.129 0 7 12 0.00107 0 8 12 6.32E-4 0 9 12 5.05E-4 0 0 13 0.00102 0 1 13 0.00124 0 2 13 9.73E-4 0 3 13 8.43E-4 0 4 13 0.00177 12 5 13 0.0406 11 6 13 0.0481 0 7 13 9.65E-4 0 8 13 6.58E-4 0 9 13 7.30E-4 0 0 14 0.00121 0 1 14 0.00133 0 2 14 0.00123 0 3 14 0.00125 0 4 14 0.00145 0 5 14 0.00189 0 6 14 0.00181 0 7 14 0.00141 0 8 14 0.00126 0 9 14 0.00114