0 0 1 0.00210 0 1 1 0.00228 1 2 1 0.00230 1 3 1 0.00217 0 4 1 0.00233 0 5 1 0.00243 0 6 1 0.00248 0 7 1 0.00248 0 8 1 0.00221 0 9 1 0.00191 1 0 2 0.00202 4 1 2 0.00219 4 2 2 0.00225 3 3 2 0.00245 3 4 2 0.00258 2 5 2 0.00260 1 6 2 0.00234 0 7 2 0.00217 0 8 2 0.00211 0 9 2 0.00278 1 0 3 0.00231 5 1 3 0.00273 3 2 3 0.00262 3 3 3 0.00264 4 4 3 0.00271 3 5 3 0.00276 1 6 3 0.00259 1 7 3 0.00258 0 8 3 0.00212 0 9 3 0.00237 0 0 4 0.00104 3 1 4 0.00227 2 2 4 0.00231 3 3 4 0.00247 1 4 4 0.00252 2 5 4 0.00238 0 6 4 0.00235 0 7 4 0.00208 0 8 4 0.00179 0 9 4 0.00177 0 0 5 0.00115 9 1 5 0.00320 5 2 5 0.00277 9 3 5 0.00344 5 4 5 0.00291 7 5 5 0.00328 5 6 5 0.00323 4 7 5 0.00288 0 8 5 0.00177 0 9 5 0.00187 0 0 6 8.11E-4 7 1 6 0.00319 2 2 6 0.00262 10 3 6 0.00371 0 4 6 0.00260 6 5 6 0.00337 6 6 6 0.00355 2 7 6 0.00293 0 8 6 0.00119 0 9 6 0.00151 0 0 7 5.40E-4 5 1 7 0.00283 0 2 7 0.00141 7 3 7 0.00333 5 4 7 0.00288 10 5 7 0.00373 9 6 7 0.00370 2 7 7 0.00272 0 8 7 7.49E-4 0 9 7 7.58E-4 0 0 8 2.49E-4 2 1 8 0.00214 0 2 8 0.00118 0 3 8 0.00194 6 4 8 0.00318 12 5 8 0.00430 8 6 8 0.00344 0 7 8 0.00188 0 8 8 3.59E-4 0 9 8 1.92E-4 0 0 9 -1.70E-5 0 1 9 9.13E-4 0 2 9 3.84E-4 0 3 9 1.66E-4 8 4 9 0.00360 15 5 9 0.00464 5 6 9 0.00322 0 7 9 8.65E-4 0 8 9 -3.32E-5 0 9 9 -2.32E-4 0 0 10 3.57E-5 0 1 10 -1.27E-5 0 2 10 -2.82E-5 0 3 10 -8.20E-5 4 4 10 0.00341 31 5 10 0.00784 0 6 10 0.00155 0 7 10 1.60E-4 0 8 10 -2.98E-4 0 9 10 -3.03E-4 0 0 11 3.86E-4 0 1 11 4.58E-4 0 2 11 3.61E-4 0 3 11 3.29E-4 0 4 11 0.00176 22 5 11 0.0108 0 6 11 4.84E-4 0 7 11 4.90E-4 0 8 11 3.80E-4 0 9 11 3.81E-4 0 0 12 -3.06E-4 0 1 12 7.54E-5 0 2 12 -7.39E-5 0 3 12 -1.90E-4 0 4 12 2.22E-4 0 5 12 0.00106 0 6 12 3.59E-4 0 7 12 1.15E-4 0 8 12 -1.44E-4 0 9 12 -1.27E-4 0 0 13 1.41E-4 0 1 13 5.95E-4 0 2 13 6.51E-4 0 3 13 7.18E-4 0 4 13 8.54E-4 0 5 13 9.14E-4 0 6 13 7.94E-4 0 7 13 6.57E-4 0 8 13 6.79E-4 0 9 13 4.44E-4 0 0 14 7.78E-4 0 1 14 8.78E-4 0 2 14 7.57E-4 0 3 14 8.93E-4 0 4 14 9.12E-4 0 5 14 9.84E-4 0 6 14 0.00109 0 7 14 7.69E-4 0 8 14 8.61E-4 0 9 14 8.78E-4