0 0 1 0.00199 1 1 1 0.00233 1 2 1 0.00246 2 3 1 0.00235 1 4 1 0.00248 0 5 1 0.00245 0 6 1 0.00224 0 7 1 0.00226 0 8 1 0.00220 0 9 1 0.00273 1 0 2 0.00202 4 1 2 0.00231 4 2 2 0.00264 5 3 2 0.00275 4 4 2 0.00284 4 5 2 0.00287 3 6 2 0.00265 2 7 2 0.00241 0 8 2 0.00241 0 9 2 0.00239 0 0 3 0.00160 6 1 3 0.00278 6 2 3 0.00298 6 3 3 0.00289 6 4 3 0.00303 4 5 3 0.00313 4 6 3 0.00314 3 7 3 0.00288 1 8 3 0.00233 0 9 3 0.00245 0 0 4 6.73E-4 3 1 4 0.00230 4 2 4 0.00209 5 3 4 0.00257 3 4 4 0.00226 4 5 4 0.00272 4 6 4 0.00282 3 7 4 0.00281 0 8 4 0.00149 0 9 4 0.00183 0 0 5 4.84E-4 5 1 5 0.00267 0 2 5 0.00179 6 3 5 0.00302 0 4 5 0.00204 6 5 5 0.00315 6 6 5 0.00334 3 7 5 0.00296 0 8 5 0.00104 0 9 5 0.00147 0 0 6 5.57E-4 3 1 6 0.00239 0 2 6 0.00129 4 3 6 0.00272 1 4 6 0.00256 8 5 6 0.00359 9 6 6 0.00373 2 7 6 0.00291 0 8 6 6.56E-4 0 9 6 6.44E-4 0 0 7 3.58E-5 1 1 7 0.00212 0 2 7 9.94E-4 0 3 7 0.00164 4 4 7 0.00285 10 5 7 0.00403 9 6 7 0.00365 0 7 7 0.00183 0 8 7 2.95E-4 0 9 7 1.45E-4 0 0 8 -1.75E-4 0 1 8 9.19E-4 0 2 8 5.12E-4 0 3 8 2.92E-4 4 4 8 0.00299 14 5 8 0.00451 4 6 8 0.00323 0 7 8 8.74E-4 0 8 8 -7.48E-5 0 9 8 -3.52E-5 0 0 9 2.96E-5 0 1 9 7.31E-5 0 2 9 6.71E-5 0 3 9 7.55E-5 3 4 9 0.00293 31 5 9 0.00742 0 6 9 0.00166 0 7 9 2.91E-4 0 8 9 -9.13E-6 0 9 9 -1.89E-4 0 0 10 7.75E-5 0 1 10 6.47E-5 0 2 10 1.54E-4 0 3 10 8.41E-5 0 4 10 9.64E-4 16 5 10 0.0116 0 6 10 2.18E-4 0 7 10 9.69E-5 0 8 10 3.79E-5 0 9 10 -7.32E-5 0 0 11 4.68E-4 0 1 11 7.24E-4 0 2 11 5.23E-4 0 3 11 4.81E-4 0 4 11 9.01E-4 0 5 11 0.00144 0 6 11 0.00104 0 7 11 5.71E-4 0 8 11 3.73E-4 0 9 11 4.45E-4 0 0 12 2.41E-4 0 1 12 4.02E-4 0 2 12 7.01E-4 0 3 12 6.68E-4 0 4 12 6.92E-4 0 5 12 7.68E-4 0 6 12 6.73E-4 0 7 12 7.23E-4 0 8 12 2.87E-4 0 9 12 2.68E-4 0 0 13 6.92E-4 0 1 13 8.94E-4 0 2 13 7.23E-4 0 3 13 9.41E-4 0 4 13 9.90E-4 0 5 13 7.97E-4 0 6 13 9.21E-4 0 7 13 7.86E-4 0 8 13 7.55E-4 0 9 13 9.14E-4 0 0 14 8.87E-4 0 1 14 0.00101 0 2 14 8.13E-4 0 3 14 9.22E-4 0 4 14 0.00107 0 5 14 0.00103 0 6 14 0.00125 0 7 14 9.86E-4 0 8 14 9.55E-4 0 9 14 0.00103