0 0 1 0.00247 2 1 1 0.00259 2 2 1 0.00267 1 3 1 0.00239 1 4 1 0.00260 0 5 1 0.00246 0 6 1 0.00250 0 7 1 0.00243 0 8 1 0.00239 0 9 1 0.00208 1 0 2 0.00231 4 1 2 0.00234 3 2 2 0.00245 4 3 2 0.00261 2 4 2 0.00264 2 5 2 0.00276 0 6 2 0.00249 0 7 2 0.00227 0 8 2 0.00237 0 9 2 0.00224 2 0 3 0.00250 6 1 3 0.00293 7 2 3 0.00323 6 3 3 0.00308 5 4 3 0.00308 4 5 3 0.00310 3 6 3 0.00293 1 7 3 0.00273 0 8 3 0.00254 0 9 3 0.00405 0 0 4 0.00156 7 1 4 0.00280 6 2 4 0.00311 6 3 4 0.00307 6 4 4 0.00313 5 5 4 0.00324 4 6 4 0.00296 2 7 4 0.00273 0 8 4 0.00233 0 9 4 0.00202 0 0 5 0.00149 9 1 5 0.00350 8 2 5 0.00322 12 3 5 0.00395 8 4 5 0.00334 9 5 5 0.00362 8 6 5 0.00356 4 7 5 0.00321 0 8 5 0.00204 0 9 5 0.00187 0 0 6 8.30E-4 7 1 6 0.00336 3 2 6 0.00272 12 3 6 0.00391 1 4 6 0.00273 9 5 6 0.00391 9 6 6 0.00399 4 7 6 0.00320 0 8 6 0.00138 0 9 6 0.00155 0 0 7 1.10E-4 7 1 7 0.00327 0 2 7 0.00112 9 3 7 0.00356 4 4 7 0.00285 13 5 7 0.00410 9 6 7 0.00374 2 7 7 0.00272 0 8 7 5.98E-4 0 9 7 4.69E-4 0 0 8 7.09E-5 9 1 8 0.00321 0 2 8 0.00142 3 3 8 0.00279 12 4 8 0.00423 20 5 8 0.00534 14 6 8 0.00438 0 7 8 0.00199 0 8 8 2.25E-4 0 9 8 8.75E-5 0 0 9 2.93E-4 0 1 9 0.00191 0 2 9 8.18E-4 0 3 9 7.78E-4 21 4 9 0.00634 31 5 9 0.00714 13 6 9 0.00467 0 7 9 0.00146 0 8 9 4.07E-4 0 9 9 2.57E-4 0 0 10 1.78E-4 0 1 10 5.45E-4 0 2 10 4.24E-4 0 3 10 3.55E-4 13 4 10 0.00601 50 5 10 0.0113 0 6 10 0.00224 0 7 10 5.75E-4 0 8 10 3.70E-4 0 9 10 2.27E-4 0 0 11 9.63E-4 0 1 11 9.96E-4 0 2 11 8.81E-4 0 3 11 7.02E-4 0 4 11 0.00300 24 5 11 0.0179 0 6 11 9.46E-4 0 7 11 7.69E-4 0 8 11 7.93E-4 0 9 11 8.63E-4 0 0 12 1.75E-4 0 1 12 2.66E-4 0 2 12 1.99E-4 0 3 12 2.53E-4 0 4 12 5.65E-4 0 5 12 0.00159 0 6 12 5.92E-4 0 7 12 5.70E-4 0 8 12 7.34E-5 0 9 12 6.95E-5 0 0 13 3.72E-4 0 1 13 6.21E-4 0 2 13 8.28E-4 0 3 13 8.06E-4 0 4 13 9.60E-4 0 5 13 8.88E-4 0 6 13 9.98E-4 0 7 13 7.91E-4 0 8 13 6.92E-4 0 9 13 5.88E-4 0 0 14 0.00104 0 1 14 0.00102 0 2 14 8.59E-4 0 3 14 9.92E-4 0 4 14 0.00106 0 5 14 0.00114 0 6 14 0.00104 0 7 14 8.79E-4 0 8 14 0.00109 0 9 14 9.82E-4