0 0 1 0.00238 2 1 1 0.00252 3 2 1 0.00271 2 3 1 0.00267 2 4 1 0.00267 0 5 1 0.00244 0 6 1 0.00256 0 7 1 0.00249 0 8 1 0.00252 0 9 1 0.00221 3 0 2 0.00257 7 1 2 0.00286 7 2 2 0.00307 6 3 2 0.00318 5 4 2 0.00321 5 5 2 0.00302 4 6 2 0.00283 3 7 2 0.00274 1 8 2 0.00271 0 9 2 0.00389 0 0 3 0.00220 8 1 3 0.00346 8 2 3 0.00346 7 3 3 0.00336 8 4 3 0.00345 7 5 3 0.00344 6 6 3 0.00328 4 7 3 0.00316 3 8 3 0.00287 0 9 3 0.00282 0 0 4 9.02E-4 9 1 4 0.00300 8 2 4 0.00305 8 3 4 0.00324 8 4 4 0.00306 7 5 4 0.00314 6 6 4 0.00307 5 7 4 0.00293 0 8 4 0.00192 0 9 4 0.00165 0 0 5 9.04E-4 10 1 5 0.00361 6 2 5 0.00280 13 3 5 0.00424 6 4 5 0.00294 10 5 5 0.00382 11 6 5 0.00394 8 7 5 0.00361 0 8 5 0.00151 0 9 5 0.00206 0 0 6 0.00106 12 1 6 0.00395 2 2 6 0.00262 13 3 6 0.00443 8 4 6 0.00358 11 5 6 0.00436 16 6 6 0.00470 8 7 6 0.00373 0 8 6 0.00123 0 9 6 0.00144 0 0 7 1.32E-5 10 1 7 0.00352 0 2 7 0.00156 6 3 7 0.00311 11 4 7 0.00383 16 5 7 0.00481 15 6 7 0.00465 2 7 7 0.00274 0 8 7 5.19E-4 0 9 7 2.47E-4 0 0 8 2.49E-4 5 1 8 0.00294 0 2 8 0.00177 0 3 8 9.74E-4 18 4 8 0.00558 24 5 8 0.00634 17 6 8 0.00516 0 7 8 0.00164 0 8 8 2.17E-4 0 9 8 3.38E-4 0 0 9 5.54E-5 0 1 9 4.15E-4 0 2 9 8.32E-5 0 3 9 1.80E-4 17 4 9 0.00647 42 5 9 0.00960 6 6 9 0.00411 0 7 9 7.48E-4 0 8 9 1.01E-4 0 9 9 -3.55E-5 0 0 10 -3.22E-5 0 1 10 6.95E-6 0 2 10 1.38E-5 0 3 10 -1.26E-4 0 4 10 0.00346 56 5 10 0.0175 0 6 10 3.86E-4 0 7 10 -7.18E-6 0 8 10 -1.41E-4 0 9 10 -1.41E-4 0 0 11 2.12E-4 0 1 11 2.58E-4 0 2 11 1.72E-4 0 3 11 1.91E-4 0 4 11 4.87E-4 0 5 11 0.00721 0 6 11 7.11E-4 0 7 11 3.20E-4 0 8 11 2.26E-4 0 9 11 2.16E-4 0 0 12 3.00E-4 0 1 12 6.23E-4 0 2 12 9.07E-4 0 3 12 8.16E-4 0 4 12 8.78E-4 0 5 12 0.00106 0 6 12 0.00100 0 7 12 9.45E-4 0 8 12 5.83E-4 0 9 12 3.81E-4 0 0 13 9.67E-4 0 1 13 0.00115 0 2 13 0.00108 0 3 13 0.00103 0 4 13 0.00104 0 5 13 0.00105 0 6 13 9.66E-4 0 7 13 9.08E-4 0 8 13 0.00101 0 9 13 9.98E-4 0 0 14 0.00108 0 1 14 0.00111 0 2 14 9.01E-4 0 3 14 8.85E-4 0 4 14 9.19E-4 0 5 14 0.00106 0 6 14 9.97E-4 0 7 14 9.30E-4 0 8 14 0.00103 0 9 14 0.00103