1 0 1 0.269 8 1 1 0.329 16 2 1 0.383 19 3 1 0.414 24 4 1 0.453 31 5 1 0.485 35 6 1 0.528 39 7 1 0.606 49 8 1 0.720 61 9 1 0.856 74 10 1 0.978 79 11 1 1.08 84 12 1 1.09 79 13 1 1.07 77 14 1 1.04 71 15 1 0.957 61 16 1 0.817 48 17 1 0.686 32 18 1 0.556 20 19 1 0.462 6 20 1 0.312 0 21 1 0.0774 6 0 2 0.277 12 1 2 0.323 19 2 2 0.385 25 3 2 0.426 31 4 2 0.477 35 5 2 0.533 43 6 2 0.620 54 7 2 0.735 62 8 2 0.845 74 9 2 0.999 89 10 2 1.19 101 11 2 1.30 102 12 2 1.31 102 13 2 1.27 94 14 2 1.22 84 15 2 1.11 70 16 2 0.947 57 17 2 0.759 40 18 2 0.639 29 19 2 0.508 17 20 2 0.416 0 21 2 0.242 10 0 3 0.312 15 1 3 0.357 18 2 3 0.398 28 3 3 0.471 31 4 3 0.498 39 5 3 0.566 46 6 3 0.647 56 7 3 0.777 66 8 3 0.925 83 9 3 1.14 109 10 3 1.41 126 11 3 1.58 120 12 3 1.51 113 13 3 1.44 109 14 3 1.39 101 15 3 1.29 82 16 3 1.06 57 17 3 0.813 44 18 3 0.645 29 19 3 0.518 8 20 3 0.303 0 21 3 0.143 10 0 4 0.318 15 1 4 0.351 25 2 4 0.437 27 3 4 0.444 34 4 4 0.517 43 5 4 0.587 55 6 4 0.711 63 7 4 0.864 77 8 4 1.04 106 9 4 1.35 140 10 4 1.74 164 11 4 2.02 148 12 4 1.84 135 13 4 1.67 129 14 4 1.60 117 15 4 1.48 95 16 4 1.22 67 17 4 0.889 45 18 4 0.628 33 19 4 0.504 14 20 4 0.336 0 21 4 0.133 11 0 5 0.283 17 1 5 0.351 24 2 5 0.399 28 3 5 0.455 39 4 5 0.550 46 5 5 0.625 56 6 5 0.769 69 7 5 0.966 93 8 5 1.19 129 9 5 1.63 196 10 5 2.44 243 11 5 3.00 188 12 5 2.29 162 13 5 1.97 155 14 5 1.91 144 15 5 1.78 111 16 5 1.41 74 17 5 0.971 48 18 5 0.660 29 19 5 0.484 3 20 5 0.243 0 21 5 0.0751 9 0 6 0.348 15 1 6 0.394 24 2 6 0.426 27 3 6 0.490 37 4 6 0.576 48 5 6 0.697 63 6 6 0.903 79 7 6 1.09 106 8 6 1.38 163 9 6 2.11 350 10 6 5.70 523 11 6 12.3 253 12 6 3.09 197 13 6 2.44 209 14 6 2.55 199 15 6 2.47 140 16 6 1.76 79 17 6 1.06 48 18 6 0.682 30 19 6 0.501 0 20 6 0.141 0 21 6 0.0433 11 0 7 0.326 21 1 7 0.380 28 2 7 0.420 32 3 7 0.508 40 4 7 0.607 54 5 7 0.769 82 6 7 1.40 104 7 7 1.45 133 8 7 1.72 246 9 7 3.63

1066 10 7 17.4 963 11 7 13.7 296 12 7 3.73 250 13 7 3.52 326 14 7 6.44 437 15 7 7.00 201 16 7 4.47 89 17 7 1.18 51 18 7 0.688 26 19 7 0.463 0 20 7 0.134 0 21 7 0.0811 15 0 8 0.336 16 1 8 0.370 29 2 8 0.444 33 3 8 0.623 49 4 8 0.710 62 5 8 0.844 79 6 8 1.07 112 7 8 1.48 170 8 8 2.18 621 9 8 11.8 947 10 8 11.9 427 11 8 5.52 329 12 8 5.73 561 13 8 11.6 399 14 8 5.51 656 15 8 13.0 345 16 8 6.48 102 17 8 1.34 50 18 8 0.691 15 19 8 0.357 0 20 8 0.129 0 21 8 0.0945 12 0 9 0.338 15 1 9 0.330 21 2 9 0.387 33 3 9 0.506 43 4 9 0.640 65 5 9 1.01 91 6 9 1.22 149 7 9 1.93 263 8 9 3.52 756 9 9 10.6 645 10 9 8.55 338 11 9 4.16 371 12 9 6.74 488 13 9 7.25 329 14 9 4.05 440 15 9 7.12 829 16 9 14.2 123 17 9 2.67 47 18 9 0.697 21 19 9 0.414 0 20 9 0.106 0 21 9 0.0404 12 0 10 0.293 15 1 10 0.342 22 2 10 0.413 33 3 10 0.533 46 4 10 0.695 68 5 10 0.980 103 6 10 1.38 215 7 10 3.04 637 8 10 11.9 357 9 10 5.61 598 10 10 9.40 376 11 10 4.62 312 12 10 3.82 321 13 10 3.92 262 14 10 3.16 238 15 10 2.94 148 16 10 2.66 77 17 10 1.84 38 18 10 0.579 21 19 10 0.404 0 20 10 0.0893 0 21 10 0.0581 13 0 11 0.303 18 1 11 0.342 25 2 11 0.405 34 3 11 0.522 53 4 11 0.772 80 5 11 1.08 131 6 11 1.68 367 7 11 9.30

1227 8 11 16.9 713 9 11 9.06 413 10 11 5.08 326 11 11 4.01 341 12 11 5.96 455 13 11 7.93 460 14 11 5.96 435 15 11 6.90 83 16 11 1.07 47 17 11 0.716 32 18 11 0.482 19 19 11 0.373 0 20 11 0.139 0 21 11 0.0491 15 0 12 0.333 23 1 12 0.365 27 2 12 0.445 43 3 12 0.624 65 4 12 0.851 96 5 12 1.32 190 6 12 2.49 661 7 12 10.4

1274 8 12 15.9 711 9 12 8.83 365 10 12 4.45 275 11 12 3.32 277 12 12 3.37 394 13 12 5.31 650 14 12 8.46 132 15 12 3.93 64 16 12 0.863 40 17 12 0.586 28 18 12 0.429 20 19 12 0.330 0 20 12 0.146 0 21 12 0.0627 13 0 13 0.319 18 1 13 0.351 30 2 13 0.466 46 3 13 0.651 77 4 13 1.05 133 5 13 1.72 360 6 13 8.67 954 7 13 13.3

1165 8 13 14.6 585 9 13 6.74 273 10 13 3.45 281 11 13 3.40 325 12 13 4.04 445 13 13 5.36 891 14 13 11.6 134 15 13 2.40 62 16 13 0.829 35 17 13 0.555 24 18 13 0.430 11 19 13 0.279 0 20 13 0.104 0 21 13 0.0716 11 0 14 0.262 18 1 14 0.328 31 2 14 0.495 53 3 14 0.739 96 4 14 1.25 182 5 14 2.46 635 6 14 11.3

1501 7 14 17.3 908 8 14 11.2 530 9 14 5.86 289 10 14 3.48 292 11 14 3.50 468 12 14 8.41 689 13 14 8.63

1496 14 14 19.5 175 15 14 7.03 57 16 14 0.778 34 17 14 0.517 20 18 14 0.360 2 19 14 0.186 0 20 14 0.0824 0 21 14 0.0462 12 0 15 0.278 18 1 15 0.358 35 2 15 0.535 64 3 15 0.936 128 4 15 1.73 356 5 15 6.63 872 6 15 14.6

1517 7 15 19.9 786 8 15 9.35 363 9 15 4.82 306 10 15 3.71 337 11 15 4.23 507 12 15 7.09 708 13 15 8.63

1628 14 15 22.2 166 15 15 5.21 61 16 15 0.840 31 17 15 0.503 10 18 15 0.296 0 19 15 0.0645 0 20 15 0.0444 0 21 15 0.0594 13 0 16 0.287 21 1 16 0.365 40 2 16 0.604 88 3 16 1.19 215 4 16 3.03 546 5 16 10.9

1713 6 16 20.1

1079 7 16 13.2 682 8 16 7.91 281 9 16 3.88 291 10 16 3.53 349 11 16 4.19 596 12 16 7.28 818 13 16 9.89

1752 14 16 23.7 197 15 16 5.45 66 16 16 0.880 32 17 16 0.482 18 18 16 0.350 0 19 16 0.173 0 20 16 0.0692 0 21 16 0.0682 13 0 17 0.301 21 1 17 0.377 45 2 17 0.656 128 3 17 1.80 422 4 17 11.3 662 5 17 9.94

1615 6 17 18.7 360 7 17 4.42 250 8 17 3.16 220 9 17 2.68 247 10 17 2.98 293 11 17 3.52 455 12 17 5.51 818 13 17 10.0

1707 14 17 22.4 598 15 17 12.9 75 16 17 1.04 37 17 17 0.549 18 18 17 0.357 2 19 17 0.184 0 20 17 0.0776 0 21 17 0.102 14 0 18 0.297 24 1 18 0.394 48 2 18 0.716 194 3 18 5.63 519 4 18 11.9

1326 5 18 16.7

1375 6 18 16.3 440 7 18 5.22 231 8 18 2.88 218 9 18 2.67 256 10 18 3.09 305 11 18 3.68 460 12 18 5.54 842 13 18 10.4

1699 14 18 23.2 438 15 18 13.5 104 16 18 1.43 44 17 18 0.667 20 18 18 0.362 0 19 18 0.148 0 20 18 0.0733 0 21 18 0.0772 14 0 19 0.276 25 1 19 0.403 50 2 19 0.708 162 3 19 2.50 652 4 19 8.85

1641 5 19 19.3

1120 6 19 13.4 562 7 19 6.67 315 8 19 3.82 282 9 19 3.37 276 10 19 3.29 288 11 19 3.45 397 12 19 5.25 699 13 19 8.92

1198 14 19 17.5 722 15 19 15.9 135 16 19 2.01 49 17 19 0.708 21 18 19 0.388 2 19 19 0.186 0 20 19 0.0503 0 21 19 0.0797 10 0 20 0.251 26 1 20 0.414 51 2 20 0.725 167 3 20 3.20

2131 4 20 24.1

2132 5 20 25.4

1022 6 20 12.3 489 7 20 5.88 332 8 20 3.96 296 9 20 3.49 309 10 20 3.66 485 11 20 6.70 418 12 20 5.86 611 13 20 7.83

1071 14 20 15.6 973 15 20 30.3 146 16 20 2.34 51 17 20 0.721 21 18 20 0.378 1 19 20 0.175 0 20 20 0.0371 0 21 20 0.0705 9 0 21 0.218 40 1 21 0.610 76 2 21 1.08 233 3 21 3.28 854 4 21 11.1 927 5 21 12.0 519 6 21 6.49 349 7 21 4.26 301 8 21 3.58 287 9 21 3.38 301 10 21 3.57 463 11 21 6.17 515 12 21 7.42 536 13 21 7.26

1881 14 21 26.6

1461 15 21 25.2 185 16 21 2.53 51 17 21 0.717 24 18 21 0.394 9 19 21 0.222 0 20 21 0.0911 0 21 21 0.0695 8 0 22 0.243 49 1 22 0.709 93 2 22 1.27 156 3 22 2.04 407 4 22 5.36 528 5 22 6.34 347 6 22 4.20 271 7 22 3.29 257 8 22 3.08 262 9 22 3.07 295 10 22 3.43 299 11 22 3.53 303 12 22 3.60 307 13 22 3.82 516 14 22 6.81 515 15 22 7.01 323 16 22 4.08 80 17 22 1.33 36 18 22 0.523 1 19 22 0.180 0 20 22 0.0935 0 21 22 0.0491 6 0 23 0.205 52 1 23 0.739 82 2 23 1.11 133 3 23 1.71 200 4 23 2.51 137 5 23 2.24 188 6 23 2.58 238 7 23 2.83 285 8 23 3.30 292 9 23 3.30 483 10 23 5.96 358 11 23 4.32 253 12 23 2.89 245 13 23 2.83 263 14 23 3.16 250 15 23 3.07 206 16 23 2.55 68 17 23 1.22 50 18 23 0.735 12 19 23 0.357 0 20 23 0.0415 0 21 23 0.0220 1 0 24 0.161 33 1 24 0.486 58 2 24 0.848 109 3 24 1.42 147 4 24 1.85 128 5 24 1.65 121 6 24 1.62 158 7 24 1.90 235 8 24 2.77 459 9 24 5.29 896 10 24 10.2 40 11 24 1.82 33 12 24 0.481 36 13 24 0.590 68 14 24 1.31 136 15 24 1.73 128 16 24 1.60 51 17 24 0.858 48 18 24 0.775 37 19 24 0.678 0 20 24 0.0462 0 21 24 0.0199 0 0 25 0.0833 11 1 25 0.268 62 2 25 0.878 86 3 25 1.13 51 4 25 0.815 34 5 25 0.560 33 6 25 0.551 35 7 25 0.653 83 8 25 1.24 92 9 25 2.24 83 10 25 2.77 34 11 25 0.970 27 12 25 0.475 29 13 25 0.496 41 14 25 0.630 75 15 25 1.01 96 16 25 1.23 89 17 25 1.96 63 18 25 0.896 26 19 25 0.516 0 20 25 0.110 0 21 25 0.0804 0 0 26 0.117 1 1 26 0.177 33 2 26 0.592 47 3 26 0.717 28 4 26 0.468 21 5 26 0.375 23 6 26 0.408 26 7 26 0.407 68 8 26 0.985 63 9 26 0.836 48 10 26 0.691 33 11 26 1.11 27 12 26 0.514 29 13 26 1.35 47 14 26 0.764 62 15 26 0.916 78 16 26 1.05 83 17 26 1.20 45 18 26 0.714 10 19 26 0.387 0 20 26 0.0891 0 21 26 0.0563 0 0 27 0.0565 0 1 27 0.0975 9 2 27 0.309 22 3 27 0.370 24 4 27 0.356 20 5 27 0.405 21 6 27 0.360 21 7 27 0.343 55 8 27 0.824 97 9 27 1.24 52 10 27 1.10 29 11 27 0.903 25 12 27 0.481 29 13 27 0.734 29 14 27 0.938 36 15 27 0.533 66 16 27 0.904 128 17 27 2.65 90 18 27 1.28 25 19 27 0.579 0 20 27 0.103 0 21 27 0.0563 0 0 28 0.0720 0 1 28 0.0941 4 2 28 0.137 8 3 28 0.214 12 4 28 0.277 21 5 28 0.341 20 6 28 0.366 24 7 28 0.384 47 8 28 0.673 75 9 28 1.04 88 10 28 1.48 39 11 28 0.852 27 12 28 0.444 14 13 28 0.325 24 14 28 0.407 36 15 28 0.560 83 16 28 1.13 255 17 28 3.19 172 18 28 2.42 50 19 28 1.14 0 20 28 0.0485 0 21 28 0.0464 0 0 29 0.0675 0 1 29 0.112 0 2 29 0.105 4 3 29 0.156 15 4 29 0.324 17 5 29 0.318 21 6 29 0.362 33 7 29 0.469 34 8 29 0.512 33 9 29 0.516 40 10 29 1.05 29 11 29 0.813 19 12 29 0.339 12 13 29 0.270 30 14 29 0.453 37 15 29 0.544 83 16 29 1.19 236 17 29 3.55 186 18 29 2.42 79 19 29 1.57 6 20 29 0.266 13 21 29 0.376 0 0 30 0.0928 0 1 30 0.0731 0 2 30 0.104 0 3 30 0.103 6 4 30 0.178 8 5 30 0.242 19 6 30 0.361 23 7 30 0.376 26 8 30 0.419 26 9 30 0.422 30 10 30 0.513 26 11 30 0.440 24 12 30 0.417 1 13 30 0.183 15 14 30 0.350 31 15 30 0.523 57 16 30 0.808 126 17 30 4.15 83 18 30 1.48 48 19 30 0.743 30 20 30 0.535 25 21 30 0.513 0 0 31 0.0250 0 1 31 0.0634 0 2 31 0.0564 0 3 31 0.0795 3 4 31 0.113 7 5 31 0.197 21 6 31 0.350 23 7 31 0.397 30 8 31 0.477 48 9 31 0.800 68 10 31 1.11 62 11 31 1.03 40 12 31 0.673 25 13 31 0.447 34 14 31 0.520 45 15 31 0.661 36 16 31 0.569 30 17 31 0.507 17 18 31 0.347 6 19 31 0.281 12 20 31 0.330 23 21 31 0.434 6 0 32 0.317 14 1 32 0.334 27 2 32 0.446 25 3 32 0.443 23 4 32 0.446 35 5 32 0.592 34 6 32 0.560 35 7 32 0.570 25 8 32 0.428 23 9 32 0.406 31 10 32 0.520 33 11 32 0.572 23 12 32 0.477 34 13 32 0.582 25 14 32 0.457 23 15 32 0.519 29 16 32 0.515 29 17 32 0.542 27 18 32 0.470 18 19 32 0.382 16 20 32 0.400 6 21 32 0.317 15 0 33 0.454 31 1 33 0.555 24 2 33 0.427 35 3 33 0.581 35 4 33 0.564 29 5 33 0.523 20 6 33 0.386 23 7 33 0.487 24 8 33 0.468 22 9 33 0.496 23 10 33 0.460 27 11 33 0.499 47 12 33 0.693 53 13 33 0.780 53 14 33 0.776 45 15 33 0.715 35 16 33 0.577 30 17 33 0.517 27 18 33 0.470 30 19 33 0.479 29 20 33 0.500 21 21 33 0.436