158 0 1 0.00214 214 1 1 0.00217 239 2 1 0.00214 249 3 1 0.00219 249 4 1 0.00218 240 5 1 0.00211 195 6 1 0.00170 116 7 1 0.00111 84 8 1 9.01E-4 83 9 1 0.00106 179 0 2 0.00206 273 1 2 0.00251 297 2 2 0.00259 306 3 2 0.00266 305 4 2 0.00265 291 5 2 0.00251 233 6 2 0.00199 134 7 2 0.00124 81 8 2 8.51E-4 95 9 2 0.00106 200 0 3 0.00211 365 1 3 0.00323 388 2 3 0.00333 387 3 3 0.00332 388 4 3 0.00333 355 5 3 0.00304 269 6 3 0.00229 152 7 3 0.00140 109 8 3 0.00105 87 9 3 9.45E-4 233 0 4 0.00238 569 1 4 0.00495 539 2 4 0.00463 522 3 4 0.00447 530 4 4 0.00451 477 5 4 0.00406 349 6 4 0.00293 189 7 4 0.00170 116 8 4 0.00114 93 9 4 9.65E-4 184 0 5 0.00223

1314 1 5 0.0147 808 2 5 0.00707 852 3 5 0.00807 863 4 5 0.00759 764 5 5 0.00665 516 6 5 0.00445 294 7 5 0.00250 147 8 5 0.00147 120 9 5 0.00116 209 0 6 0.00263

2557 1 6 0.0268

1564 2 6 0.0151

2017 3 6 0.0211

1736 4 6 0.0188

2035 5 6 0.0226

1069 6 6 0.0107 529 7 6 0.00489 267 8 6 0.00257 185 9 6 0.00162 203 0 7 0.00279

6963 1 7 0.0466

2586 2 7 0.0241

1359 3 7 0.0120

1604 4 7 0.0161

4932 5 7 0.0406

3805 6 7 0.0350

2021 7 7 0.0202 777 8 7 0.0109 254 9 7 0.00209 150 0 8 0.00168

4544 1 8 0.0411

5923 2 8 0.0487

1839 3 8 0.0167

1395 4 8 0.0120

1766 5 8 0.0182

3195 6 8 0.0303

2701 7 8 0.0309 266 8 8 0.0103 48 9 8 5.67E-4 226 0 9 0.00236

1358 1 9 0.0198

1977 2 9 0.0315

2211 3 9 0.0209

1703 4 9 0.0133 708 5 9 0.00810 189 6 9 0.00451

1308 7 9 0.0109 141 8 9 0.00328 56 9 9 6.81E-4 387 0 10 0.00351 671 1 10 0.00580 438 2 10 0.00426 434 3 10 0.00409 590 4 10 0.00515 557 5 10 0.00482 156 6 10 0.00313 121 7 10 0.00153 90 8 10 0.00114 310 9 10 0.00295 521 0 11 0.00632 978 1 11 0.00969 958 2 11 0.00984 788 3 11 0.00768 703 4 11 0.00666 819 5 11 0.00886 805 6 11 0.00866 642 7 11 0.00666 610 8 11 0.00616 469 9 11 0.00518

1204 0 12 0.0132

1174 1 12 0.0120

1144 2 12 0.0120

1244 3 12 0.0127

1057 4 12 0.0113 958 5 12 0.0101 946 6 12 0.0101 676 7 12 0.00711 386 8 12 0.00445 294 9 12 0.00372

1105 0 13 0.0122 777 1 13 0.00883 970 2 13 0.0104

1077 3 13 0.0114 963 4 13 0.0105 914 5 13 0.00980 836 6 13 0.00884 409 7 13 0.00481 453 8 13 0.00468 455 9 13 0.00492 531 0 14 0.00772

1113 1 14 0.0119

1039 2 14 0.0107

1275 3 14 0.0135

1226 4 14 0.0131

1032 5 14 0.0111 882 6 14 0.00937 736 7 14 0.00782 652 8 14 0.00709 562 9 14 0.00657