76 1 5 0.0158 158 1 6 0.0102 89 2 6 0.00205 127 3 6 0.00922 105 4 6 0.00974 125 5 6 0.0139 449 1 7 0.0424 289 5 7 0.0131 245 6 7 0.0282 123 7 7 0.0149 42 8 7 0.0147 283 1 8 0.00339 349 2 8 2.52E-4 179 6 8 0.00261 169 7 8 0.00153 23 8 8 0.00301 86 1 9 8.53E-4 139 2 9 0.00143