2382 3 1 7.16E-8

2177 4 1 7.55E-7

2002 5 1 1.32E-5

1854 6 1 1.65E-4

1746 7 1 3.46E-4

1681 8 1 3.51E-4

1499 9 1 3.43E-4

1960 6 2 2.30E-5

1841 7 2 2.41E-4

1750 8 2 3.58E-4

1664 9 2 3.54E-4

2005 6 3 2.18E-6

1860 7 3 1.93E-4

1752 8 3 3.60E-4

1679 9 3 3.49E-4

1982 6 4 7.25E-6

1786 7 4 2.48E-4

1637 8 4 3.48E-4

1469 9 4 3.13E-4

2047 6 5 1.46E-6

1725 7 5 2.53E-4

1498 8 5 3.27E-4

1374 9 5 2.97E-4

7192 0 6 1.85E-6

1782 7 6 1.89E-4

1510 8 6 3.32E-4

1362 9 6 2.96E-4

1729 0 7 1.33E-4

12181 1 7 4.47E-7

1861 7 7 1.10E-4

1659 8 7 3.52E-4

1510 9 7 3.27E-4

1438 0 8 1.69E-4

15850 1 8 1.45E-7

15847 2 8 5.79E-7

10523 3 8 2.52E-7

2732 6 8 8.93E-6

1857 7 8 1.07E-4

1579 8 8 3.46E-4

1426 9 8 3.16E-4

1238 0 9 2.13E-4

6766 1 9 2.25E-4

15853 2 9 3.40E-7

15863 3 9 2.56E-7

7703 4 9 1.11E-7

5589 5 9 4.13E-8

2440 6 9 1.74E-5

1304 7 9 2.89E-4 894 8 9 2.34E-4 702 9 9 1.87E-4 965 0 10 2.24E-4

1756 1 10 1.68E-4

3449 2 10 8.41E-5

13041 3 10 4.40E-7

3886 4 10 1.22E-7

15821 5 10 2.46E-7

2899 6 10 3.78E-6

1369 7 10 2.33E-4 938 8 10 2.24E-4 421 9 10 1.20E-4

1488 0 11 2.02E-4

1436 1 11 2.14E-4

1366 2 11 2.22E-4

1693 3 11 1.51E-4

1737 4 11 1.26E-4

4209 5 11 5.63E-5

2436 6 11 6.33E-5

1249 7 11 1.99E-4

1795 8 11 1.01E-4 577 9 11 1.46E-4

1137 0 12 1.88E-4 405 1 12 1.27E-4 448 2 12 1.34E-4 653 3 12 1.34E-4 866 4 12 1.78E-4

1405 5 12 1.58E-4

1628 6 12 1.36E-4 515 7 12 1.41E-4 763 8 12 1.21E-4 479 9 12 1.19E-4 682 0 13 1.34E-4 254 1 13 8.10E-5 371 2 13 1.26E-4 364 3 13 1.10E-4

1497 4 13 1.26E-4 632 5 13 1.05E-4 986 6 13 8.18E-5 223 7 13 8.29E-5 196 8 13 9.11E-5 144 9 13 5.55E-5 210 0 14 7.87E-5 231 1 14 6.53E-5 277 2 14 7.96E-5 238 3 14 6.79E-5 183 4 14 6.33E-5 435 5 14 4.11E-5

1576 6 14 6.32E-5 148 7 14 5.19E-5 130 8 14 5.01E-5 88 9 14 2.69E-5