707 1 7 0.00132 528 2 7 2.44E-5

1594 1 8 0.00725

1125 2 8 0.00512 613 3 8 0.00101 72 0 9 2.03E-5 271 1 9 0.00375

1619 2 9 0.00893

1646 3 9 0.00928 460 4 9 0.00142 296 5 9 2.68E-6 44 9 9 2.28E-6 108 1 10 1.81E-4 290 2 10 6.54E-4 888 3 10 0.00416 284 4 10 0.00194 958 5 10 0.00537 189 6 10 2.71E-4 81 7 10 1.72E-4 45 8 10 5.34E-5 92 0 11 9.35E-4 98 3 11 1.57E-4 105 4 11 2.56E-4 372 5 11 0.00378 159 6 11 2.12E-4 70 7 11 5.73E-5 94 8 11 2.69E-4 40 9 11 5.97E-5 61 0 12 4.58E-5 40 1 12 5.20E-5 39 2 12 2.59E-6 51 3 12 1.97E-6 86 5 12 4.71E-5 119 6 12 2.46E-4 38 7 12 1.68E-4 56 8 12 4.25E-5 19 9 12 7.13E-6 49 6 13 2.09E-6