79 1 8 0.00562 26 1 9 3.88E-4 103 2 9 0.00406 96 3 9 0.00861 24 4 10 8.63E-4 52 5 10 0.00523 4 6 10 0.00181 0 7 10 0.00153 0 0 11 0.00361 0 3 11 3.25E-4 0 4 11 4.84E-4 37 5 11 0.00228 0 8 11 0.00250 0 3 12 2.78E-5 0 4 12 3.59E-5 0 7 12 6.36E-4 0 0 13 1.18E-5