107 1 5 9.69E-7 230 1 6 0.00228 295 2 6 0.00227 212 3 6 3.27E-4 225 4 6 0.00143 136 5 6 2.65E-4 87 0 7 9.04E-7

1007 1 7 0.0212

1006 2 7 0.0174 366 3 7 0.00530 433 4 7 0.00948 289 5 7 0.00481 156 6 7 0.00439 87 7 7 0.00143 61 8 7 1.43E-4 104 0 8 5.19E-5

1086 1 8 0.0204

1545 2 8 0.0246 771 3 8 0.0130 662 4 8 0.00940 478 5 8 0.00771 140 6 8 0.00115 96 7 8 3.09E-4 87 8 8 9.55E-7 71 0 9 6.83E-5 548 1 9 0.0105

2055 2 9 0.0272 134 3 9 0.00895 55 4 9 7.70E-4 779 5 9 0.0131 842 6 9 0.0139 497 7 9 0.0147 174 8 9 0.00465 55 9 9 8.83E-6 140 1 10 0.0101

1751 2 10 0.0238 40 3 10 4.50E-4

1064 5 10 0.0136

1316 6 10 0.0167

1874 7 10 0.0266 42 8 10 0.00535 112 1 11 0.00441 987 2 11 0.0125

1507 5 11 0.0189 678 6 11 0.00951 45 7 11 5.36E-4 130 1 12 0.00168 182 2 12 0.00261 36 3 12 3.39E-4 179 5 12 0.00217 211 6 12 0.00290 41 7 12 5.65E-4 203 1 13 7.51E-4 268 2 13 0.00217 195 3 13 0.00158 80 4 13 6.37E-5 72 0 14 9.20E-7