495 0 1 6.42E-4 718 1 1 6.82E-4 735 2 1 6.37E-4 752 3 1 6.42E-4 724 4 1 6.22E-4 685 5 1 5.96E-4 635 6 1 5.59E-4 568 7 1 5.14E-4 496 8 1 4.73E-4 320 9 1 3.77E-4 669 0 2 7.29E-4 885 1 2 7.84E-4 881 2 2 7.46E-4 907 3 2 7.71E-4 857 4 2 7.33E-4 776 5 2 6.69E-4 696 6 2 6.08E-4 624 7 2 5.56E-4 556 8 2 5.08E-4 399 9 2 4.22E-4 838 0 3 8.19E-4

1041 1 3 8.93E-4

1110 2 3 9.32E-4

1147 3 3 9.66E-4

1050 4 3 8.85E-4 884 5 3 7.49E-4 763 6 3 6.59E-4 683 7 3 5.99E-4 601 8 3 5.37E-4 433 9 3 4.09E-4 987 0 4 9.13E-4

1258 1 4 0.00106

1494 2 4 9.68E-4

1512 3 4 0.00106

1316 4 4 0.00108

1050 5 4 8.75E-4 875 6 4 7.36E-4 754 7 4 6.47E-4 658 8 4 5.72E-4 478 9 4 4.26E-4

1173 0 5 0.00105

1782 1 5 4.32E-4

2301 2 5 3.04E-6

2149 3 5 2.18E-5

1783 4 5 5.52E-4

1340 5 5 0.00103

1040 6 5 8.46E-4 835 7 5 6.91E-4 678 8 5 5.71E-4 553 9 5 4.71E-4

1287 0 6 9.00E-4

3624 1 6 1.82E-4

4671 2 6 1.15E-7

3565 4 6 1.58E-7

2248 5 6 2.88E-4

1356 6 6 8.05E-4

1001 7 6 7.88E-4 812 8 6 6.80E-4 604 9 6 5.10E-4

1385 0 7 6.75E-4

15733 1 7 9.68E-7

15473 2 7 2.59E-6

5738 3 7 1.10E-6

6746 4 7 1.13E-6

4580 5 7 6.60E-7

2404 6 7 7.45E-4

1388 7 7 8.50E-4

1054 8 7 7.10E-4 656 9 7 5.37E-4

1707 0 8 4.63E-4

15807 1 8 9.86E-7

15854 2 8 2.67E-6

12461 3 8 0.00149

10732 4 8 0.00133

7148 5 8 2.06E-6

2246 6 8 4.84E-4

1686 7 8 7.84E-4

1607 8 8 5.93E-4 642 9 8 5.83E-4 941 0 9 4.74E-4

8640 1 9 0.00129

15859 2 9 1.95E-6

2074 3 9 8.01E-4 795 4 9 5.34E-4

12179 5 9 0.00166

13146 6 9 0.00280

7895 7 9 5.08E-4

2908 8 9 3.35E-4 937 9 9 3.76E-4 566 0 10 5.25E-4

1940 1 10 0.00127

15852 2 10 3.88E-4 704 3 10 5.54E-4 572 4 10 4.85E-4

15827 5 10 0.00261

15851 6 10 0.00665

15852 7 10 0.00171 677 8 10 5.53E-4 231 9 10 2.34E-4 690 0 11 6.26E-4

1599 1 11 6.11E-4

15527 2 11 0.00196 576 3 11 5.32E-4 412 4 11 3.63E-4

15861 5 11 0.00122

10826 6 11 0.00226 782 7 11 6.37E-4 315 8 11 3.55E-4 204 9 11 1.97E-4 568 0 12 5.16E-4

2163 1 12 4.28E-4

2961 2 12 3.51E-4 606 3 12 4.85E-4 449 4 12 5.17E-4

3035 5 12 4.57E-4

3411 6 12 5.42E-4 651 7 12 4.16E-4 185 8 12 2.14E-4 155 9 12 1.56E-4 565 0 13 4.93E-4

3369 1 13 1.14E-4

4812 2 13 2.65E-4

3799 3 13 3.15E-4

1378 4 13 6.43E-4 806 5 13 5.08E-4 648 6 13 5.46E-4 626 7 13 5.53E-4 453 8 13 4.01E-4 206 9 13 2.39E-4

1271 0 14 3.35E-4 866 1 14 5.47E-4 793 2 14 6.91E-4 759 3 14 6.57E-4 662 4 14 5.69E-4 541 5 14 4.81E-4 605 6 14 5.23E-4 589 7 14 5.18E-4 502 8 14 4.54E-4 594 9 14 5.34E-4