0 0 1 7.99E-4 0 1 1 0.00111 0 2 1 9.75E-4 0 3 1 8.67E-4 0 4 1 0.00110 0 5 1 0.00133 0 6 1 0.00111 0 7 1 0.00131 0 8 1 0.00109 0 9 1 0.00284 0 0 2 0.00138 0 1 2 0.00142 0 2 2 0.00151 0 3 2 0.00172 0 4 2 0.00190 0 5 2 0.00167 0 6 2 0.00181 0 7 2 0.00182 0 8 2 0.00164 0 9 2 0.00268 0 0 3 0.00123 0 1 3 0.00145 0 2 3 0.00157 0 3 3 0.00172 0 4 3 0.00166 0 5 3 0.00186 0 6 3 0.00170 0 7 3 0.00172 0 8 3 0.00241 2 9 3 0.00301 0 0 4 0.00159 0 1 4 0.00181 0 2 4 0.00204 2 3 4 0.00233 4 4 4 0.00260 2 5 4 0.00274 1 6 4 0.00238 0 7 4 0.00217 2 8 4 0.00296 6 9 4 0.00358 0 0 5 0.00162 0 1 5 0.00159 0 2 5 0.00166 0 3 5 0.00240 3 4 5 0.00263 3 5 5 0.00275 7 6 5 0.00344 0 7 5 0.00238 1 8 5 0.00263 8 9 5 0.00442 0 0 6 0.00167 1 1 6 0.00216 5 2 6 0.00320 49 3 6 0.0186 201 4 6 0.0525 116 5 6 0.0292 36 6 6 0.00915 14 7 6 0.00518 4 8 6 0.00341 9 9 6 0.00439 0 0 7 0.00213 0 1 7 0.00115 0 2 7 0.00219 24 3 7 0.0265

1052 4 7 0.198 846 5 7 0.169 215 6 7 0.0519 79 7 7 0.0212 19 8 7 0.00624 17 9 7 0.00603 2 0 8 0.00410 0 1 8 6.27E-4 0 2 8 5.14E-4 0 3 8 3.43E-4 0 4 8 9.37E-4 6 5 8 0.0355 13 6 8 0.0462 14 7 8 0.0173 16 8 8 0.00595 10 9 8 0.00474 0 0 9 0.00242 0 1 9 0.00112 0 2 9 6.44E-4 0 3 9 5.86E-4 0 4 9 9.67E-4 0 5 9 0.00103 0 6 9 0.00106 0 7 9 0.00181 0 8 9 0.00171 0 9 9 0.00152 0 0 10 0.00275 0 1 10 0.00198 0 2 10 0.00128 0 3 10 0.00149 0 4 10 0.00186 0 5 10 0.00191 0 6 10 0.00177 0 7 10 0.00303 0 8 10 0.00168 0 9 10 0.00134 0 0 11 0.00226 0 1 11 0.00183 0 2 11 0.00120 0 3 11 0.00109 0 4 11 0.00123 0 5 11 0.00108 0 6 11 0.00110 0 7 11 0.00236 0 8 11 7.76E-4 0 9 11 6.34E-4 0 0 12 0.00121 0 1 12 8.94E-4 0 2 12 8.96E-4 0 3 12 0.00268 0 4 12 5.74E-4 0 5 12 4.89E-4 0 6 12 3.51E-4 0 7 12 1.74E-4 0 8 12 1.99E-5 0 9 12 1.47E-4 0 0 13 6.25E-4 0 1 13 2.18E-4 0 2 13 1.53E-4 0 3 13 4.40E-4 0 4 13 3.73E-4 0 5 13 5.60E-4 0 6 13 4.86E-4 0 7 13 4.30E-4 0 8 13 3.53E-4 0 9 13 3.67E-4 0 0 14 4.01E-4 0 1 14 2.95E-4 0 2 14 4.36E-4 0 3 14 3.69E-4 0 4 14 5.73E-4 0 5 14 5.74E-4 0 6 14 6.60E-4 0 7 14 4.84E-4 0 8 14 7.88E-4 0 9 14 5.92E-4