128 0 1 3.27E-5 162 1 1 3.13E-5 208 2 1 3.91E-5 249 3 1 4.59E-5 274 4 1 5.02E-5 275 5 1 5.01E-5 234 6 1 4.22E-5 202 7 1 3.77E-5 171 8 1 3.24E-5 125 9 1 2.85E-5 144 0 2 3.21E-5 191 1 2 3.65E-5 245 2 2 4.56E-5 303 3 2 5.54E-5 345 4 2 6.27E-5 340 5 2 6.21E-5 276 6 2 4.96E-5 229 7 2 4.23E-5 186 8 2 3.53E-5 138 9 2 2.81E-5 145 0 3 3.04E-5 207 1 3 3.97E-5 283 2 3 5.17E-5 355 3 3 6.32E-5 420 4 3 7.49E-5 434 5 3 7.77E-5 339 6 3 6.16E-5 259 7 3 4.77E-5 208 8 3 3.89E-5 170 9 3 3.27E-5 144 0 4 2.91E-5 227 1 4 4.39E-5 327 2 4 5.90E-5 452 3 4 7.90E-5 553 4 4 9.85E-5 617 5 4 1.13E-4 395 6 4 7.25E-5 280 7 4 5.18E-5 220 8 4 4.09E-5 184 9 4 3.52E-5 134 0 5 3.00E-5 490 1 5 1.02E-4 495 2 5 1.02E-4 718 3 5 1.40E-4 853 4 5 1.58E-4

1365 5 5 1.40E-4 463 6 5 8.63E-5 312 7 5 6.21E-5 234 8 5 4.52E-5 182 9 5 3.49E-5 106 0 6 2.31E-5 172 1 6 4.45E-5 661 2 6 9.89E-5

4333 3 6 2.88E-4

1948 4 6 1.12E-4

3027 5 6 1.53E-4 576 6 6 1.16E-4 326 7 6 6.14E-5 255 8 6 4.76E-5 190 9 6 3.62E-5 82 0 7 1.69E-5 125 1 7 2.43E-5 291 2 7 6.39E-5

14693 3 7 3.48E-4

10428 4 7 3.66E-7

1928 5 7 8.74E-5 643 6 7 1.24E-4 351 7 7 6.86E-5 243 8 7 4.59E-5 152 9 7 2.99E-5 68 0 8 1.48E-5 88 1 8 1.82E-5 153 2 8 3.02E-5 335 3 8 7.27E-5

4835 4 8 1.68E-4

6303 5 8 2.18E-4

1331 6 8 1.43E-4 528 7 8 1.02E-4 270 8 8 5.17E-5 163 9 8 3.30E-5 53 0 9 1.17E-5 65 1 9 1.41E-5 102 2 9 2.04E-5 168 3 9 3.28E-5 249 4 9 5.10E-5 830 5 9 1.42E-4

14881 6 9 5.67E-4

2696 7 9 6.66E-5 698 8 9 1.19E-4 278 9 9 6.04E-5 44 0 10 1.02E-5 55 1 10 1.21E-5 77 2 10 1.63E-5 113 3 10 2.26E-5 147 4 10 2.93E-5 236 5 10 5.24E-5

15829 6 10 2.43E-4

6308 7 10 1.53E-4

1059 8 10 8.91E-5 204 9 10 4.56E-5 45 0 11 1.07E-5 57 1 11 1.25E-5 62 2 11 1.35E-5 86 3 11 1.80E-5 124 4 11 2.64E-5 153 5 11 3.21E-5 301 6 11 6.22E-5

9339 7 11 2.05E-4

1290 8 11 5.16E-5 131 9 11 3.45E-5 42 0 12 1.02E-5 50 1 12 1.17E-5 58 2 12 1.32E-5 65 3 12 1.47E-5 107 4 12 2.81E-5 108 5 12 2.50E-5 122 6 12 2.81E-5 164 7 12 4.88E-5 186 8 12 6.10E-5 25 9 12 8.23E-6 38 0 13 9.84E-6 45 1 13 1.09E-5 41 2 13 9.82E-6 37 3 13 8.59E-6 50 4 13 1.46E-5 139 5 13 5.03E-5 73 6 13 2.24E-5 43 7 13 1.64E-5 26 8 13 6.86E-6 25 9 13 9.78E-6 24 0 14 7.02E-6 28 1 14 7.12E-6 28 2 14 7.19E-6 30 3 14 7.78E-6 28 4 14 7.38E-6 37 5 14 1.47E-5 60 6 14 2.91E-5 191 7 14 3.37E-5 181 8 14 3.31E-5 166 9 14 3.22E-5