34 1 5 3.06E-4 26 2 5 8.85E-5 39 3 5 1.38E-5 46 4 5 3.76E-5 81 5 5 9.30E-5 8 7 5 3.79E-5 45 2 6 2.06E-4 256 3 6 0.00158 114 4 6 1.19E-4 185 5 6 0.00122 26 6 6 2.89E-7 13 2 7 8.01E-6 960 3 7 0.00409 640 4 7 0.00294 101 5 7 1.14E-4 16 3 8 4.89E-7 322 4 8 0.00344 379 5 8 0.00199 74 6 8 1.47E-4 55 5 9 0.00134 885 6 9 0.00330 143 7 9 1.07E-4 11 5 10 1.03E-5

1184 6 10 0.00528 374 7 10 0.00110 22 6 11 8.08E-5 580 7 11 0.00239 71 8 11 2.89E-4 10 7 12 3.26E-5 12 8 12 2.17E-5 3 5 13 2.04E-5