0 1 5 2.30E-4 0 2 5 9.48E-5 0 3 5 6.95E-5 0 4 5 1.15E-4 0 7 5 5.20E-6 0 2 6 1.31E-7 15 3 6 2.40E-4 0 4 6 3.48E-5 10 5 6 0.00211 57 3 7 0.00193 35 4 7 1.47E-4 31 4 8 1.70E-4 3 5 9 5.11E-6 40 6 9 1.63E-4 0 5 10 3.27E-5 74 6 10 6.57E-4

0 8 12 6.55E-6