0 5 6 6.31E-6 0 6 6 1.92E-5 0 1 7 1.19E-5 6 2 7 2.92E-5 0 3 7 2.25E-5 7 4 7 3.86E-5 0 5 7 1.52E-5 0 6 7 2.27E-5 0 7 7 4.44E-6 0 3 8 2.57E-6 9 4 8 1.27E-4 0 3 9 3.40E-5 11 4 9 6.56E-5 2 5 9 5.37E-5 19 6 9 7.19E-5 0 7 9 1.62E-6 9 4 10 4.92E-5 3 5 10 5.29E-5 9 6 10 6.83E-5 0 5 11 9.50E-6 0 8 11 3.27E-5