49 0 1 7.59E-5 94 1 1 9.81E-5 102 2 1 9.34E-5 115 3 1 1.03E-4 127 4 1 1.12E-4 131 5 1 1.14E-4 122 6 1 1.07E-4 107 7 1 9.71E-5 93 8 1 9.14E-5 61 9 1 7.85E-5 81 0 2 9.71E-5 111 1 2 1.03E-4 118 2 2 1.05E-4 146 3 2 1.25E-4 168 4 2 1.41E-4 170 5 2 1.43E-4 157 6 2 1.34E-4 136 7 2 1.18E-4 110 8 2 9.96E-5 82 9 2 9.01E-5 101 0 3 1.05E-4 121 1 3 1.08E-4 143 2 3 1.24E-4 184 3 3 1.54E-4 217 4 3 1.77E-4 222 5 3 1.81E-4 204 6 3 1.69E-4 168 7 3 1.43E-4 130 8 3 1.13E-4 86 9 3 8.84E-5 113 0 4 1.09E-4 126 1 4 1.12E-4 165 2 4 1.41E-4 225 3 4 1.83E-4 282 4 4 2.25E-4 288 5 4 2.31E-4 269 6 4 2.20E-4 207 7 4 1.73E-4 158 8 4 1.33E-4 103 9 4 9.72E-5 112 0 5 1.08E-4 137 1 5 1.20E-4 195 2 5 1.64E-4 287 3 5 2.33E-4 383 4 5 3.02E-4 403 5 5 3.16E-4 396 6 5 3.21E-4 272 7 5 2.32E-4 190 8 5 1.59E-4 149 9 5 1.30E-4 113 0 6 1.07E-4 154 1 6 1.35E-4 232 2 6 1.96E-4 388 3 6 3.16E-4 674 4 6 5.53E-4 670 5 6 5.54E-4 737 6 6 5.66E-4 550 7 6 4.76E-4 213 8 6 1.81E-4 194 9 6 1.83E-4 98 0 7 9.45E-5 153 1 7 1.46E-4 252 2 7 2.13E-4 514 3 7 4.46E-4

3143 4 7 8.62E-4

3086 5 7 8.35E-4 863 6 7 6.07E-4 490 7 7 4.07E-4 141 8 7 1.73E-4 183 9 7 1.68E-4 99 0 8 9.26E-5 152 1 8 1.33E-4 297 2 8 2.54E-4

1004 3 8 5.84E-4

15810 4 8 0.00122

1191 5 8 6.16E-4 301 6 8 2.91E-4 172 7 8 1.55E-4 99 8 8 9.01E-5 63 9 8 6.16E-5 108 0 9 1.01E-4 169 1 9 1.52E-4 515 2 9 4.74E-4

9366 3 9 0.00142

7268 4 9 9.34E-4 886 5 9 5.95E-4 244 6 9 2.46E-4 129 7 9 1.17E-4 87 8 9 8.13E-5 50 9 9 5.34E-5 103 0 10 1.00E-4 198 1 10 1.85E-4

1852 2 10 7.91E-4

11751 3 10 6.89E-4

1201 4 10 4.52E-4 461 5 10 4.46E-4 146 6 10 1.84E-4 92 7 10 9.00E-5 46 8 10 5.21E-5 27 9 10 3.44E-5 131 0 11 1.70E-4 244 1 11 2.82E-4

3696 2 11 5.78E-4

5151 3 11 4.03E-4 302 4 11 3.42E-4 218 5 11 2.26E-4 142 6 11 1.55E-4 60 7 11 6.49E-5 26 8 11 3.24E-5 24 9 11 3.05E-5 244 0 12 3.31E-4 361 1 12 3.38E-4 629 2 12 5.22E-4 356 3 12 3.65E-4 102 4 12 1.27E-4 118 5 12 1.42E-4 110 6 12 2.00E-4 51 7 12 6.56E-5 24 8 12 2.99E-5 24 9 12 3.52E-5 88 0 13 1.04E-4 165 1 13 2.17E-4 223 2 13 2.66E-4 89 3 13 1.16E-4 68 4 13 7.86E-5 81 5 13 8.65E-5 78 6 13 1.10E-4 57 7 13 9.46E-5 44 8 13 5.34E-5 41 9 13 5.52E-5 86 0 14 1.06E-4 87 1 14 1.13E-4 98 2 14 1.70E-4 52 3 14 6.63E-5 51 4 14 5.55E-5 42 5 14 4.96E-5 37 6 14 4.22E-5 69 7 14 7.78E-5 104 8 14 1.15E-4 91 9 14 1.09E-4