34 5 6 3.06E-6 45 6 6 8.39E-4 32 7 6 0.00109 0 9 6 1.63E-4 0 1 7 3.19E-5 4 2 7 1.41E-5 196 4 7 0.00534 183 5 7 0.00701 44 6 7 7.14E-4 30 7 7 9.63E-4 69 3 8 0.00602

1090 4 8 0.0201 68 5 8 2.94E-4 10 6 8 1.18E-6 602 3 9 0.0152 441 4 9 0.0104 47 5 9 2.93E-6 116 2 10 0.00618 729 3 10 0.0168 69 4 10 1.93E-4 1 0 11 6.10E-5 6 1 11 3.16E-5 221 2 11 0.00885 302 3 11 0.00539 11 0 12 2.72E-4 22 1 12 2.90E-4 34 2 12 1.97E-4 17 3 12 1.79E-4 0 6 12 3.08E-4 4 1 13 2.41E-5 0 7 13 5.88E-6 0 2 14 1.66E-4