0 5 6 3.25E-5 0 6 6 0.00184 0 7 6 0.00474 10 4 7 0.00621 11 5 7 0.00324 0 6 7 0.00127 2 3 8 0.00257 60 4 8 7.43E-4 38 3 9 0.00791 8 2 10 0.00358 46 3 10 0.00187 0 1 11 1.29E-4 14 2 11 8.72E-4 0 0 12 4.63E-4 0 2 12 2.23E-5 0 3 12 3.65E-4

0 2 14 0.00106