0 6 6 0.00223 0 7 6 0.0156 0 4 7 0.0313 0 5 7 0.00888 0 6 7 0.00951 0 3 8 7.96E-4 0 3 9 0.00206 0 2 10 0.0155

0 0 12 0.00152 0 3 12 7.49E-4

0 2 14 0.00127