3 9 8 3.82E-5 0 1 9 3.18E-6 0 3 9 4.33E-5 0 4 9 5.83E-6 6 8 9 0.00155 35 9 9 0.00204 0 1 10 8.59E-5 0 2 10 2.70E-4 0 3 10 1.54E-5 8 7 10 0.00131 16 8 10 0.00405 0 9 10 7.91E-6 33 6 11 0.00203 0 7 11 0.00230