0 6 7 0.00145 0 4 8 0.00832 0 5 8 0.00827 0 6 8 0.00421 0 7 8 0.00937 0 3 9 0.00193 0 4 9 0.00936 0 7 9 0.0323 0 2 10 7.71E-5 0 3 10 1.84E-4