15 4 7 3.44E-5 19 6 7 5.17E-4 0 9 7 2.47E-4 18 3 8 2.57E-5 68 4 8 0.00116 78 5 8 0.00210 60 6 8 0.00205 39 7 8 0.00113 5 8 8 5.23E-5 77 3 9 0.00771 100 4 9 0.00458 87 7 9 0.00486 6 2 10 9.17E-4 108 3 10 0.00465 0 7 10 1.58E-4

0 2 12 2.25E-6 0 3 12 2.54E-5